Contents

Introduction

开始使用前

Conventions

Prerequisites

Components Used

背景信息

Configure

Network Diagram

配置

Verify

Troubleshoot

Related Information

Introduction

此示例配置演示一个连接到 Cisco 6130 数字用户线接入复用器 (DSLAM) 的 Cisco 827 数字用户线 (DSL) 路由器，该路由器在 Cisco 6400 通用接入集中器 (UAC) 上终止。Cisco 827路由器被配置了作为一个动态主机配置协议(DHCP)服务器用在ATM (PPPoA)的点对点协议。

开始使用前

Conventions

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

Prerequisites

本文档没有任何特定的前提条件。

Components Used

本文档中的信息基于以下软件和硬件版本。

- Cisco 827-4V客户端前置设备(CPE) IOS® Software Release 12.1(1)XB

- Cisco 6400 UAC NODE路由处理器(NRP) IOS Software Release 12.0(7)DC

- Cisco 6400 UAC-Node交换机处理器(NSP) IOS Software Release 12.0(4)DB

- Cisco 6130 DSLAM-NI2 IOS软件版本12.1(1)DA

本文档中的信息都是基于特定实验室环境中的设备创建的。All of the devices used in this document started with a cleared (default) configuration.如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

背景信息

在这种情况下，互联网服务提供商(ISP)产生了订户单个IP地址(172.18.0.1)互联网连通性的，但是订户有个人计算机小型网络并且要有所有设备的互联网访问。

显示的解决方案这里实现在Cisco 827路由器的网络地址转换(NAT)。NAT为IP地址简单化和保存设计;它enable (event)使用未注册的IP地址连接到互联网的私有IP互联网络。NAT起作用一个路由器，通常连接两网络，并且转换在内部网络的专用的(在这种情况下10.0.0.0网络)地址为合法的(在这种情况下， 172.18.0.1)地址，在信息包转发到另一网络前。作为此功能一部分，只可以配置NAT为整个网络通告一个地址(172.18.0.1)。这提供附加安全性，有效隐藏在单个IP地址后的整个内部网络。

NAT在远程访问环境符合安全和地址保存的双重目的和典型地实现。在本例中， 10.0.0.1的IP地址在Cisco 827路由器的以太网接口手工被配置。配置Cisco 827路由器作为DHCP服务器，并且租用IP地址到本地LAN设备附有其以太网网络。

以下配置显示为以太网和ATM接口配置的NAT。以太网接口(被指派Ethernet0在网络的下面的图表中)有10.0.0.1的IP地址，与255.0.0.0子网掩码。NAT为里面被配置，因此意味着接口被连接到是受NAT转换支配的内部网络。ATM接口(选定Dialer0在网络的下面的图表中)有172.18.0.1的IP地址和255.255.0.0子网掩码。在Dialer0的NAT为从外部被配置，因此意味着接口被连接到一个外部网络例如互联网。关于端到端异步数字用户线路(ADSL) PPPoA体系结构的更多信息，请参见PPPoA基准体系结构。

Configure

本部分提供有关如何配置本文档所述功能的信息。

Note: 要查找本文档所用命令的其他信息，请使用命令查找工具（仅限注册用户）。

Network Diagram

本文档使用下图所示的网络设置。

配置

本文使用如下所示的配置。

Cisco 827 Router

!

version 12.1

service timestamps debug datetime msec

service timestamps datetime msec

!

hostname R1

!

ip subnet-zero

!

ip dhcp excluded-address 10.0.0.1

!--- The DHCP pool does not lease this address; !--- it is used by interface E0.

!

ip dhcp pool <pool name>

network 10.0.0.0 255.0.0.0

default-router 10.0.0.1

!--- The default gateway is assigned to local devices.

!

interface Ethernet0

ip address 10.0.0.1 255.0.0.0

no ip directed-broadcast

ip nat inside

no ip mroute-cache

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 1/150

encapsulation aal5mux ppp dialer

dialer pool-member 1

!

hold-queue 224 in

!

interface Dialer0

ip address 172.18.0.1 255.255.0.0

ip nat outside

no ip directed-broadcast

encapsulation ppp

dialer pool 1

dialer-group 2

ppp pap sent-username <username> password <password>

!

ip nat inside source list 1  interface Dialer0 overload

ip classless

ip route 0.0.0.0 0.0.0.0 Dialer0

no ip http server

!

access-list 1 permit 10.0.0.0 0.255.255.255

dialer-list 2 protocol ip permit

!

voice-port 1

timing hookflash-in 0

!

voice-port 2

timing hookflash-in 0

!

voice-port 3

timing hookflash-in 0

!

voice-port 4

timing hookflash-in 0

!

end

Verify

当前没有可用于此配置的验证过程。

Troubleshoot

目前没有针对此配置的故障排除信息。

Related Information

- Cisco DSL 路由器配置与故障排除指南

- Cisco 800 Series Routers网络方案

- Cisco 800 Series Routers Advanced Router配置

- Cisco 800 Series Routers排除故障

- PPPoA基准体系结构

- Cisco 800 Series Routers Basic Router配置

- Cisco 6400软件设置指南

- DSL 和 LRE 技术支持

- 接入产品支持页面

- 拨号技术支持页

- Technical Support - Cisco Systems