目录

简介

后处理过程

简介

本文档介绍在使用另一个设置工具(YaST)执行操作系统(OS)升级或安装新的以太网网络接口控制器(ENIC)/交换矩阵网络时，在重新启动任何SAP高性能分析设备(HANA)节点之前，必须如何更改预引导执行环境(PXE)引导配置接口控制器(FNIC)驱动程序。补丁/驱动程序安装必须在每个SAP HANA节点上进行。

后处理过程

使用YaST更新操作系统时，请使用此步骤。

1. 使用YaST或ENIC/FNIC驱动程序安装执行SUSE更新。
注意：有关如何从SP2升级到SP3的详细信 息，请参阅如何升级到SLES/SLED 11 SP3 Micro Focus文档。

2. 将更新的内核从SAP HANA节点之一复制到mgmtsrv。

server01 # cd /boot

# Prepare initrd for the PXEBoot and include the nfs packages/drivers

mkinitrd -f nfs -D eth0

# Copy the initrd and vmlinuz to the tftpboot directory of the mgmtsrv

server01 # scp initrd-3.0.101-0.31-default mgmtsrv01:/tftpboot

server01 # scp vmlinuz-3.0.101-0.31-default mgmtsrv01:/tftpboot

3. 登录mgmtsrv01，以便为PXE引导准备初始RAM磁盘(initrd)并包括网络文件系统(NFS)软件包/驱动程序：

# Check the new run_all.sh script is available (attached to this article as well)

ll /tftboot/tmp/run_all.sh

# Change the initrd

cd /tftpboot

mkdir /tftpboot/tmp2

cp initrd-3.0.101-0.31-default  /tftpboot/tmp2/

cd /tftpboot/tmp2

mv initrd-3.0.101-0.31-default  initrd-3.0.101-0.31-default.gz

gunzip initrd-3.0.101-0.31-default.gz

# Now the initrd is in a CPIO format

cpio -idumf < initrd-3.0.101-0.31-default

rm initrd-3.0.101-0.31-default

# Udev files needs to be empty to avoid issues running different nodes with

that initrd

# During the kernel creation it captures all MAC addresses and align them to

the addresses in the UDEV rules file, so we empty the file before.

# During restart every server will create its own persistent-net rules again.

echo > etc/udev/rules.d/70-persistent-net.rules

# Copy the run_all script generic to all versions of the kernel

cp ../tmp/run_all.sh .

find . | cpio --create --format="newc" > ../initrd-3.0.101-0.31-default

cd ..

gzip -9 initrd-3.0.101-0.31-default

mv initrd-3.0.101-0.31-default.gz initrd-3.0.101-0.31-default

# For simplification …

ln -s ./initrd-3.0.101-0.31-default initrd_3.0.101

ln -s ./vmlinuz-3.0.101-0.31-default kernel_3.0.101

# Now prepare the PXE boot configuration

cd /tftpboot/pxelinux.cfg

vi <hostname|IP address>

# If there is no link available you can check with the command "gethostip

server01"

copy the current SLES11_SP2 (or Default) section and adapt the values for default

and LABEL as well as the kernel and initrd links

# SAP UCS PXE Boot Definition

display ../boot.msg

default SLES11_SP3_101

prompt 1

timeout 10

LABEL SLES11_SP3_101

KERNEL kernel_3.0.101

APPEND initrd=initrd_3.0.101 rw rootdev=192.168.xx.xx:/FS_OS_01/SLES11SP3

intel_idle.max_cstate=0 processor.max_cstate=0 ip=dhcp

OS_VOLUME="FS_OS_01/SLES4SAPSP3" MAC="00:25:B5:12:00:FF" OS_SERVER="192.168.127.11"

4. 在第一个SAP HANA节点上，确保SAP HANA停止为<SID>ADM。

(sapcontrol -nr <InstanceNumber> -function StopSystem)

5. 将所有SAP HANA节点重新启动到新内核中。

如果此解决方案中有其他SAP HANA节点，您必须通过节点上的YaST运行更新并调整PXE引导配置，以便随后指向正确的内核/initrd。