Contents

Introduction

开始使用前

Conventions

Prerequisites

Components Used

Configure

Network Diagram

配置

Verify

Troubleshoot

Related Information

Introduction

此示例配置演示一个连接到 Cisco 6130 数字用户线接入复用器 (DSLAM) 的 Cisco 827 数字用户线 (DSL) 路由器，该路由器在 Cisco 6400 通用接入集中器 (UAC) 上终止。

配置Cisco 827如下：

- 使用集成路由和桥接(IRB)

- 使用封装

- 使用网络地址转换(NAT)

- 作为将租用IP地址给其本地以太网客户端的一个动态主机配置协议(DHCP)服务器

Cisco 6400配置有IRB。

开始使用前

Conventions

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

Prerequisites

本文档没有任何特定的前提条件。

Components Used

本文档中的信息基于以下软件和硬件版本。

- Cisco 827-4V客户端前置设备(CPE) IOS® Software Release 12.1(1)XB

- Cisco 6400 UAC NODE路由处理器(NRP) IOS Software Release 12.0(7)DC

- Cisco 6400 UAC-Node交换机处理器(NSP) IOS Software Release 12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS软件版本12.1(1)DA

本文档中的信息都是基于特定实验室环境中的设备创建的。All of the devices used in this document started with a cleared (default) configuration.如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

Configure

本部分提供有关如何配置本文档所述功能的信息。

Note: 要查找本文档所用命令的其他信息，请使用命令查找工具（仅限注册用户）。

Network Diagram

本文档使用下图所示的网络设置。

配置

本文档使用如下所示的配置。

- Cisco 827

- Cisco接入6400 NRP

Cisco 827

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

ip dhcp excluded-address 10.0.0.1

!

ip dhcp pool

<pool name>

network 10.0.0.0 255.0.0.0

default-router 10.0.0.1

!

bridge irb

!

interface Ethernet0

ip address 10.0.0.1 255.0.0.0

no ip directed-broadcast

ip nat inside

no ip mroute-cache

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 1/150

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address 172.16.0.1 255.255.0.0

no ip directed-broadcast

ip nat outside

!

ip nat inside source list 1 interface BVI1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 172.16.0.2

no ip http server

!

access-list 1 permit 10.0.0.0 0.255.255.255

bridge 1 protocol ieee

bridge 1 route ip

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Cisco接入6400 NRP

Current configuration:

!

version 12.0

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname NRP

!

ip subnet-zero

!

bridge irb

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip route-cache

no ip mroute-cache

no atm ilmi-keepalive

!

interface ATM0/0/0.300 point-to-point

no ip directed-broadcast

no ip route-cache

pvc 1/150

encapsulation aal5snap

!

bridge-group 1

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

interface BVI1

ip address 172.16.0.2 255.255.0.0

no ip directed-broadcast

!

no ip http server

!

bridge 1 protocol ieee

bridge 1 route ip

!

end

为了确信，无线客户端能在他们中沟通，请配置bridge-group 1命令在无线接口。

当bridge-group 1命令在无线接口时发出，自动地发出这些命令：

- 桥组1 subscriber-loop-control

- bridge-group 1 spanning-disabled

- 桥组1个块未知来源

请勿禁用这些命令。这些命令对于无线通信是必需的发生。如果这些命令是失效的，无线客户端可能不能彼此沟通。

并且，如果bridge-group命令没有为VLAN被配置，无线客户端不能从在其中一的动态主机配置协议(DHCP)服务器获得IP地址VLAN。

Verify

当前没有可用于此配置的验证过程。

Troubleshoot

目前没有针对此配置的故障排除信息。

Related Information

- Cisco DSL技术支持信息

- Cisco DSL产品支持信息

- Technical Support - Cisco Systems