目录

简介

开始使用前
规则

先决条件

使用的组件

背景理论

配置

网络图

配置

验证

故障排除

故障排除步骤

交换矩阵管理器和设备管理器显示

IBM Shark定义

相关信息

简介

Cisco的iSCSI驱动，在服务器上位于，是iSCSI解决方法的关键组件。这些iSCSI驱动程序会拦截SCSI命令，将其封装到IP数据包中，然后将其重定向到Cisco SN 5420、Cisco SN 5428-2或Cisco MDS/IPS-8。本文档提供Solaris iSCSI主机到MDS的示例配置/IPS-8。

开始使用前

规则

本文档中使用的Cisco MDS 9000是指MDS 9000系列(MDS 9506、MDS 9509、MDS 9216)中的任何光纤通道(FC)交换机产品。

IPS刀片是指IP存储服务模块。有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

安装与Windows Server 2003版本兼容的iSCSI驱动程序。最新版本的驱动程序可在Cisco.com上的Cisco iSCSI Driver for Windows Server 2003(仅限注册客户)页面找到。README.txt文件包括在驱动程序zip(tar)文件中。README包含关于许可证协议的信息、驱动程续安装和配置说明以及驱动体系结构的技术概要。

用于Microsoft Windows 2003的思科iSCSI驱动程序需要Windows Server 2003企业版或标准版或Web版。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- 装有Windows Server 2003标准版的主机

- 用于Windows Server 2003的Cisco iSCSI驱动程序3.1.2。iSCSI驱动程序版本可在iSCSI配置窗口左下角看到。

- 带软件版本1.2(1a)的思科MDS 9216

canterbury# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Services Module      DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.2(1a)      1.0     20:01:00:0c:30:6c:24:40 to 20:10:00:0c:30:6c:24:40

2    1.2(1a)      0.3     20:41:00:0c:30:6c:24:40 to 20:48:00:0c:30:6c:24:40

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-08 to 00-0b-be-f8-7f-0c  JAB070804QK

2    00-05-30-00-ad-e2 to 00-05-30-00-ad-ee  JAB070806SB

* this terminal session

Canterbury#show ver

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.8

loader:    version 1.1(2)

kickstart: version 1.2(1a)

system:    version 1.2(1a)

BIOS compile time:       08/07/03

kickstart image file is: bootflash:/k121a

kickstart compile time:  9/1/2003 17:00:00

system image file is:    bootflash:/s121a

system compile time:     9/1/2003 17:00:00

Hardware

RAM 960080 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

Canterbury uptime is 1 days 12 hours 3 minute(s) 29 second(s)

Last reset at 39578 usecs after Mon Oct 13 07:32:38 2003

Reason: Reset Requested by CLI command reload

System version: 1.2(1a)

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

背景理论

IP存储模块提供对FC存储设备的IP主机访问。IPS模块是DS-X9308-SMIP。它提供透明SCSI路由。使用iSCSI协议的IP主机可以透明地访问FC网络上的SCSI(FCP)目标IP主机通过TCP/IP连接将封装在iSCSI协议数据单元(PDU)中的SCSI命令发送到MDS 9000 IPS端口。在IPS模块上，以正确配置的千兆以太网(GE)接口形式提供连接。IPS模块使您创建虚拟iSCSI目标并且映射他们到在FC SAN上可用的物理FC目标。它将FC目标呈现给IP主机，就像物理目标本地连接到IP网络一样。

需要通过IPS模块访问存储的每台iSCSI主机都需要安装兼容的iSCSI驱动程序。使用iSCSI协议， iSCSI驱动程序允许iSCSI主机通过IP网络传输SCSI请求和响应。从主机操作系统的角度， iSCSI驱动看来是SCSI运输驱动程序，与主机中一条外围通道的FC驱动程序相似。从存储设备的角度，每台IP主机出现为一台FC主机。

将SCSI从IP主机路由到FC存储设备包括以下主要操作：

- 在主机和IPS模块之间通过IP网络传输iSCSI请求和响应。

- 在IP网络上的主机和FC存储设备之间路由SCSI请求和响应（将iSCSI转换为FCP，反之亦然）。 此运输路线由IPS模块执行。

- 在IPS模块和FC存储设备之间传输FCP请求或响应。

默认情况下IP存储模块不导入FC目标到iSCSI。在IPS模块使FC目标可用于iSCSI启动器之前，必须配置动态或静态映射。当两个都被配置后，静态被映射的FC目标有一个配置的名称。在此配置中，您将看到静态映射的示例。使用动态映射时，每次iSCSI主机连接到IPS模块时都会创建新的FC N端口，为此N端口分配的nWWN和pWWN可能不同。请使用静态映射方法，如果您需要iSCSI主机每次获得同样nWWN和pWWN，它接到IPS模块。静态映射可用于IPS模块，以访问具有基于启动器的pWWN和/或nWWN的访问控制和LUN映射/掩码配置的智能FC存储阵列。

您可以通过指定将通告每个静态映射的iSCSI目标的IPS端口列表并指定允许访问该目标的iSCSI启动器节点名称列表来控制对每个静态映射的iSCSI目标的访问。FC基于分区的访问控制和基于ISCSI的访问控制是访问控制可以为iSCSI提供的二个机制。可以同时使用两个方法。在此配置中，已允许特定VSAN使用默认分区。IPS模块使用基于iSCSI节点名称的访问控制列表和基于FC分区的访问控制列表，以在iSCSI发现和iSCSI会话创建期间实施访问控制。

- iSCSI发现：当iSCSI主机创建一个iSCSI发现会话并询问所有iSCSI目标时， IPS模块返回iSCSI目标列表此iSCSI主机允许基于接入控制策略的接入。

- iSCSI会话创建：当IP主机启动iSCSI会话时， IPS模块验证指定的iSCSI目标(在会议登录请求)是否静态映射到目标，如果是，验证IP主机的iSCSI节点名是否允许访问目标。如果IP主机没有权限，其登录被拒绝。

IP存储模块为此IP主机创建FC虚拟N端口（N端口可能已存在），并对IP主机正在访问的FC目标pWWN的FCID执行FC名称服务器查询。它使用IP主机虚拟N端口的pwwn作为名称服务器查询的请求方。因此，名称服务器执行的一次强制的pwwn区域查询并且回应查询。如果名称服务器返回FCID，则接受iSCSI会话。否则，登录请求被拒绝。

配置

在本节中，您将获得配置MDS 9216和Cisco iSCSI Driver for Solaris的信息。

注意：要查找有关本文档中使用的命令的其他信息，请使用《Cisco MDS 9000系列命令参考》和《Cisco MDS 9000系列软件配置指南》。

网络图

本文档使用下图所示的网络设置。

配置

本文档使用如下所示的配置。

- Vuk(Windows Server 2003)

- 坎特伯雷(MDS 9216)

Vuk(Windows Server 2003)

初始配置任务包括以下操作：

- 设置驱动程序将访问的MDS 9000系列系统的iSCS目标IP地址。

- 设置iSCSI目标身份验证用户名和密码。

- 保存iSCSI目标配置并设置驱动程序的启动类型。

要配置驱动程序，请执行以下步骤：

1. 作为有管理员权限的一个用户登录到计算机。

2. 单击Start，指向Settings，单击Control Panel，然后双击iSCSI Config。
iSCSI配置程序会显示Win 2000/XP/2003的Cisco iSCSI配置对话框。

3. 在Cisco iSCSI Config for Win 2000对话框中，配置MDS 9000系列系统中SCSI路由实例的IP地址，如下所示：

- 在目标主机名/IP地址文本框中，键入MDS 9000系列系统中SCSI路由实例的IP地址。在本配置示例中，IP地址为10.48.69.222。

- 单击 Add。IP地址在Target Host Names/IP Addresses文本框下的显示区被显示。

4. 点击保存并退出。

5. 重新启动计算机。

坎特伯雷（思科MDS 9216）

vsan database

vsan 222 name ozden

!---  VSAN 222 has been used for iSCSI targets.

vsan database

vsan 222 interface fc1/5

!--- Seagate is connected to fc1/5.

vsan 222 interface fc1/6

vsan 222 interface fc1/7

!--- IBM Shark is connected to fc1/7.

vsan 222 interface fc1/8

!--- System boot variables.

boot system bootflash:/s121a

boot kickstart bootflash:/k121a

!--- IP configurations.

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

ip routing

iscsi authentication none

!--- Identify the iSCSI initiator based on the IP address of your host. !--- A static virtual N port is defined for each NIC or network interface. !--- LUN-mapping and LUN-masking on the storage device has to be done with the static pWWN !--- that you have defined for the initiator. Refer to the Enterprise Storage Server Specialist !--- (ESSS) screen capture in the Fabric Manager and Device Manager Displays section !--- for more information.

iscsi initiator ip-address 10.48.69.241

static nWWN 22:01:00:0c:30:6c:24:42

static pWWN 21:03:00:0c:30:6c:24:42

!--- Targets via Vsan 222 are accesible by iSCSI initiators.

vsan 222

!--- A virtual target has been defined for the JBOD. The target has !--- been identified by it's pWWN. The target has been advertised via !--- GE interface 2/5. Host 10.48.69.241 is the only initiator.

iscsi virtual-target name seagate

pWWN 21:00:00:04:cf:db:3e:a7 fc-lun 0x0000 iscsi-lun 0x0000

advertise interface GigabitEthernet2/5

initiator ip address 10.48.69.241 permit

!--- A virtual target has been defined for the IBM Shark. The target has been identified by the pWWN. !--- Do not specify the LUN if you wish to map the entire FC target to an iSCSI target. !--- In the virtual-target shark-lun, LUN-mapping options have been used. FC-LUN 0x0000 has been !--- mapped to iSCSI-LUN 0x0000. It is also possible to map FC-LUN 0x0000 to a different iSCSI-LUN number.

iscsi virtual-target name shark-lun

pWWN 50:05:07:63:00:c4:94:4c fc-lun 0x0000 iscsi-lun 0x0000

pWWN 50:05:07:63:00:c4:94:4c fc-lun 0x0001 iscsi-lun 0x0001

advertise interface GigabitEthernet2/5

initiator ip address 10.48.69.241 permit

line console

exec-timeout 0

line vty

exec-timeout 0

ntp server 10.48.64.100

switchname canterbury

..

zone default-zone permit vsan 1

!--- Default zone policy is set to permit for VSAN 222.

zone default-zone permit vsan 222

interface GigabitEthernet2/5

ip address 10.48.69.222 255.255.255.192

no shutdown

...

interface fc1/5

no shutdown

interface fc1/6

interface fc1/7

no shutdown

...

interface mgmt0

ip address 10.48.69.156 255.255.255.192

!---The iSCSI interface has to be set no shut.

interface iscsi2/5

no shutdown

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

- show zone status — 显示区域信息。

- show fcns database vsan 222 — 显示特定VSAN的名称服务器信息。

- show flogi database vsan 222 — 显示特定VSAN的FLOGI服务器信息。

- show vsan membership — 显示不同VSAN的接口信息。

- show iscsi initiator detail — 显示iSCSI启动器信息。

- show iscsi initiator iscsi-session detail — 显示iSCSI启动器会话的详细信息。

- show iscsi initiator fcp-session detail — 显示iSCSI启动器FCP会话的详细信息。

- show ips stats tcp interface gigabitethernet 2/5 detail — 显示特定GE接口的TCP统计信息。

- show iscsi virtual-target configured — 显示已在MDS 9000上配置的iSCSI虚拟目标。

- show iscsi initiator configured — 显示已在MDS 9000上配置的iSCSI启动器。

- show ips arp interface gigabitethernet 2/5 — 显示特定GE接口的IPS arp信息。

- show scsi-target lun vsan 222 — 显示特定VSAN的SCSI设备（用于将FC-LUN映射到iSCSI-LUN）。

- show int iscsi 2/5 — 显示iSCSI接口。

- show iscsi stats iscsi 2/5 — 显示iSCSI统计信息。

- show int gigabitethernet 2/5 — 显示GE接口。

- show ip route — 显示IP路由信息。

故障排除

本部分提供的信息可用于对配置进行故障排除。

注意：要查找有关排除IP存储问题的其他信息，请使用《Cisco MDS 9000系列故障排除指南》。

故障排除步骤

下面提供与本配置有关的故障排除信息。

- 从Vuk(Windows Server 2003)显示

- 从Canterbury Cisco MDS 9216显示

从Vuk(Windows Server 2003)显示

在“Cisco iSCSI config(Cisco iSCSI配置)”窗口中，单击Status（状态）以检查主机是否已成功登录到iSCSI目标。在命令行上，发出netstat -an |find/i "established"查看10.48.69.222之间的ESTABLISHED TCP会话。

要查看新磁盘，请右键单击桌面上的“我的电脑”。双击“Computer Manager(计算机管理器)”。

在控制台树的“系统工具”下，单击“设备管理器”

要使驱动程序在Windows 2003 Server下正常运行，驱动程序需要创建伪磁盘驱动器。这将在磁盘管理MMC应用下显示为未知磁盘。用户可以忽略此项，因为它不会以任何方式影响系统的性能或功能。不能删除它。

要管理存储，请右键单击桌面上的“我的电脑”。双击“Computer Manager(计算机管理器)”。

在控制台树的“存储”下，单击“磁盘管理”。

来自坎特伯雷的显示器（思科MDS 9216）

canterbury#show vsan membership

vsan 1 interfaces:

fc1/3 fc1/10 fc1/12 fc1/13 fc1/14 fc1/16

vsan 222 interfaces:

fc1/5 fc1/6 fc1/7 fc1/8

vsan 4094(isolated_vsan) interfaces:

canterbury#show zone status

VSAN: 1 default-zone: permit distribute: active only Interop: 100

Full Zoning Database :

Zonesets:0 Zones:0 Aliases: 0

Active Zoning Database :

Database Not Available

Status:

VSAN: 222 default-zone: permit distribute: active only Interop: 100

Full Zoning Database :

Zonesets:0 Zones:0 Aliases: 0

Active Zoning Database :

Database Not Available

Status:

!--- VSAN 222 has been used for this configuration, default-zone behavior has been set to permit.

canterbury#show flogi database vsan 222

---------------------------------------------------------------------------

INTERFACE VSAN FCID PORT NAME NODE NAME

---------------------------------------------------------------------------

fc1/5 222 0x62011e 21:00:00:04:cf:db:3e:a7 20:00:00:04:cf:db:3e:a7

fc1/7 222 0x620003 50:05:07:63:00:c4:94:4c 50:05:07:63:00:c0:94:4c

iscsi2/5 222 0x620001 21:03:00:0c:30:6c:24:42 22:01:00:0c:30:6c:24:42

Total number of flogi = 3.

!--- FCID 0X620001 is the virtual N port(HBA) for the iSCSI host Vuk.

canterbury#show fcns database vsan 222

VSAN 222:

--------------------------------------------------------------------------

FCID TYPE PWWN (VENDOR) FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x620001 N 21:03:00:0c:30:6c:24:42 (Cisco) scsi-fcp:init isc..w

0x620003 N 50:05:07:63:00:c4:94:4c (IBM) scsi-fcp:target fc..

0x62011e NL 21:00:00:04:cf:db:3e:a7 (Seagate) scsi-fcp:target

Total number of entries = 3

canterbury#show fcns database detail vsan 222

------------------------

VSAN:222 FCID:0x620001

------------------------

port-wwn (vendor) :21:03:00:0c:30:6c:24:42 (Cisco)

node-wwn :22:01:00:0c:30:6c:24:42

class :2,3

node-ip-addr :10.48.69.241

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

!--- Virtual N port for host.

symbolic-port-name :

symbolic-node-name :10.48.69.241

port-type :N

port-ip-addr :0.0.0.0

fabric-port-wwn :20:51:00:0c:30:6c:24:40

hard-addr :0x000000

------------------------

VSAN:222 FCID:0x620003

------------------------

port-wwn (vendor) :50:05:07:63:00:c4:94:4c (IBM)

node-wwn :50:05:07:63:00:c0:94:4c

class :2,3

node-ip-addr :0.0.0.0

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target fcsb2-ch-cu fcsb2-cu-ch

symbolic-port-name :

symbolic-node-name :

port-type :N

port-ip-addr :0.0.0.0

fabric-port-wwn :20:07:00:0c:30:6c:24:40

hard-addr :0x000000

------------------------

VSAN:222 FCID:0x62011e

------------------------

port-wwn (vendor) :21:00:00:04:cf:db:3e:a7 (Seagate)

node-wwn :20:00:00:04:cf:db:3e:a7

class :3

node-ip-addr :0.0.0.0

ipa :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name :

symbolic-node-name :

port-type :NL

port-ip-addr :0.0.0.0

fabric-port-wwn :20:05:00:0c:30:6c:24:40

hard-addr :0x000000

Total number of entries = 3

canterbury#show iscsi session

Initiator 10.48.69.241

Initiator name iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

Session #1

Discovery session, ISID 00023d000023, Status active

Session #2

Target shark-lun

VSAN 222, ISID 00023d000024, Status active, no reservation

Session #3

Target seagate

VSAN 222, ISID 00023d000025, Status active, no reservation

canterbury#show iscsi initiator

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag: 0x84

VSAN ID 222, FCID 0x620001

canterbury#show iscsi initiator detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: seagate

Statistics:

PDU: Command: 16, Response: 16

Bytes: TX: 188, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1035

Path MTU: 1500 bytes

Retransmission timeout: 350 ms

Round trip time: Smoothed 165 ms, Variance: 46

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 9 KB

Target: shark-lun

Statistics:

PDU: Command: 2343, Response: 2343

Bytes: TX: 46363700, RX: 45494272

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1034

Path MTU: 1500 bytes

Retransmission timeout: 390 ms

Round trip time: Smoothed 136 ms, Variance: 65

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 11 KB

FCP Session details

Target FCID: 0x62011e (S_ID of this session: 0x620001)

pWWN: 21:00:00:04:cf:db:3e:a7, nWWN: 20:00:00:04:cf:db:3e:a7

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1404 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 16

Target FCID: 0x620003 (S_ID of this session: 0x620001)

pWWN: 50:05:07:63:00:c4:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-lun

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 2343

canterbury#show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: seagate

Statistics:

PDU: Command: 16, Response: 16

Bytes: TX: 188, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1035

Path MTU: 1500 bytes

Retransmission timeout: 350 ms

Round trip time: Smoothed 165 ms, Variance: 46

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 9 KB

Target: shark-lun

Statistics:

PDU: Command: 2343, Response: 2343

Bytes: TX: 46363700, RX: 45494272

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.241:1034

Path MTU: 1500 bytes

Retransmission timeout: 390 ms

Round trip time: Smoothed 136 ms, Variance: 65

Advertized window: Current: 125 KB, Maximum: 125 KB, Scale: 1

Peer receive window: Current: 118 KB, Maximum: 118 KB, Scale: 1

Congestion window: Current: 11 KB

canterbury#show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.241

iSCSI Initiator name: iqn.1987-05.com.cisco:02.9a74eb40e94d.vuk-win2003

iSCSI alias name: VUK-WIN2003

Node WWN is 22:01:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 222

Number of Virtual n_ports: 1

Virtual Port WWN is 21:03:00:0c:30:6c:24:42 (configured)

Interface iSCSI 2/5, Portal group tag is 0x84

VSAN ID 222, FCID 0x620001

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x62011e (S_ID of this session: 0x620001)

pWWN: 21:00:00:04:cf:db:3e:a7, nWWN: 20:00:00:04:cf:db:3e:a7

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: seagate

Negotiated parameters

RcvDataFieldSize 1404 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 16

Target FCID: 0x620003 (S_ID of this session: 0x620001)

pWWN: 50:05:07:63:00:c4:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-lun

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1404

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 2343

canterbury#show ips stats tcp interface gigabitethernet 2/5

TCP Statistics for port GigabitEthernet2/5

Connection Stats

0 active openings, 345 accepts

0 failed attempts, 0 reset received, 345 established

Segment stats

160524 received, 158647 sent, 1 retransmitted

0 bad segments received, 1 reset sent

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

10.48.69.222:3260 10.48.69.241:1026 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1034 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1035 ESTABLISH 0 0

0.0.0.0:3260 0.0.0.0:0 LISTEN 0 0

canterbury#show ips stats tcp interface gigabitethernet 2/5 detail

TCP Statistics for port GigabitEthernet2/5

TCP send stats

158647 segments, 132538432 bytes

113573 data, 44411 ack only packets

318 control (SYN/FIN/RST), 0 probes, 344 window updates

1 segments retransmitted, 48 bytes

1 retransmitted while on ethernet send queue, 0 packets split

29286 delayed acks sent

TCP receive stats

160524 segments, 102518 data packets in sequence, 125344708 bytes in sequence

0 predicted ack, 94889 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

0 duplicate bytes, 0 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

0 out-of-order bytes, 0 out-of-order packets

0 packet after window, 0 bytes after window

0 packets after close

58221 acks, 132539086 ack bytes, 0 ack toomuch, 6563 duplicate acks

0 ack packets left of snd_una, 0 non-4 byte aligned packets

37322 window updates, 0 window probe

865 pcb hash miss, 171 no port, 1 bad SYN, 0 paws drops

TCP Connection Stats

0 attempts, 345 accepts, 345 established

342 closed, 341 drops, 0 conn drops

0 drop in retransmit timeout, 10 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

26399 segments timed, 26398 rtt updated

1 retransmit timeout, 0 persist timeout

6702 keepalive timeout, 6692 keepalive probes

TCP SACK Stats

0 recovery episodes, 0 data packets, 0 data bytes

0 data packets retransmitted, 0 data bytes retransmitted

0 connections closed, 0 retransmit timeouts

TCP SYN Cache Stats

345 entries, 345 connections completed, 0 entries timed out

0 dropped due to overflow, 0 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 0 duplicate SYN, 2 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local Address Remote Address State Send-Q Recv-Q

10.48.69.222:3260 10.48.69.241:1026 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1034 ESTABLISH 0 0

10.48.69.222:3260 10.48.69.241:1035 ESTABLISH 0 0

0.0.0.0:3260 0.0.0.0:0 LISTEN 0 0

canterbury#show iscsi virtual-target configured

target: seagate

* Port WWN 21:00:00:04:cf:db:3e:a7

!--- The "*" means you have both discovery and target session. If there is no "*" in !--- front of the pWWN, it means either you only have discovery session or !--- you have no active session.

Configured node

No. of LU mapping: 1

iSCSI LUN: 0x0000, FC LUN: 0x0000

No. of advertised interface: 1

GigabitEthernet 2/5

No. of initiators permitted: 1

initiator 10.48.69.241/32 is permitted

all initiator permit is disabled

target: shark-lun

* Port WWN 50:05:07:63:00:c4:94:4c

Configured node

No. of LU mapping: 2

iSCSI LUN: 0x0000, FC LUN: 0x0000

iSCSI LUN: 0x0001, FC LUN: 0x0001

No. of advertised interface: 1

GigabitEthernet 2/5

No. of initiators permitted: 1

initiator 10.48.69.241/32 is permitted

all initiator permit is disabled

canterbury#show iscsi initiator configured

iSCSI Node name is 10.48.69.241

Member of vsans: 222

No. of PWWN: 1

Port WWN is 21:03:00:0c:30:6c:24:42

canterbury#show ips arp interface gigabitethernet 2/5

Protocol Address Age (min) Hardware Addr Type Interface

Internet 10.48.69.200 0 0008.e21e.c7bc ARPA GigabitEthernet2/5

Internet 10.48.69.202 4 0202.3d30.45ca ARPA GigabitEthernet2/5

Internet 10.48.69.206 4 0202.3d30.45ce ARPA GigabitEthernet2/5

Internet 10.48.69.226 10 0060.08f6.bc1a ARPA GigabitEthernet2/5

Internet 10.48.69.229 10 0800.209e.edab ARPA GigabitEthernet2/5

Internet 10.48.69.232 5 0003.4796.34c3 ARPA GigabitEthernet2/5

Internet 10.48.69.238 5 0030.6e1b.6f51 ARPA GigabitEthernet2/5

Internet 10.48.69.239 11 0030.6e1c.a00b ARPA GigabitEthernet2/5

Internet 10.48.69.241 4 000b.cdaf.b4c3 ARPA GigabitEthernet2/5

Internet 10.48.69.248 2 0202.3d30.45f8 ARPA GigabitEthernet2/5

Internet 10.10.2.28 5 0202.3d0a.021c ARPA GigabitEthernet2/5

canterbury#show scsi-target devices vsan 222

--------------------------------------------------------------------------------

VSAN FCID PWWN VENDOR MODEL REV

--------------------------------------------------------------------------------

222 0x62011e 21:00:00:04:cf:db:3e:a7 SEAGATE ST336753FC 0003

222 0x620003 50:05:07:63:00:c4:94:4c IBM 2105F20 .114

!--- All LUNs that have been exported by the IBM Shark are not shown in the display output.

canterbury#show scsi-target lun vsan 222

- ST336753FC from SEAGATE (Rev 0003)

FCID is 0x62011e in VSAN 222, PWWN is 21:00:00:04:cf:db:3e:a7

------------------------------------------------------------------------------

LUN Capacity Status Serial Number Device-Id

(MB)

------------------------------------------------------------------------------

0x0 36704 Online 3HX00Q2600007326 C:1 A:0 T:3 20:00:00:04:cf:db:3e:a7

- 2105F20 from IBM (Rev .114)

FCID is 0x620003 in VSAN 222, PWWN is 50:05:07:63:00:c4:94:4c

------------------------------------------------------------------------------

LUN Capacity Status Serial Number Device-Id

(MB)

------------------------------------------------------------------------------

0x5100 4000 Online 10022196 C:2 A:0 T:1 IBM 2105

0x5101 4000 Online 10122196 C:2 A:0 T:1 IBM 2105

....

0x5011 5000 Online 01122196 C:2 A:0 T:1 IBM 2105

0x5012 5000 Online 01222196 C:2 A:0 T:1 IBM 2105

0x5013 5000 Online 01322196 C:2 A:0 T:1 IBM 2105

0x5014 5000 Online 01422196 C:2 A:0 T:1 IBM 2105

0x5400 3000 Online 40022196 C:2 A:0 T:1 IBM 2105

0x5401 5000 Online 40122196 C:2 A:0 T:1 IBM 2105

0x5200 3000 Online 20022196 C:2 A:0 T:1 IBM 2105

0x5201 3000 Online 20122196 C:2 A:0 T:1 IBM 2105

0x5202 3000 Online 20222196 C:2 A:0 T:1 IBM 2105

0x5203 3000 Online 20322196 C:2 A:0 T:1 IBM 2105

0x5204 3000 Online 20422196 C:2 A:0 T:1 IBM 2105

0x5205 3000 Online 20522196 C:2 A:0 T:1 IBM 2105

0x5206 3000 Online 20622196 C:2 A:0 T:1 IBM 2105

0x5207 3000 Online 20722196 C:2 A:0 T:1 IBM 2105

0x5208 3000 Online 20822196 C:2 A:0 T:1 IBM 2105

0x5209 3000 Online 20922196 C:2 A:0 T:1 IBM 2105

.....

canterbury#show int iscsi 2/5

iscsi2/5 is up

Hardware is GigabitEthernet

Port WWN is 20:51:00:0c:30:6c:24:40

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 3, Number of TCP connection: 3

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is disabled

QOS code point is 0

Forwarding mode: pass-thru

TMF Queueing Mode : disabled

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 132567 packets, 125344708 bytes

Command 8637 pdus, Data-out 117005 pdus, 118916096 bytes

Output 113573 packets, 132538432 bytes

Response 8439 pdus (with sense 10), R2T 3913 pdus

Data-in 93902 pdus, 127070632 bytes

canterbury#show iscsi stats iscsi 2/5

iscsi2/5

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

132567 packets input, 125344708 bytes

Command 8637 pdus, Data-out 117005 pdus, 118916096 bytes, 0 fragments

output 113573 packets, 132538432 bytes

Response 8439 pdus (with sense 10), R2T 3913 pdus

Data-in 93902 pdus, 127070632 bytes

canterbury#show int gigabitethernet 2/5

GigabitEthernet2/5 is up

Hardware is GigabitEthernet, address is 0005.3000.adea

Internet address is 10.48.69.222/26

MTU 1500 bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

5 minutes input rate 224 bits/sec, 28 bytes/sec, 0 frames/sec

5 minutes output rate 80 bits/sec, 10 bytes/sec, 0 frames/sec

205453 packets input, 138346789 bytes

0 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

165673 packets output, 141485482 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury#show ip route

Codes: C - connected, S - static

Gateway of last resort is 10.48.69.129

C 10.48.69.192/26 is directly connected, GigabitEthernet2/5

C 10.48.69.128/26 is directly connected, mgmt0

canterbury#

交换矩阵管理器和设备管理器显示

本节提供MDS Fabric Manager 1.2(2)和Device Manager 1.2(2)的屏幕截图。

交换矩阵管理器的拓扑图

选择FC-LUN以显示设备管理器中的pWWN、LUN ID和LUN的容量。

选择FC-LUN以从设备管理器显示目标。

选择IP-iSCSI以显示“Device Manager（设备管理器）”中的iSCSI会话。

IBM Shark定义

本节提供企业存储服务器专家(ESS)的屏幕截图。

在ESS上定义了一台主机，该主机为启动器定义了静态WWPN 21:03:00:0c:30:6c:24:42。已为此主机分配了两个卷。

相关信息

- Cisco iSCSI软件下载（仅限注册客户）

- Windows 2000 系统的 iSCSI 驱动器常见问题

- Cisco Windows 2000 iSCSI驱动程序版本说明

- 用于 Windows 2000 的 iSCSI 驱动程序故障排除

- Cisco MDS 9000系列故障排除指南，版本1.2(1a)

- 技术支持和文档 - Cisco Systems