目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

HP-UX主机命令

MDS/IPS-8命令

故障排除

交换矩阵管理器和设备管理器显示

简介

驻留在服务器上的思科iSCSI驱动程序是iSCSI解决方案的关键组件。这些iSCSI驱动程序会截取小型计算机系统接口(SCSI)命令，将其封装到IP数据包中，并将其重定向到Cisco SN 5420、Cisco SN 5428-2或Cisco MDS/IPS-8.This文档提供HP-UX的示例配置iSCSI主机到SN 5428。

先决条件

要求

在尝试进行此配置之前，请确保满足以下要求：

- 安装与您的HP-UX版本兼容的iSCSI驱动程序。该驱动程序的最新版本可在Cisco.com的Cisco iSCSI驱动程序(仅限注册客户)下载页中找到。README.txt文件包括在驱动程序zip(tar)文件中。README包含关于许可证协议的信息、驱动程续安装和配置说明以及驱动体系结构的技术概要。

- 操作系统要求和补丁要求在“Cisco iSCSI Driver for HP-UX Release Notes”的“System Requirements”部分中进行了说明。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- HP-UX 9000/800 A500服务器，带两个处理器。

注意：在本实验设置中，没有单独的用于iSCSI的以太网适配器，而且使用的适配器为100 Mb。在任何现实环境中，您都有单独的千兆以太网(GE)适配器作为iSCSI启动器。

[/]#/opt/ignite/bin/print_manifest[...]

System Hardware

Model:              9000/800/A500-5X

Main Memory:        1024 MB

Processors:         2

OS mode:            64 bit

LAN hardware ID:    0x00306E1B6F51

Software ID:        586760518

Keyboard Language:  Not_Applicable

Storage devices                  HW Path      Interface

SEAGATE ST318404LC 17366 Mb      0/0/1/1.15.0 SCSI C896 Ultra Wide Single-Ended

SEAGATE ST318203LC 17366 Mb      0/0/2/1.15.0 SCSI C875 Ultra Wide Single-Ended

I/O Interfaces

Class          H/W Path       Driver         Description

lan            0/0/0/0        btlan3         HP PCI 10/100Base-TX Core

ext_bus        0/0/1/0        c720           SCSI C896 Ultra Wide LVD

ext_bus        0/0/1/1        c720           SCSI C896 Ultra Wide Single-Ended

ext_bus        0/0/2/0        c720           SCSI C875 Fast Wide Single-Ended

ext_bus        0/0/2/1        c720           SCSI C875 Ultra Wide Single-Ended

tty            0/0/4/0        asio0          PCI Serial (103c1048)

tty            0/0/5/0        asio0          PCI Serial (103c1048)

fc             0/2/0/0        td             HP Tachyon XL2 Fibre Channel Mass Storage Adapter

Installed Software

Your system was installed with HP-UX version B.11.00.

Your system has the following software products installed and

configured on the system disk drive(s).

Product          Revision          Description

A6795A           B.11.00.10        PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE           B.11.00           Patch Bundle

HPUXEng64RT      B.11.00.01        English HP-UX 64-bit Runtime Environment

HWE1100          B.11.00.0203.5    Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag       B.11.00.20.09     HPUX 11.0 Support Tools Bundle, Mar 2002

UXCoreMedia      B.11.00.02        HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic     B.11.00.02        HP-UX Unlimited-User License

XSWGR1100        B.11.00.47.08     General Release Patches, November 1999 (ACE)

[...]

- HP-UX的Cisco iSCSI驱动程序3.3.3已使用。建议您还安装（至少）来自HP的最新稳定地址解析协议(ARPA)传输累积补丁。在编写本文档时，此修补程序是PHNE_28538。此修补程序具有多个依赖项，因此您必须根据需要安装它们。有关安装详细信息，请访问官方的HP支持站点 (仅注册客户)。

[/]# swlist

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

#

# Bundle(s):

#

A6795A                        B.11.00.10     PCI Tachyon TL/TS/XL2 Fibre Channel

BUNDLE                        B.11.00        Patch Bundle

HPUXEng64RT                   B.11.00.01     English HP-UX 64-bit Runtime Environment

HWE1100                       B.11.00.0203.5 Hardware Enablement Patches for HP-UX 11.00, March 2002

OnlineDiag                    B.11.00.20.09  HPUX 11.0 Support Tools Bundle, Mar 2002

QPK1100                       B.11.00.56.5   Quality Pack for HP-UX 11.00, March 2002

UXCoreMedia                   B.11.00.02     HP-UX Media Kit (Reference Only. See Description)

UnlimUserLic                  B.11.00.02     HP-UX Unlimited-User License

XSWGR1100                     B.11.00.47.08  General Release Patches, November 1999 (ACE)

#

# Product(s) not contained in a Bundle:

#

ISCSI                         3.3.3          ISCSI software

bison                         1.875          bison

flex                          2.5.4a         flex

gcc                           3.2.3          gcc

gettext                       0.11.5         gettext

less                          376            less

libiconv                      1.9            libiconv

make                          3.80           make

ncurses                       5.2            ncurses

termcap                       1.3.1          termcap

zsh                           4.0.7          zsh

[/]# swlist BUNDLE

# Initializing...

# Contacting target "ape"...

#

# Target:  ape:/

#

# BUNDLE                B.11.00        Patch Bundle

BUNDLE.PHCO_23651     1.0            fsck_vxfs(1M) cumulative patch

BUNDLE.PHKL_28496     1.0            SCSI IO Subsystem Cumulative Patch

BUNDLE.PHKL_27980     1.0            VxFS 3.1 cumulative patch: CR_EIEM

BUNDLE.PHKL_22840     1.0            IDS/9000; syscalls related to file/socket

BUNDLE.PHCO_28505     1.0            user/group(add/mod/del)(1M) cumulative patch

BUNDLE.PHKL_28150     1.0            LVM Cumulative Patch w/Performance Upgrades

BUNDLE.PHNE_28538     1.0            cumulative ARPA Transport patch

BUNDLE.PHNE_28143     1.0            LAN product cumulative patch

BUNDLE.PHNE_27902     1.0            Cumulative STREAMS Patch

BUNDLE.PHKL_29434     1.0            POSIX AIO;getdirentries;MVFS;rcp;mmap/IDS;

BUNDLE.PHKL_28766     1.0            Probe,IDDS,PM,VM,PA-8700,AIO,T600,FS,PDC,CLK

BUNDLE.PHKL_28004     1.0            Fibre Channel Mass Storage Driver Patch

BUNDLE.PHKL_27729     1.0            ioscan -u incorrect display (kernel patch).

BUNDLE.PHKL_24187     1.0            ioscan performance gain for SCSI Subsystem

BUNDLE.PHKL_24165     1.0            Kernel Patch For "ioscan -k" Performance

BUNDLE.PHKL_23409     1.0            NFS, Large Data Space, kernel memory leak

BUNDLE.PHKL_20016     1.0            2nd CPU not recognized in G70/H70/I70

BUNDLE.PHKL_18543     1.0            PM/VM/UFS/async/scsi/io/DMAPI/JFS/perf patch

BUNDLE.PHCO_27818     1.0            ioscan(1M) cumulative patch

BUNDLE.PHCO_27375     1.0            cumulative SAM/ObAM patch

- 软件版本为1.2(1a)的思科MDS 9216。

vatican# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Module               DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:57:5e:c0 to 20:10:00:0c:30:57:5e:c0

2    1.2(1a)      0.2     20:41:00:0c:30:57:5e:c0 to 20:48:00:0c:30:57:5e:c0

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-00 to 00-0b-be-f8-7f-04  JAB070804Q3

2    00-05-30-00-a8-56 to 00-05-30-00-a8-62  JAB070205AM

* this terminal session

vatican# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 963108 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

vatican uptime is 1 days 6 hours 17 minute(s) 25 second(s)

Last reset at 955065 usecs after Wed Sep 10 08:13:50 2003

Reason: Reset Requested by CLI command reload

System version: 1.1(2)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

本文档中使用的Cisco MDS 9000是指MDS 9000系列(MDS 9506、MDS 9509、MDS 9216)中的任何光纤通道(FC)交换机产品。 思科入侵防御系统(IPS)刀片是指IP存储服务模块。有关文件规则的更多信息请参见“ Cisco技术提示规则”。

背景信息

思科入侵防御系统(IPS)模块提供IP主机对光纤通道(FC)存储设备的访问。IPS模块是DS-X9308-SMIP。它提供透明SCSI路由。使用iSCSI协议的IP主机可以透明地访问FC网络上的iSCSI目标IP主机通过TCP/IP连接将封装在iSCSI协议数据单元(PDU)中的SCSI命令发送到MDS 9000 IPS端口。在IPS模块上，连接以GE接口的形式提供，这些接口已进行了适当配置。IPS模块使您创建虚拟iSCSI目标并且映射他们到在FC SAN上可用的物理FC目标。它将FC目标呈现给IP主机，就像物理目标连接到IP网络一样。

需要通过IPS模块访问存储的每台iSCSI主机都需要安装兼容的iSCSI驱动程序。借助iSCSI协议，iSCSI驱动程序允许iSCSI主机通过IP网络传输SCSI请求和响应。从主机操作系统的角度， iSCSI驱动看来是SCSI运输驱动程序，与主机中一条外围通道的FC驱动程序相似。从存储设备的角度，每台IP主机出现为一台FC主机。将SCSI从IP主机路由到FC存储设备包括以下主要操作：

- 在主机和IPS模块之间通过IP网络传输iSCSI请求和响应

- 在IP网络上的主机和FC存储设备之间路由SCSI请求和响应（将iSCSI转换为FCP，将FCP转换为iSCSI）。 此运输路线由IPS模块执行。

- 在IPS模块和FC存储设备之间传输FCP请求或响应

默认情况下，IPS模块不将FC目标导入iSCSI。在IPS模块使FC目标可用于iSCSI启动器之前，必须配置动态或静态映射。当两个都被配置后，静态被映射的FC目标有一个配置的名称。本文档提供静态映射示例。使用动态映射时，每次iSCSI主机连接到IPS模块时，都会创建一个新的FC N端口，为此N端口分配的nWWN和pWWN可能不同。请使用静态映射方法，如果您需要iSCSI主机每次获得同样nWWN和pWWN，它接到IPS模块。静态映射可用于IPS模块，以访问智能FC存储阵列，这些阵列具有基于启动器的pWWN或nWWN的访问控制和逻辑单元号(LUN)映射和掩码配置。

您可以通过创建特定的IPS端口列表来控制对每个静态映射的iSCSI目标的访问，并创建允许访问该目标的iSCSI启动器节点名称列表。FC基于分区的访问控制和基于ISCSI的访问控制是访问控制可以为iSCSI提供的二个机制。可以同时使用两个方法。在此配置中，允许特定VSAN使用默认分区。IPS模块使用基于iSCSI节点名称的访问控制列表和基于FC分区的访问控制列表，以在iSCSI发现和iSCSI会话创建期间实施访问控制。

- iSCSI发现：当iSCSI主机创建一个iSCSI发现会话并询问所有iSCSI目标时， IPS模块返回iSCSI目标列表此iSCSI主机允许基于接入控制策略的接入。

- iSCSI会话创建：当IP主机启动iSCSI会话时， IPS模块验证指定的iSCSI目标(在会议登录请求)是否静态映射到目标，如果是，验证IP主机的iSCSI节点名是否允许访问目标。如果IP主机没有权限，其登录被拒绝。

然后，IPS模块为此IP主机创建FC虚拟N端口（N端口可能已存在），并对IP主机访问的FC目标pWWN的FCID执行FC名称服务器查询。它使用IP主机虚拟N端口的pwwn作为名称服务器查询的请求方。因此，名称服务器执行的一次强制的pwwn区域查询并且回应查询。如果名称服务器返回FCID，则接受iSCSI会话。否则，登录请求被拒绝。

配置

在本节中，您将获得配置MDS 9216和Cisco iSCSI Driver for Linux的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用《Cisco MDS 9000系列命令参考》和《Cisco MDS 9000系列软件配置指南》。

网络图

本文档使用此图中所示的网络设置：

配置

本文档使用此处所示的配置：

- Ape(HP 9000/800 A500 HP-UX 11.00)

- 梵蒂冈(MDS 9216)

Ape(HP 9000/800 A500 HP-UX 11.00)

On the HP-UX host only the file /etc/iscsi.conf has to be modified:

[/]# cat /etc/iscsi.conf

# iSCSI configuration file - see iscsi.conf(4)

# DiscoveryAddress Settings

# -------------------------

# Add "DiscoveryAddress=xxx" entries for each iSCSI router instance.

# The driver attempts to discover iSCSI targets at that address

# and make as many targets as possible available for use.

# 'xxx' can be an IP address or a hostname.  A TCP port number can be

# specified by appending a colon and the port number to the address.

# All entries have to start in column one and must not contain any

# whitespace.

#

# Example:

#

# DiscoveryAddress=scsirouter1

DiscoveryAddress=10.48.69.242

!--- Configure the IP address of the GE interface that acceps iSCSI request from your host.

# The DiscoveryAddress Settings can take following entry.

#

# 1) Authentication Settings

# 2) ConnectionTimeout Settings

!--- Other required driver parameters could be changed in the iscsi.conf file.

......

[/]# cat /etc/iscsi.bindings

# iSCSI bindings, file format version 1.0.

# NOTE: this file is automatically maintained by the iSCSI daemon.

# You do not need to edit this file under most circumstances.

# If iSCSI targets in this file have been permanently deleted, you

# may wish to delete the bindings for the deleted targets.

#

# Format:

# bus   target  iSCSI

# id    id      TargetName

#

[...]

0       10      seagate

0       11      spa-vt

!--- The iSCSI driver discovery daemon process looks up each discovered !--- target in the /etc/iscsi.bindings file. If an entry exists in the file for the target, !--- the corresponding SCSI target ID is assigned to the target. If no entry !--- exists for the target, the smallest available SCSI target ID is assigned !--- and an entry is written to the /etc/iscsi.bindings file for this target.

!--- Note that the /etc/iscsi.bindings file permanently contains entries !--- for all iSCSI targets ever logged into from this host. If a target is !--- no longer available to a host, you can manually edit the file and remove !--- entries so that the obsolete target no longer consumes a SCSI target ID. !--- If you know the iSCSI target name of a target in advance, and you want !--- it to be assigned a particular SCSI target ID, you can add an entry !--- manually. You must stop the iSCSI driver before editing the !--- /etc/iscsi.bindings file. The maximum number of targets is 14.

!--- Enter [/]#/sbin/init.d/iscsi start to manually start the iSCSI driver.

!--- Enter [/]#/sbin/init.d/iscsi stop to manually stop the iSCSI driver.

梵蒂冈（思科MDS 9216）

!--- If you are starting from the factory default configuration, you !--- need to setup the IP address and mask of the management interface. !--- This would normally be done during the initial setup

.

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!--- In this configuration example, all the iSCSI targets are in a single vsan

.

vsan database

vsan 1016

vsan 1016 interface fc1/3

vsan 1016 interface fc1/7

!--- These are the boot variables.

boot system bootflash:/s111a

boot kickstart bootflash:/k111a

# Simple IP configuration

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

!--- Declare that the iSCSI initiator with the IP address of the host.

# It belongs to the vsan of our choice

iscsi authentication none

iscsi initiator ip-address 10.48.69.238

vsan 1016

!--- Define the first virtual target, it is a JBOD. Identify the target !--- by its pWWN, advertise it on a GE interface, and allow access to the initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:20:37:67:f7:a2

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- The second target is a Clariion disk array. Since the maximum LUN number that you !--- can have under HP-UX without additional software is 7, define a mapping from FC LUN numbers !--- to the iSCSI LUN numbers you are going to present to the host.

iscsi virtual-target name spa-vt

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0020 iscsi-lun 0003

pWWN 50:06:01:60:88:02:a8:2b fc-lun 0021 iscsi-lun 0004

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.238 permit

!--- Permit access to the targets on the FC level. Create a simple zone configuration to do this. !--- Alternatively, you could have simply set the default zoning policy in vsan 1016 to permit.

zone name jbod vsan 1016

member pwwn 21:00:00:20:37:67:f7:a2

member symbolic-nodename 10.48.69.238

zone name spa vsan 1016

member pwwn 50:06:01:60:88:02:a8:2b

member symbolic-nodename 10.48.69.238

zoneset name iscsidoc vsan 1016

member jbod

member spa

zoneset  activate name iscsidoc vsan 1016

!--- Set the IP address and mask of the GE interface and enable it.

interface GigabitEthernet2/1

ip address 10.48.69.242 255.255.255.192

iscsi authentication none

no shutdown

# Lastly we bring up the iSCSI interface up

interface iscsi2/1

no shutdown

验证

本部分提供的信息可用于确认配置工作正常，并排除故障，以防您发现问题。

命令查找工具(仅限注册的客户)支持某些show命令，这允许您查看对show命令输出的分析。

HP-UX主机命令

- netstat-n或lsof — 验证TCP连接。

- iscsi-ls — 显示当前可用的设备。

- dmesg — 收集诊断消息。

MDS/IPS-8命令

- show zone — 显示区域信息。

- show flogi database — 显示FLOGI服务器信息。

- show fcns database — 显示特定VSAN的名称服务器信息。

- show vsan membership — 显示不同VSAN的接口信息。

- show iscsi — 显示各种iSCSI信息。

- show ips — 显示有关IP服务的各种信息。

- show scsi-target — 显示特定VSAN的SCSI设备（用于将FC-LUN映射到iSCSI-LUN）。

- show interface — 显示有关各种接口的信息。

- show ip route -显示Ip route信息。

故障排除

本部分提供的信息可用于对配置进行故障排除。

以下是与此配置相关的故障排除信息：

- 从磁带(HP 9000/800 A500 HP-UX 11.00)显示

- 来自梵蒂冈的显示器(MDS 9216)

- 交换矩阵管理器和设备管理器显示

Ape(HP 9000/800 A500 HP-UX 11.00)

# /sbin/init.d/iscsi stop

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsid to terminate .....

Waiting for iscsi_[tr]x_threads to terminate .....

[/]# /sbin/init.d/iscsi start

Number of indices in scsi_isc table used by System: 5

Index used by iSCSI controller: 255

Number of free indices: 251

[/]# netstat -n | grep '10.48.69.242'

tcp        0      0  10.48.69.238.49501     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49500     10.48.69.242.3260       ESTABLISHED

tcp        0      0  10.48.69.238.49499     10.48.69.242.3260       ESTABLISHED

!--- If you have lsof, you can also try the following:

[/]# lsof -i @10.48.69.242

COMMAND  PID USER   FD   TYPE     DEVICE SIZE/OFF NODE NAME

iscsid  2836 root    1u  inet 0x41aa9268   0t1300  TCP ape.cisco.com:49499->10.48.69.242:3260 (ESTABLISHED)

!--- Note that ioscan does not report iSCSI devices. To see the list

!--- of available iSCSI devices from the host, issue the iscsi-ls command.

[/]# iscsi-ls -l

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     0        = DISK  c255t10d0  'SEAGATE  ST318203FC      0004'

BLOCKS : 35566479  BLOCKSIZE : 512 CAPACITY : 17366.00MB

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

LUN     4        = DISK  c255t11d4  'DGC      RAID 1          0632'

BLOCKS : 6291419  BLOCKSIZE : 512 CAPACITY : 3071.00MB

LUN     3        = DISK  c255t11d3  'DGC      RAID 1          0632'

BLOCKS : 10485607  BLOCKSIZE : 512 CAPACITY : 5119.00MB

!--- To see detailed statistics for currently established iSCSI sessions, use this:

[/]# iscsi-ls -c

#############################################################

TARGET NAME      = seagate

TARGET ID        = 10

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49501 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

#############################################################

TARGET NAME      = spa-vt

TARGET ID        = 11

ADDRESS          = 10.48.69.242:3260,128

STATUS           = CONNECTED 10.48.69.238:49500 <-> 10.48.69.242:3260

9/19/2003 15:40:42

SESSION          = ISID 00023d000001 TSID 80

InitialR2T       = Yes

FirstBurstLength = 262144 Bytes

MaxBurstLength   = 16776192 Bytes

Header Digest    = 1

Data Digest      = 1

Login Timeout    = 15 Seconds

Auth Timeout     = 45 Seconds

Active Timeout   = 5 Seconds

Idle Timeout     = 60 Seconds

Ping Timeout     = 5 Seconds

!--- Here are some of the entries you can expect to find in the syslog:

[/]# dmesg

[...]

iSCSI: session 0x4179b000 target 11 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: session 0x41a64800 target 10 accepted the preferred value (None) DataDigest=CRC32C

iSCSI: Direct Access Device found at lun 3 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: Direct Access Device found at lun 0 on target 10

Vendor Id  : SEAGATE

Product Id : ST318203FC                 Product Rev: 0004

iSCSI: Direct Access Device found at lun 4 on target 11

Vendor Id  : DGC

Product Id : RAID 1                     Product Rev: 0632

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2,

senselen 18, sense key 06, ASC/ASCQ 29/00, task (0x40718b00) to (host 255 target 11 lun 3),

TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x3

iSCSI: iscsi_recv_cmd: task (0x40718b00) itt 9 to (host 255 target 11 lun 3), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

iSCSI: iscsi_recv_cmd: session (0x4179b000) recv_cmd(sc) (0x41844800), Cmd 0x25, status 0x2, senselen 18,

sense key 06, ASC/ASCQ 29/00, task (0x40718c00) to (host 255 target 11 lun 4), TargetAlias spa-vt

Sense 70000600 0000000a 00000000 29000000 0000

READ_CAPACITY result = 0x2 Target = 0xb LUN = 0x4

iSCSI: iscsi_recv_cmd: task (0x40718c00) itt 11 to (host 255 target 11 lun 4), Cmd 0x25,

U(Overflow/Underflow) underflow, received 0(task->rxdata), residual 8, expected 8

来自梵蒂冈的显示器(MDS 9216)

vatican# show zone status vsan 1016

VSAN: 1016 default-zone: deny distribute: active only Interop: Off

Full Zoning Database :

Zonesets:1  Zones:3 Aliases: 0

Active Zoning Database :

Name: iscsidoc  Zonesets:1  Zones:3

Status: Activation completed at Wed Sep 17 13:03:56 2003

vatican# show zone active vsan 1016

zone name jbod vsan 1016

* fcid 0x7902e8 [pwwn 21:00:00:20:37:67:f7:a2]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spa vsan 1016

* fcid 0x790104 [pwwn 50:06:01:60:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

zone name spb vsan 1016

* fcid 0x790105 [pwwn 50:06:01:68:88:02:a8:2b]

* fcid 0x790100 [symbolic-nodename 10.48.69.238]

vatican# show flogi database vsan 1016

---------------------------------------------------------------------------

INTERFACE  VSAN    FCID            PORT NAME               NODE NAME

---------------------------------------------------------------------------

fc1/3      1016  0x7902e8  21:00:00:20:37:67:f7:a2  20:00:00:20:37:67:f7:a2

fc1/7      1016  0x790104  50:06:01:60:88:02:a8:2b  50:06:01:60:11:02:a8:2b

fc1/11     1016  0x790105  50:06:01:68:88:02:a8:2b  50:06:01:60:11:02:a8:2b

iscsi2/1   1016  0x790100  20:03:00:0c:30:57:5e:c2  20:02:00:0c:30:57:5e:c2

Total number of flogi = 4.

vatican# show fcns database vsan 1016

VSAN 1016:

--------------------------------------------------------------------------

FCID        TYPE  PWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x790100    N     20:03:00:0c:30:57:5e:c2 (Cisco)         scsi-fcp:init isc..w

0x790104    N     50:06:01:60:88:02:a8:2b (Clariion)      scsi-fcp:target

0x790105    N     50:06:01:68:88:02:a8:2b (Clariion)      scsi-fcp:target

0x7902e8    NL    21:00:00:20:37:67:f7:a2 (Seagate)       scsi-fcp:target

Total number of entries = 4

--- FCID 0X790100 is the virtual N port(HBA) for the iSCSI host.

vatican# show fcns database detail vsan 1016

------------------------

VSAN:1016  FCID:0x790100

------------------------

port-wwn (vendor)     :20:03:00:0c:30:57:5e:c2 (Cisco)

node-wwn              :20:02:00:0c:30:57:5e:c2

class                 :2,3

node-ip-addr          :10.48.69.238

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

symbolic-port-name    :

symbolic-node-name    :10.48.69.238

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:41:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790104

------------------------

port-wwn (vendor)     :50:06:01:60:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:07:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x790105

------------------------

port-wwn (vendor)     :50:06:01:68:88:02:a8:2b (Clariion)

node-wwn              :50:06:01:60:11:02:a8:2b

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:0b:00:0c:30:57:5e:c0

hard-addr             :0x000000

------------------------

VSAN:1016  FCID:0x7902e8

------------------------

port-wwn (vendor)     :21:00:00:20:37:67:f7:a2 (Seagate)

node-wwn              :20:00:00:20:37:67:f7:a2

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :NL

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:03:00:0c:30:57:5e:c0

hard-addr             :0x000000

Total number of entries = 4

vatican# show iscsi initiator

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag: 0x80

VSAN ID 1016, FCID 0x790100

vatican# show iscsi initiator configured

iSCSI Node name is 10.48.69.238

Member of vsans: 1016

vatican# show iscsi initiator detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 3

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: spa-vt

Statistics:

PDU: Command: 10, Response: 10

Bytes: TX: 416, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49500

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

Target: seagate

Statistics:

PDU: Command: 4, Response: 4

Bytes: TX: 304, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.242:3260, Remote 10.48.69.238:49501

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 62 ms, Variance: 2

Advertized window: Current: 256 KB, Maximum: 256 KB, Scale: 3

Peer receive window: Current: 576 KB, Maximum: 576 KB, Scale: 4

Congestion window: Current: 4 KB

vatican# show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.238

iSCSI Initiator name: iqn.1987-05.com.cisco.01.a06c4e2b8b247cadceb8af1a8474da1e

iSCSI alias name: ape

Node WWN is 20:02:00:0c:30:57:5e:c2 (dynamic)

Member of vsans: 1016

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:57:5e:c2 (dynamic)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 1016, FCID 0x790100

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x790104 (S_ID of this session: 0x790100)

pWWN: 50:06:01:60:88:02:a8:2b, nWWN: 50:06:01:60:11:02:a8:2b

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: spa-vt

Negotiated parameters

RcvDataFieldSize 1024 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 10

Target FCID: 0x7902e8 (S_ID of this session: 0x790100)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 4

vatican# show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:20:37:67:f7:a2

=== The "*" means you have both discovery and target session. If there

is no "*" in front of the pWWN, it means you only have discovery session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0000, FC LUN: 0000

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

target: spa-vt

* Port WWN 50:06:01:60:88:02:a8:2b

Secondary PWWN 50:06:01:68:88:02:a8:2b

Configured node

No. of LU mapping: 2

iSCSI LUN: 0003, FC LUN: 0020

iSCSI LUN: 0004, FC LUN: 0021

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 1

initiator 10.48.69.238/32 is permitted

all initiator permit is disabled

vatican# show iscsi stats iscsi 2/1

iscsi2/1

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

50932 packets input, 60370640 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes, 2476 fragments

output 115926 packets, 112863536 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show ips arp interface gigabitethernet 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet    10.48.69.200        0     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.201        5     0202.3d30.45c9  ARPA  GigabitEthernet2/1

Internet    10.48.69.206        5     0202.3d30.45ce  ARPA  GigabitEthernet2/1

Internet    10.48.69.209        3     0202.3d30.45d1  ARPA  GigabitEthernet2/1

Internet    10.48.69.226        2     0060.08f6.bc1a  ARPA  GigabitEthernet2/1

Internet    10.48.69.229        4     0800.209e.edab  ARPA  GigabitEthernet2/1

Internet    10.48.69.231        1     0002.b3c1.7dab  ARPA  GigabitEthernet2/1

Internet    10.48.69.233        0     0010.4200.7d5b  ARPA  GigabitEthernet2/1

Internet    10.48.69.238        0     0030.6e1b.6f51  ARPA  GigabitEthernet2/1

Internet    10.48.69.239       10     0030.6e1c.a00b  ARPA  GigabitEthernet2/1

Internet    10.48.69.241        0     000b.cdaf.b4c3  ARPA  GigabitEthernet2/1

Internet    10.48.69.248        4     0202.3d30.45f8  ARPA  GigabitEthernet2/1

Internet    10.48.69.252        1     0202.3d30.45fc  ARPA  GigabitEthernet2/1

Internet      10.10.2.28        7     0202.3d0a.021c  ARPA  GigabitEthernet2/1

vatican# show ips stats tcp interface gigabitethernet 2/1 detail

TCP Statistics for port GigabitEthernet2/1

TCP send stats

261205 segments, 117757220 bytes

140632 data, 51907 ack only packets

2655 control (SYN/FIN/RST), 0 probes, 2639 window updates

63382 segments retransmitted, 90885612 bytes

63382 retransmitted while on ethernet send queue, 1 packets split

13327 delayed acks sent

TCP receive stats

249073 segments, 72669 data packets in sequence, 61525764 bytes in sequence

2335 predicted ack, 68605 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

4396 duplicate bytes, 205 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 2625 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

80504 acks, 117762158 ack bytes, 0 ack toomuch, 96274 duplicate acks

0 ack packets left of snd_una, 7 non-4 byte aligned packets

54199 window updates, 0 window probe

6343 pcb hash miss, 709 no port, 6 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 2718 accepts, 2718 established

2716 closed, 15 drops, 0 conn drops

3 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

37062 segments timed, 41787 rtt updated

817 retransmit timeout, 1 persist timeout

22654 keepalive timeout, 22643 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

2720 entries, 2718 connections completed, 0 entries timed out

0 dropped due to overflow, 2 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 2 duplicate SYN, 183 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local  Address        Remote Address        State      Send-Q   Recv-Q

10.48.69.242:3260     10.48.69.238:49499    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49500    ESTABLISH  0        0

10.48.69.242:3260     10.48.69.238:49501    ESTABLISH  0        0

0.0.0.0:3260          0.0.0.0:0             LISTEN     0        0

vatican# discover scsi-target local

discovery started

vatican# show scsi-target devices vsan 1016

--------------------------------------------------------------------------------

VSAN    FCID        PWWN                      VENDOR    MODEL             REV

--------------------------------------------------------------------------------

1016    0x790104    50:06:01:60:88:02:a8:2b   DGC       RAID 0            0632

1016    0x7902e8    21:00:00:20:37:67:f7:a2   SEAGATE   ST318203FC        0004

vatican# show scsi-target lun vsan 1016

- RAID from DGC (Rev 0632)

FCID is 0x790104 in VSAN 1016, PWWN is 50:06:01:60:88:02:a8:2b

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

da:05:b6:a9:b6:9d:7b:00

C:1 A:0 T:0 00:00:00:00

0x1    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

6a:66:0d:74:cb:33:88:6c

C:1 A:0 T:0 00:01:00:00

0x2    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ec:81:5b:a2:c4:43:0d:8a

C:1 A:0 T:0 00:02:00:00

0x3    2147      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

e0:47:b3:be:3b:00:e0:d5

C:1 A:0 T:0 00:03:00:00

0x4    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

00:51:5b:7f:3d:9a:7b:ce

C:1 A:0 T:0 00:04:00:00

0x5    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ab:b1:ae:80:59:c0:fc:f0

C:1 A:0 T:0 00:05:00:00

0x6    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ad:91:58:af:d2:fd:c7:47

C:1 A:0 T:0 00:06:00:00

0x7    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

b1:ef:e7:6c:44:5c:16:97

C:1 A:0 T:0 00:07:00:00

0x8    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

84:4f:09:60:30:1e:fc:50

C:1 A:0 T:0 00:08:00:00

0x9    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

aa:6d:e2:0e:ce:7a:cc:21

C:1 A:0 T:0 00:09:00:00

0xa    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

5b:66:67:89:6c:f2:d1:56

C:1 A:0 T:0 00:0a:00:00

0xb    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a9:32:bd:04:4a:bb:3d:9b

C:1 A:0 T:0 00:0b:00:00

0xc    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

cd:d9:96:f7:57:3f:07:0c

C:1 A:0 T:0 00:0c:00:00

0xd    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

0c:e5:ba:39:68:ca:d6:f0

C:1 A:0 T:0 00:0d:00:00

0xe    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

60:6e:ee:76:98:fc:ab:97

C:1 A:0 T:0 00:0e:00:00

0xf    1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

8b:58:80:7b:12:fb:6b:12

C:1 A:0 T:0 00:0f:00:00

0x10   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

a1:2f:6d:b0:c3:d6:c2:46

C:1 A:0 T:0 00:10:00:00

0x11   1074      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

2c:48:c4:74:25:4b:26:dd

C:1 A:0 T:0 00:11:00:00

0x20   5369      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

ba:18:6a:40:22:40:94:75

C:1 A:0 T:0 00:20:00:00

0x21   3221      Online  f60004202091     C:1 A:0 T:3 60:06:01:60:88:02:a8:2b

74:d2:42:9e:31:8d:ff:86

C:1 A:0 T:0 00:21:00:00

- ST318203FC from SEAGATE (Rev 0004)

FCID is 0x7902e8 in VSAN 1016, PWWN is 21:00:00:20:37:67:f7:a2

------------------------------------------------------------------------------

LUN    Capacity  Status  Serial Number    Device-Id

(MB)

------------------------------------------------------------------------------

0x0    18210     Online  LRE8091500007039 C:1 A:0 T:3 20:00:00:20:37:67:f7:a2

vatican# show interface iscsi 2/1

iscsi2/1 is up

Hardware is GigabitEthernet

Port WWN is 20:41:00:0c:30:57:5e:c0

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 0, Number of TCP connection: 0

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

Maximum allowed bandwidth is 500000 kbps

Minimum available bandwidth is 500000 kbps

Estimated round trip time is 10000 usec

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 50920 packets, 60370032 bytes

Command 3659 pdus, Data-out 41069 pdus, 56533832 bytes fragments 2476

Output 115914 packets, 112862928 bytes

Response 3374 pdus (with sense 206), R2T 1897 pdus

Data-in 103999 pdus, 106404584 bytes

vatican# show interface gigabitethernet 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.a85a

Internet address is 10.48.69.242/26

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

iSCSI authentication: NONE

5 minutes input rate 440 bits/sec, 55 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

850346 packets input, 127958119 bytes

6488 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

289960 packets output, 201600774 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

vatican# show ip route

Codes: C - connected, S - static

Default gateway is 10.48.69.129

C 10.48.69.192/26 is directly connected, gigabitethernet2-1

C 10.48.69.128/26 is directly connected, mgmt0

交换矩阵管理器和设备管理器显示

本节提供MDS Fabric Manager 1.2(1a)和Device Manager 1.2(1a)的屏幕截图。

交换矩阵管理器的拓扑图

设备管理器

在设备管理器中选择FC > LUN以显示LUN的pWWN、LUN ID和容量。

在“设备管理器”中选择“IP”>“ — iSCSI”以显示iSCSI会话。