目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

在使用认证代理执行浏览器身份验证之前，此配置示例最初会阻塞从外部网络上的主机设备（地址为 11.11.11.12）到内部网络上的所有设备的流量。从服务器传递的访问列表(permit tcp|ip|icmp any any )向访问列表115添加了授权后的动态条目，该列表暂时允许从主机设备访问内部网络。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS®软件版本12.0.7.T

- Cisco 3640 路由器

注意：在Cisco IOS软件版本12.0.5.T中引入了ip auth-proxy命令。此配置测试了Cisco IOS软件版本12.0.7.T。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档约定的更多信息，请参考 Cisco 技术提示约定。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可获取有关本节中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

3640路由器

Current configuration:

!

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname security-3640

!

!--- Turn on authentication.

aaa new-model

!--- Define the server group and servers for TACACS+ or RADIUS.

aaa group server tacacs+|radius RTP

server 171.68.118.115

!

!--- Define what you need to authenticate.

aaa authentication login default group RTP none

aaa authorization exec default group RTP none

aaa authorization auth-proxy default group RTP

enable secret 5 $1$H9zZ$z9bu5HMy4NTtjsvIhltGT0

enable password ww

!

ip subnet-zero

!

!--- You want the router name to appear as banner.

ip auth-proxy auth-proxy-banner

!--- You want the access-list entries to timeout after 10 minutes.

ip auth-proxy auth-cache-time 10

!--- You define the list-name to be associated with the interface.

ip auth-proxy name list_a http

ip audit notify log

ip audit po max-events 100

cns event-service server

!

process-max-time 200

!

interface FastEthernet0/0

ip address 40.31.1.150 255.255.255.0

no ip directed-broadcast

no mop enabled

!

interface FastEthernet1/0

ip address 11.11.11.11 255.255.255.0

!--- Apply the access-list to the interface.

ip access-group 115 in

no ip directed-broadcast

!--- Apply the auth-proxy list-name.

ip auth-proxy list_a

!

ip classless

ip route 171.68.118.0 255.255.255.0 40.31.1.1

!--- Turn on the http server and authentication.

ip http server

ip http authentication aaa

!

!--- This is our access-list for auth-proxy testing - !--- it denies only one host, 11.11.11.12, access - to minimize disruption !--- to the network during testing.

access-list 115 permit tcp host 11.11.11.12 host 11.11.11.11 eq www

access-list 115 deny   icmp host 11.11.11.12 any

access-list 115 deny   tcp host 11.11.11.12 any

access-list 115 deny   udp host 11.11.11.12 any

access-list 115 permit udp any any

access-list 115 permit tcp any any

access-list 115 permit icmp any any

dialer-list 1 protocol ip permit

dialer-list 1 protocol ipx permit

!

!--- Define the server(s).

tacacs-server host 171.68.118.115

tacacs-server key cisco

radius-server host 171.68.118.115

radius-server key cisco

!

line con 0

transport input none

line aux 0

line vty 0 4

password ww

!

!

end

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供了可用于对配置进行故障排除的信息。

对于这些指令和其他故障排除信息，请参见排错认证代理。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

相关信息

- IOS防火墙支持页面

- TACACS/TACACS+支持页面

- IOS 文档中的 TACACS+

- RADIUS 支持页

- 请求注解 (RFC)

- 技术支持和文档 - Cisco Systems