目录

简介

先决条件

要求

使用的组件

规则

背景理论

配置

网络图

配置

验证

故障排除

故障排除步骤

相关信息

简介

Cisco的iSCSI驱动器（驻留在服务器上）是iSCSI 解决方案的关键组件。这些iSCSI驱动程序会拦截SCSI命令，将其封装到IP数据包中，然后将其重定向到Cisco SN 5420、Cisco SN 5428-2或Cisco MDS/IPS-8。本文档提供了使用Microsoft Windows XP i的主机的示例配置SCSI到MDS/IPS-8。

先决条件

要求

在尝试此配置前，请保证您符合这些要求：

- 在MDS 9000上创建iSCSI配置之前，需要安装与运行Microsoft Windows XP的PC兼容的iSCSI驱动程序。适用于Windows 2000/XP/2003的Cisco iSCSI驱动程序的最新版本可在Cisco.com的Cisco iSCSI驱动程序(仅限注册客户)页中找到。文件名是Win2k的Cisco iSCSI驱动程序版本号，可在此页的表中找到。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 装有Microsoft Windows XP和Cisco iSCSI驱动程序3.1.2版的PC

- 软件版本为1.1.2的Cisco MDS 9216

canterbury# show module

Mod  Ports  Module-Type                     Model              Status

---  -----  ------------------------------- ------------------ ------------

1    16     1/2 Gbps FC/Supervisor          DS-X9216-K9-SUP    active *

2    8      IP Storage Module               DS-X9308-SMIP      ok

Mod  Sw           Hw      World-Wide-Name(s) (WWN)

---  -----------  ------  --------------------------------------------------

1    1.1(2)       1.0     20:01:00:0c:30:6c:24:40 to 20:10:00:0c:30:6c:24:40

2    1.1(2)       0.3     20:41:00:0c:30:6c:24:40 to 20:48:00:0c:30:6c:24:40

Mod  MAC-Address(es)                         Serial-Num

---  --------------------------------------  ----------

1    00-0b-be-f8-7f-08 to 00-0b-be-f8-7f-0c  JAB070804QK

2    00-05-30-00-ad-e2 to 00-05-30-00-ad-ee  JAB070806SB

* this terminal session

canterbury#

canterbury# show version

Cisco Storage Area Networking Operating System (SAN-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2003 by Cisco Systems, Inc. All rights reserved.

The copyright for certain works contained herein are owned by

Andiamo Systems, Inc. and/or other third parties and are used and

distributed under license.

Software

BIOS:      version 1.0.7

loader:    version 1.0(3a)

kickstart: version 1.1(2)

system:    version 1.1(2)

BIOS compile time:       03/20/03

kickstart image file is: bootflash:/k112

kickstart compile time:  7/13/2003 20:00:00

system image file is:    bootflash:/s112

system compile time:     7/13/2003 20:00:00

Hardware

RAM 963112 kB

bootflash: 500736 blocks (block size 512b)

slot0:          0 blocks (block size 512b)

canterbury uptime is 6 days 1 hours 11 minute(s) 5 second(s)

Last reset at 783455 usecs after Thu Aug 28 12:59:37 2003

Reason: Reset Requested by CLI command reload

System version: 1.1(2)

canterbury#

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

术语MDS 9000是指MDS 9000系列（MDS 9506、MDS 9509或MDS 9216）中的任何光纤通道(FC)交换机产品。IPS刀片是指IP存储服务模块。

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

背景理论

IP存储模块提供IP主机对光纤通道(FC)存储设备的访问。IP存储模块是DS-X9308-SMIP。它提供透明SCSI路由。使用iSCSI协议的IP主机可以透明地访问FC网络上的SCSI(FCP)目标。IP主机通过TCP/IP连接将封装在iSCSI协议数据单元(PDU)中的SCSI命令发送到MDS 9000 IPS端口。在IP存储模块上，以正确配置的千兆以太网(GE)接口形式提供连接。IP存储模块使您能够创建虚拟iSCSI目标，并将它们映射到FC SAN中可用的物理FC目标。它将FC目标呈现给IP主机，就像物理目标是本地连接的一样。

需要通过IP存储模块访问存储的每台iSCSI主机都需要安装兼容的iSCSI驱动程序。使用iSCSI协议， iSCSI驱动程序允许iSCSI主机通过IP网络传输SCSI请求和响应。从主机操作系统的角度， iSCSI驱动看来是SCSI运输驱动程序，与主机中一条外围通道的FC驱动程序相似。从存储设备的角度，每台IP主机出现为一台FC主机。

将SCSI从IP主机路由到FC存储设备包括以下主要操作：

- 在主机和IP存储模块之间通过IP网络传输iSCSI请求和响应。

- 在IP网络上的主机和FC存储设备之间路由SCSI请求和响应（将iSCSI转换为FCP，反之亦然）。 这由IP存储模块执行。

- 在IP存储模块和FC存储设备之间传输FCP请求或响应。

默认情况下IP存储模块不导入FC目标到iSCSI。在IP存储模块使FC目标可用于iSCSI启动器之前，必须配置动态或静态映射。当两个都被配置后，静态被映射的FC目标有一个配置的名称。在此配置中，提供了静态映射示例。

使用动态映射时，每次iSCSI主机连接到IP存储模块时，都会创建一个新的FC N端口，为此N端口分配的nWWN和pWWN可能不同。如果每次iSCSI主机连接到IP存储模块时需要获取相同的nWWN和pWWN，请使用静态映射方法。静态映射可用于IP存储模块，以访问具有基于启动器的pWWN和/或nWWN的访问控制和逻辑单元号(LUN)映射/掩码配置的智能FC存储阵列。

如果指定将通告每个静态映射的iSCSI目标的IP存储端口列表，并指定允许访问该端口的iSCSI启动器节点名称列表，则可以控制对每个静态映射的iSCSI目标的访问。FC基于分区的访问控制和基于ISCSI的访问控制是访问控制可以为iSCSI提供的二个机制。可以同时使用两个方法。

iSCSI发现是指iSCSI主机为所有iSCSI目标创建iSCSI发现会话和查询时发生的。IP存储模块仅返回iSCSI主机根据访问控制策略允许访问的iSCSI目标列表。

当IP主机启动iSCSI会话时，会创建iSCSI会话。IP存储模块验证指定的iSCSI目标（在会话登录请求中）是否是静态映射目标，如果为true，则验证是否允许IP主机的iSCSI节点名称访问目标。如果IP主机没有权限，其登录被拒绝。

然后，IP存储模块为此IP主机创建FC虚拟N端口（N端口可能已存在），并对IP主机访问的FC目标pWWN的FCID执行FC名称服务器查询。它使用IP主机虚拟N端口的pwwn作为名称服务器查询的请求方。因此，名称服务器执行的一次强制的pwwn区域查询并且回应查询。如果名称服务器返回FCID，则接受iSCSI会话。否则，登录请求被拒绝。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：要查找有关本文档中使用的命令的其他信息，请参阅Cisco MDS 9000系列命令参考，版本1.2.1a和Cisco MDS 9000系列软件配置指南，版本1.2.1a配置指南。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- 坎特伯雷(MDS 9216)

坎特伯雷(MDS 9216)

canterbury# sh run

Building Configuration ...

....

vsan database

vsan 601

!--- VSAN 601 has been used for iSCSI targets.

....

vsan database

vsan 601 interface fc1/3

vsan 601 interface fc1/4

....

boot system bootflash:/s112

boot kickstart bootflash:/k112

ip domain-name cisco.com

ip name-server 144.254.10.123

ip default-gateway 10.48.69.129

ip route 10.48.69.149 255.255.255.255 interface GigabitEthernet2/1

ip routing

iscsi authentication none

iscsi initiator ip-address 10.48.69.149

!--- Identifies the iSCSI initiator based on the IP address. !--- A virtual N port is created for each NIC or network interface.

static pWWN 20:03:00:0c:30:6c:24:4c

!--- Defining the PC Langur`s pwwn above; this is necessary here since lunmasking is !--- enforced on the IBM Shark, but not on the JBOD. Therefore, pWWN must be statically !--- bound to the initiator to be able to access and manage disks on IBM Shark.

vsan 601

!--- VSAN 601 has been used for iSCSI targets.

!--- Targets by way of VSAN 601 are accessible by iSCSI initiators. The !--- targets are defined below. Create a static iSCSI virtual target !--- for Seagate JBOD.

iscsi virtual-target name san-fc-jbod-1

pWWN 21:00:00:20:37:67:f7:a2

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.149 permit

!--- Create a static iSCSI virtual target for IBM Shark.

iscsi virtual-target name shark-c8

pWWN 50:05:07:63:00:c8:94:4c

advertise interface  GigabitEthernet2/1

initiator ip address 10.48.69.149 permit

...

!--- Here, the zone named 'Zone1' is used under VSAN 601 for connectivity. !--- Both initiator and targets are assigned as members of this zone.

switchname canterbury

zone name Zone1 vsan 601

member pWWN 50:05:07:63:00:c8:94:4c

!--- This is IBM Shark.

member pWWN 20:03:00:0c:30:6c:24:4c

!--- This is PC Langur.

member pWWN 21:00:00:20:37:67:f7:a2

!--- This is Seagate JBOD.

member symbolic-nodename 10.48.69.149

!--- You have this entry since zone membership is based on pWWN (not on IP address).

zoneset name ZoneSet1 vsan 601

member Zone1

zoneset  activate name ZoneSet1 vsan 601

....

interface GigabitEthernet2/1

ip address 10.48.69.222 255.255.255.192

iscsi authentication none

no shutdown

....

interface fc1/3

no shutdown

interface fc1/4

no shutdown

...

interface mgmt0

ip address 10.48.69.156 255.255.255.192

interface iscsi2/1

no shutdown

canterbury#

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

在PC上，转到“Control Panel(控制面板)”并检查以下项目：

- 网络连接 — >本地连接 — > TCP/IP属性

- iSCSI配置 — >目标的状态(要查看屏幕截图，请参阅本文档的“从PC显示”部分)。

在MDS 9216上，发出以下命令以验证连接：

- show zone status — 显示区域信息。

- show zone active vsan 601 — 显示属于指定VSAN的区域。

- show fcns database vsan 601 — 显示特定VSAN的名称服务器信息。

- show fcns database detail vsan 601 — 显示给定VSAN的本地条目。

- show flogi database vsan 601 — 显示特定VSAN的FLOGI服务器信息。

- show vsan membership — 显示不同VSAN的接口信息。

- show iscsi initiator — 显示iSCSI启动器信息。

- show iscsi initiator detail — 显示iSCSI启动器信息的更详细信息。

- show iscsi initiator iscsi-session detail — 显示iSCSI启动器会话的详细信息。

- show iscsi initiator fcp-session detail — 显示iSCSI启动器FCP会话的详细信息。

- show ips stats tcp interface gigabitethernet 2/1 detail — 显示特定GE接口的TCP统计信息。

- show iscsi virtual-target configured — 显示已在MDS 9000上配置的iSCSI虚拟目标。

- show iscsi initiator configured — 显示已在MDS 9000上配置的iSCSI启动器。

- show ips arp interface gigabitethernet 2/1 — 显示特定GE接口的IP存储ARP信息。

- show scsi-target devices vsan 601 — 显示特定VSAN的SCSI设备（用于将FC-LUN映射到iSCSI-LUN）。

- show int iscsi 2/1 — 显示iSCSI接口。

- show iscsi stats iscsi 2/1 — 显示iSCSI统计信息。

- show int gigabitethernet 2/1 — 显示GE接口。

- show ip route -显示Ip route信息。

- show ips ip route interface gigabitethernet 2/1 — 显示路由表。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除步骤

本部分提供的信息可用于对配置进行故障排除。

以下是此配置的一些相关故障排除信息：

- 从PC显示

- 从Canterbury Cisco MDS 9216显示

- 交换矩阵管理器和设备管理器显示

从PC显示

此屏幕截图是PC语言的iSCSI显示：

要检查这些新磁盘，请单击PC左下角的Start。选择以下选项：

“My Computer（我的电脑）” -> “Control Panel（控制面板）” -> “Administrative Tools（管理工具）” -> “Computer Management（计算机管理）”

在“System Tools(系统工具)”下，选择“Device Manager”。在右侧，单击“Disk Drives(磁盘驱动器)”。您应看到：

要管理这些磁盘，请单击PC左下角的Start。选择以下选项：

“My Computer（我的电脑）” -> “Control Panel（控制面板）” -> “Administrative Tools（管理工具）” -> “Computer Management（计算机管理）”

在“存储”下，单击“磁盘管理”。PC语言的显示捕获如下所示。请注意，Disk1和Disk2来自IBM Shark，Disk3是Seagate JBOD。

来自坎特伯雷的显示器(MDS 9216)

来自坎特伯雷的显示器(MDS 9216)

canterbury# show zone status

...

VSAN: 601 default-zone: deny distribute: active only Interop: Off

Full Zoning Database :

Zonesets:1  Zones:1 Aliases: 0

Active Zoning Database :

Name: ZoneSet1  Zonesets:1  Zones:1

Status: Activation completed at Wed Sep 10 09:25:45 2003

...

canterbury#

canterbury# show zone active vsan 601

zone name Zone1 vsan 601

symbolic-nodename 10.48.69.231

* fcid 0x020001 [pWWN 50:05:07:63:00:c8:94:4c]

* fcid 0x020005 [pWWN 20:03:00:0c:30:6c:24:4c]

* fcid 0x0201e8 [pWWN 21:00:00:20:37:67:f7:a2]

* fcid 0x020005 [symbolic-nodename 10.48.69.149]

canterbury#

canterbury# show fcns database vsan 601

VSAN 601:

--------------------------------------------------------------------------

FCID        TYPE  pWWN                    (VENDOR)        FC4-TYPE:FEATURE

--------------------------------------------------------------------------

0x020001    N     50:05:07:63:00:c8:94:4c (IBM)           scsi-fcp:target fc..

0x020005    N     20:03:00:0c:30:6c:24:4c (Cisco)         scsi-fcp:init isc..w

0x0201e8    NL    21:00:00:20:37:67:f7:a2 (Seagate)       scsi-fcp:target

Total number of entries = 3

canterbury#

canterbury# show fcns database detail vsan  601

------------------------

VSAN:601   FCID:0x020001

------------------------

port-wwn (vendor)     :50:05:07:63:00:c8:94:4c (IBM)

node-wwn              :50:05:07:63:00:c0:94:4c

class                 :2,3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target fcsb2-ch-cu fcsb2-cu-ch

symbolic-port-name    :

symbolic-node-name    :

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:03:00:0c:30:6c:24:40

hard-addr             :0x000000

------------------------

VSAN:601   FCID:0x020005

------------------------

port-wwn (vendor)     :20:03:00:0c:30:6c:24:4c (Cisco)

node-wwn              :21:00:00:0c:30:6c:24:42

class                 :2,3

node-ip-addr          :10.48.69.149

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:init iscsi-gw

symbolic-port-name    :

symbolic-node-name    :10.48.69.149

port-type             :N

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:41:00:0c:30:6c:24:40

hard-addr             :0x000000

------------------------

VSAN:601   FCID:0x0201e8

------------------------

port-wwn (vendor)     :21:00:00:20:37:67:f7:a2 (Seagate)

node-wwn              :20:00:00:20:37:67:f7:a2

class                 :3

node-ip-addr          :0.0.0.0

ipa                   :ff ff ff ff ff ff ff ff

fc4-types:fc4_features:scsi-fcp:target

symbolic-port-name    :

symbolic-node-name    :

port-type             :NL

port-ip-addr          :0.0.0.0

fabric-port-wwn       :20:04:00:0c:30:6c:24:40

hard-addr             :0x000000

Total number of entries = 3

canterbury#

canterbury# show flogi database vsan 601

---------------------------------------------------------------------------

INTERFACE  VSAN    FCID            PORT NAME               NODE NAME

---------------------------------------------------------------------------

fc1/3      601   0x020001  50:05:07:63:00:c8:94:4c  50:05:07:63:00:c0:94:4c

fc1/4      601   0x0201e8  21:00:00:20:37:67:f7:a2  20:00:00:20:37:67:f7:a2

iscsi2/1   601   0x020005  20:03:00:0c:30:6c:24:4c  21:00:00:0c:30:6c:24:42

Total number of flogi = 3.

canterbury#

canterbury# show vsan membership

...

vsan 601 interfaces:

fc1/3   fc1/4

...

canterbury#

canterbury# show iscsi initiator

...

iSCSI Node name is 10.48.69.149

iSCSI Initiator name: iqn.1987-05.com.cisco:02.e746244830dd.langur

iSCSI alias name: LANGUR

Node WWN is 21:00:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 601

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:6c:24:4c (configured)

Interface iSCSI 2/1, Portal group tag: 0x80

VSAN ID 601, FCID 0x020005

canterbury#

canterbury# show iscsi initiator detail

...

iSCSI Node name is 10.48.69.149

iSCSI Initiator name: iqn.1987-05.com.cisco:02.e746244830dd.langur

iSCSI alias name: LANGUR

Node WWN is 21:00:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 601

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:6c:24:4c (configured)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 601, FCID 0x 20005

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: shark-c8

Statistics:

PDU: Command: 45, Response: 45

Bytes: TX: 5968, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.149:2196

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 219 ms, Variance: 15

Advertized window: Current: 61 KB, Maximum: 62 KB, Scale: 0

Peer receive window: Current: 63 KB, Maximum: 63 KB, Scale: 0

Congestion window: Current: 11 KB

Target: san-fc-jbod-1

Statistics:

PDU: Command: 26, Response: 26

Bytes: TX: 3168, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.149:3124

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 219 ms, Variance: 15

Advertized window: Current: 61 KB, Maximum: 62 KB, Scale: 0

Peer receive window: Current: 63 KB, Maximum: 63 KB, Scale: 0

Congestion window: Current: 11 KB

FCP Session details

Target FCID: 0x020001 (S_ID of this session: 0x020005)

pWWN: 50:05:07:63:00:c8:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-c8

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 45

Target FCID: 0x0201e8 (S_ID of this session: 0x020005)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: san-fc-jbod-1

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 26

canterbury# show iscsi initiator iscsi-session detail

iSCSI Node name is 10.48.69.149

iSCSI Initiator name: iqn.1987-05.com.cisco:02.e746244830dd.langur

iSCSI alias name: LANGUR

Node WWN is 21:00:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 601

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:6c:24:4c (configured)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 601, FCID 0x 20005

2 FC sessions, 2 iSCSI sessions

iSCSI session details

Target: shark-c8

Statistics:

PDU: Command: 45, Response: 45

Bytes: TX: 5968, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.149:2196

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 217 ms, Variance: 14

Advertized window: Current: 62 KB, Maximum: 62 KB, Scale: 0

Peer receive window: Current: 63 KB, Maximum: 63 KB, Scale: 0

Congestion window: Current: 11 KB

Target: san-fc-jbod-1

Statistics:

PDU: Command: 26, Response: 26

Bytes: TX: 3168, RX: 0

Number of connection: 1

TCP parameters

Local 10.48.69.222:3260, Remote 10.48.69.149:3124

Path MTU: 1500 bytes

Retransmission timeout: 300 ms

Round trip time: Smoothed 217 ms, Variance: 14

Advertized window: Current: 61 KB, Maximum: 62 KB, Scale: 0

Peer receive window: Current: 63 KB, Maximum: 63 KB, Scale: 0

Congestion window: Current: 11 KB

canterbury#

canterbury# show iscsi initiator fcp-session detail

iSCSI Node name is 10.48.69.149

iSCSI Initiator name: iqn.1987-05.com.cisco:02.e746244830dd.langur

iSCSI alias name: LANGUR

Node WWN is 21:00:00:0c:30:6c:24:42 (dynamic)

Member of vsans: 601

Number of Virtual n_ports: 1

Virtual Port WWN is 20:03:00:0c:30:6c:24:4c (configured)

Interface iSCSI 2/1, Portal group tag is 0x80

VSAN ID 601, FCID 0x 20005

2 FC sessions, 2 iSCSI sessions

FCP Session details

Target FCID: 0x020001 (S_ID of this session: 0x020005)

pWWN: 50:05:07:63:00:c8:94:4c, nWWN: 50:05:07:63:00:c0:94:4c

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: shark-c8

Negotiated parameters

RcvDataFieldSize 2048 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 45

Target FCID: 0x0201e8 (S_ID of this session: 0x020005)

pWWN: 21:00:00:20:37:67:f7:a2, nWWN: 20:00:00:20:37:67:f7:a2

Session state: LOGGED_IN

1 iSCSI sessions share this FC session

Target: san-fc-jbod-1

Negotiated parameters

RcvDataFieldSize 1392 our_RcvDataFieldSize 1392

MaxBurstSize 0, EMPD: FALSE

Random Relative Offset: FALSE, Sequence-in-order: Yes

Statistics:

PDU: Command: 0, Response: 26

canterbury#

canterbury# show ips stats tcp interface gigabitethernet 2/1 detail

TCP Statistics for port GigabitEthernet2/1

TCP send stats

241247690 segments, 176414627280 bytes

239428551 data, 1738205 ack only packets

42541 control (SYN/FIN/RST), 0 probes, 38280 window updates

498 segments retransmitted, 526612 bytes

464 retransmitted while on ethernet send queue, 111295209 packets split

2505024 delayed acks sent

TCP receive stats

34418285 segments, 8983771 data packets in sequence, 9282604852 bytes in s

equence

854523 predicted ack, 6126542 predicted data

0 bad checksum, 0 multi/broadcast, 0 bad offset

0 no memory drops, 0 short segments

1844 duplicate bytes, 77 duplicate packets

0 partial duplicate bytes, 0 partial duplicate packets

123700 out-of-order bytes, 2235 out-of-order packets

6 packet after window, 0 bytes after window

0 packets after close

28128679 acks, 173967225697 ack bytes, 0 ack toomuch, 75348 duplicate acks

0 ack packets left of snd_una, 12 non-4 byte aligned packets

18442549 window updates, 0 window probe

88637 pcb hash miss, 2150 no port, 14 bad SYN, 0 paws drops

TCP Connection Stats

26 attempts, 42272 accepts, 42274 established

42327 closed, 40043 drops, 24 conn drops

106 drop in retransmit timeout, 152 drop in keepalive timeout

0 drop in persist drops, 0 connections drained

TCP Miscellaneous Stats

9776335 segments timed, 9780142 rtt updated

402 retransmit timeout, 457 persist timeout

69188 keepalive timeout, 69015 keepalive probes

TCP SACK Stats

100 recovery episodes, 231520160 data packets, 330107461536 data bytes

396 data packets retransmitted, 482072 data bytes retransmitted

13 connections closed, 46 retransmit timeouts

TCP SYN Cache Stats

42281 entries, 42272 connections completed, 3 entries timed out

0 dropped due to overflow, 6 dropped due to RST

0 dropped due to ICMP unreach, 0 dropped due to bucket overflow

0 abort due to no memory, 43 duplicate SYN, 1833 no-route SYN drop

0 hash collisions, 0 retransmitted

TCP Active Connections

Local  Address        Remote Address        State      Send-Q   Recv-Q

10.48.69.222:3260     10.48.69.149:1026     ESTABLISH  0        0

10.48.69.222:3260     10.48.69.149:2196     ESTABLISH  0        0

10.48.69.222:3260     10.48.69.149:3124     ESTABLISH  0        0

0.0.0.0:3260          0.0.0.0:0             LISTEN     0        0

canterbury#

canterbury# show iscsi virtual-target configured

target: shark-c8

* Port WWN 50:05:07:63:00:c8:94:4c

!--- The asterisk (*) in front of the pWWN means !--- that you have both discovery and target sessions. If !--- you do not see this, it means that only a discovery !--- session exists.

Configured node

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 2

initiator 10.48.69.231/32 is permitted

initiator 10.48.69.149/32 is permitted

all initiator permit is disabled

target: san-fc-jbod-1

* Port WWN 21:00:00:20:37:67:f7:a2

Configured node

No. of advertised interface: 1

GigabitEthernet 2/1

No. of initiators permitted: 2

initiator 10.48.69.232/32 is permitted

initiator 10.48.69.149/32 is permitted

all initiator permit is disabled

canterbury#

canterbury# show iscsi initiator configured

...

iSCSI Node name is 10.48.69.149

Member of vsans: 601

No. of pWWN: 1

Port WWN is 20:03:00:0c:30:6c:24:4c

canterbury#

canterbury# show ips arp interface gigabitethernet 2/1

Protocol         Address   Age (min)   Hardware Addr  Type   Interface

Internet    10.48.69.149        3     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.200        0     0008.e21e.c7bc  ARPA  GigabitEthernet2/1

Internet    10.48.69.201        4     0202.3d30.45c9  ARPA  GigabitEthernet2/1

Internet    10.48.69.206        9     0005.9ba6.95ff  ARPA  GigabitEthernet2/1

Internet    10.48.69.209        6     0009.7c60.561f  ARPA  GigabitEthernet2/1

Internet    10.48.69.229        4     0800.209e.edab  ARPA  GigabitEthernet2/1

Internet    10.48.69.233        0     0010.4200.7d5b  ARPA  GigabitEthernet2/1

Internet    10.48.69.235        0     0800.20b6.6559  ARPA  GigabitEthernet2/1

Internet    10.48.69.238        4     0030.6e1b.6f51  ARPA  GigabitEthernet2/1

Internet    10.48.69.239        1     0030.6e1c.a00b  ARPA  GigabitEthernet2/1

Internet    10.48.69.248        7     0202.3d30.45f8  ARPA  GigabitEthernet2/1

Internet    10.48.69.252        1     0202.3d30.45fc  ARPA  GigabitEthernet2/1

Internet      10.10.2.28        0     0202.3d0a.021c  ARPA  GigabitEthernet2/1

canterbury#

canterbury# show scsi-target devices vsan 601

--------------------------------------------------------------------------------

VSAN    FCID        pWWN                      VENDOR    MODEL             REV

--------------------------------------------------------------------------------

601     0x020001    50:05:07:63:00:c8:94:4c   IBM       2105F20           .114

601     0x0201e8    21:00:00:20:37:67:f7:a2   SEAGATE   ST318203FC        0004

canterbury#

canterbury# show int iscsi 2/1

iscsi2/1 is up

Hardware is GigabitEthernet

Port WWN is 20:41:00:0c:30:6c:24:40

Admin port mode is ISCSI

Port mode is ISCSI

Speed is 1 Gbps

iSCSI initiator is identified by name

Number of iSCSI session: 3, Number of TCP connection: 3

Configured TCP parameters

Local Port is 3260

PMTU discover is enabled, reset timeout is 3600 sec

Keepalive-timeout is 60 sec

Minimum-retransmit-time is 300 ms

Max-retransmissions 4

Sack is enabled

Maximum allowed bandwidth is 500000 kbps

Minimum available bandwidth is 500000 kbps

Estimated round trip time is 10000 usec

5 minutes input rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

5 minutes output rate 16 bits/sec, 2 bytes/sec, 0 frames/sec

iSCSI statistics

Input 76856 packets, 8696216 bytes

Command 13139 pdus, Data-out 85 pdus, 84292 bytes

Output 89876 packets, 6629892 bytes

Response 13132 pdus (with sense 16), R2T 25 pdus

Data-in 13072 pdus, 2125736 bytes

canterbury#

canterbury# show iscsi stats iscsi 2/1

iscsi2/1

5 minutes input rate 8 bits/sec, 1 bytes/sec, 0 frames/sec

5 minutes output rate 8 bits/sec, 1 bytes/sec, 0 frames/sec

iSCSI statistics

76857 packets input, 8696264 bytes

Command 13139 pdus, Data-out 85 pdus, 84292 bytes, 0 fragments

output 89877 packets, 6629940 bytes

Response 13132 pdus (with sense 16), R2T 25 pdus

Data-in 13072 pdus, 2125736 bytes

canterbury#

canterbury# show interface gigabitethernet 2/1

GigabitEthernet2/1 is up

Hardware is GigabitEthernet, address is 0005.3000.ade6

Internet address is 10.48.69.222/26

MTU 1500  bytes

Port mode is IPS

Speed is 1 Gbps

Beacon is turned off

Auto-Negotiation is turned on

iSCSI authentication: NONE

5 minutes input rate 464 bits/sec, 58 bytes/sec, 0 frames/sec

5 minutes output rate 64 bits/sec, 8 bytes/sec, 0 frames/sec

30544982 packets input, 9266250283 bytes

29435 multicast frames, 0 compressed

0 input errors, 0 frame, 0 overrun 0 fifo

233947842 packets output, 179379369852 bytes, 0 underruns

0 output errors, 0 collisions, 0 fifo

0 carrier errors

canterbury#

canterbury# show ip route

Codes: C - connected, S - static

Gateway of last resort is 10.48.69.129

S 10.48.69.149, gigabitethernet2-1

C 6.6.6.0/30 is directly connected, gigabitethernet2-6

C 5.5.5.0/30 is directly connected, gigabitethernet2-5

C 10.48.69.192/26 is directly connected, gigabitethernet2-1

C 10.48.69.128/26 is directly connected, mgmt0

canterbury#

canterbury# show ips ip route interface gigabitethernet 2/1

Codes: C - connected, S - static

No default gateway

S 10.48.69.149/32 via 0.0.0.0, GigabitEthernet2/1

C 10.48.69.192/26 is directly connected, GigabitEthernet2/1

canterbury#

交换矩阵管理器和设备管理器显示

此部分提供从MDS组织管理器1.1(2)和设备管理器的屏幕截图1.1.(2)。

交换矩阵管理器的拓扑图

此屏幕截图是交换矩阵管理器的拓扑图：

选择FC-LUN以显示设备管理器中LUN的pWWN、LUN ID和容量。

选择IP-iSCSI以显示“Device Manager（设备管理器）”中的iSCSI会话。

相关信息

- Cisco iSCSI软件下载(仅限注册客户)

- Windows 2000 系统的 iSCSI 驱动器常见问题

- iSCSI驱动程序：用于Microsoft Windows的思科iSCSI驱动程序版本说明，驱动程序版本3.1.2

- 用于 Windows 2000 的 iSCSI 驱动程序故障排除

- 技术支持 - Cisco Systems