目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

本文提供要求的配置的概述，该配置允许运行Cisco IOS®软件的路由器和Cisco VPN 5000系列集中器打开通用路由封装(GRE)隧道。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS 软件版本 12.0(7)T

- Cisco VPN 5000集中器软件版本5.2.19US

- Cisco VPN 5002 集中器

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用此图所示的网络设置。

配置

本文档使用此处所示的配置。

- Cisco VPN 5002 集中器

- 运行Cisco IOS软件的路由器

Cisco VPN 5002 集中器

[ General ]

IPSecGateway             = 200.1.1.2

DeviceName               = "omar5002"

EthernetAddress          = 00:00:a5:

e9:c8:00

DeviceType               = VPN 5002/8 Concentrator

ConfiguredOn             = Timeserver not configured

ConfiguredFrom           = Command Line, from Console

EnablePassword           =

Password                 =

[ IP Ethernet 1:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.0

IPAddress                = 200.1.1.1

[ IP Ethernet 0:0 ]

Mode                     = Routed

SubnetMask               = 255.255.255.0

IPAddress                = 10.10.10.1

[ Tunnel Partner VPN 1 ]

EncryptMethod            = None

Encryption               = Off

Authentication           = Off

KeyManage                = Manual

Mode                     = Main

Partner                  = 100.1.1.1

LocalAccess              = "10.10.10.0/24"

BindTo                   = "ethernet1:0"

Peer                     = "20.20.20.0/24"

[ IP Static ]

20.20.20.0 255.255.255.0 vpn 1 1

[ IP VPN 1 ]

Numbered                 = Off

Mode                     = Routed

Configuration size is 1107 out of 65500 bytes.

omar5002#

运行Cisco IOS软件的路由器

Router Configuration:

Router#show running-config

Building configuration...

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

!

ip subnet-zero

!

!

!

interface Tunnel0

ip unnumbered Ethernet1

no ip directed-broadcast

tunnel source 100.1.1.1

tunnel destination 200.1.1.1

!

interface Ethernet0

ip address 100.1.1.1 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1

ip address 20.20.20.1 255.255.255.0

no ip directed-broadcast

!

!

ip classless

ip route 0.0.0.0 0.0.0.0 100.1.1.2 1

ip route 10.10.10.0 255.255.255.0 Tunnel0

no ip http server

!

!

line con 0

transport input none

line aux 0

line vty 0 4

login

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show vpn statistics verbose — 提供详细的隧道信息。

- show interface — 提供接口统计信息。

这是从Cisco VPN 5002集中器收集的show vpn statistics verbose的示例命令输出。

omar5002#show vpn statistic verbose

Current  In       High     Running  Tunnel   Tunnel   Tunnel

Active   Negot    Water    Total    Starts   OK       Error

--------------------------------------------------------------

Users     0        0        0        0        0        0        0

Partners  1        0        1        1        0        0        0

Total     1        0        1        1        0        0        0

Stats             VPN0:1

Wrapped              697

Unwrapped            697

BadEncap               0

BadAuth                0

BadEncrypt             0

rx IP                718

rx IPX                 0

rx Other               0

tx IP                734

tx IPX                 0

tx Other               0

IKE rekey              0

Input VPN pkts dropped due to no SA: 0

Input VPN pkts dropped due to no free queue entries: 0

ISAKMP Negotiation stats

Admin packets in        0

Fastswitch packets in   0

No cookie found         0

Can't insert cookie     0

Inserted cookie(L)      0

Inserted cookie(R)      0

Cookie not inserted(L)  0

Cookie not inserted(R)  0

Cookie conn changed     0

Cookie already inserted  0

Deleted cookie(L)       0

Deleted cookie(R)       0

Cookie not deleted(L)   0

Cookie not deleted(R)   0

Forwarded to RP         0

Forwarded to IOP        0

Bad UDP checksum        0

Not fastswitched        0

这是从路由器采取的show interface命令的示例命令输出。

Router#show interface tunnel 0

Tunnel0 is up, line protocol is up

Hardware is Tunnel

Interface is unnumbered. Using address of Ethernet1 (20.20.20.1)

MTU 1476 bytes, BW 9 Kbit, DLY 500000 usec,

reliability 255/255, txload 55/255, rxload 113/255

Encapsulation TUNNEL, loopback not set

Keepalive set (10 sec)

Tunnel source 100.1.1.1, destination 200.1.1.1

Tunnel protocol/transport GRE/IP, key disabled, sequencing disabled

Checksumming of packets disabled,  fast tunneling enabled

Last input 00:00:15, output 00:00:15, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/0, 1 drops; input queue 0/75, 0 drops

5 minute input rate 4000 bits/sec, 5 packets/sec

5 minute output rate 11000 bits/sec, 5 packets/sec

1309 packets input, 129264 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

1348 packets output, 316468 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

Router#

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- Cisco VPN 5000 系列集中器支持页面

- Cisco VPN 5000 客户端支持页

- IPSec（IP 安全协议）支持页

- 技术支持 - Cisco Systems