目录

问题：

问题：

症状：当我尝试通过思科网络安全设备(WSA)访问网站时，代理会显示错误消息“Proxy Unlicensed：

This Page Cannot Be Displayed

----------------------

Internet access is not available without proper licensing of the

security device.

Please contact your corporate network administrator and provide

the code shown below.

Note: To access the management interface of the security device,

enter the configured IP address with port 8080.

---------------------

Notification code: PROXY_UNLICENSED

功能密钥未过期。有什么问题吗？

环境：思科网络安全设备(WSA)，所有AsyncOS版本

未接受EULA（最终用户许可协议），但应接受。

您可以通过两种方式实现此接受：

1. 运行“System Setup Wizard（系统设置向导）” ，并完成以下指导性设置过程： “System Administration（系统管理）”选项卡>“System Setup（系统设置）” > “System Setup Wizard（系统设置向导）”。

2. 转至“安全服务”(Security Services)选项卡>“Web代理”(Web Proxy) >“编辑设置”(Edit Settings)。如果EULA出现，但尚未被接受，则仍需要执行此操作。如果点击Edit Settings按钮可以编辑代理选项，则表示已接受该选项。