Contents

Introduction

使用静态主机，内容安全工具下载，更新或升级

通过GUI服务更新配置

updateconfig的配置通过CLI

验证

更新

升级

排除故障

更新

升级

Related Information

Introduction

本文描述IP地址并且主机需要配置您的Cisco内容安全工具为了用在下载、更新和升级的一台静态主机上。 这些配置将用于硬件或虚拟Cisco电子邮件安全工具(ESA)， Web安全工具(WSA)，或者安全管理工具(SMA)。

使用静态主机，内容安全工具下载，更新或升级

Cisco提供有严格的防火墙或代理需求的用户的静态主机。请注意，如果配置您的工具使用静态主机下载和更新，下载的同样静态主机，并且在防火墙和代理必须允许更新在网络。

这是在下载、更新和升级进程涉及的静态主机名、IP地址和端口：

- downloads-static.ironport.com

- 208.90.58.105 (端口80)

- updates-static.ironport.com

- 208.90.58.25 (端口80)

- 184.94.240.106 (端口80)

通过GUI服务更新配置

完成这些步骤为了从GUI更改下载、更新或者升级配置在AsyncOS ：

1. 连接对更新设置配置页

1. WSA ：系统管理>升级和更新设置

2. ESA ：安全服务>服务更新

3. SMA ：系统管理>更新设置

2. 点击编辑更新设置….

3. 在更新服务器(镜像)中请区分，选择"Local Update Servers (location of update image files)"。

4. 对于基本URL字段，请进入在http://downloads-static.ironport.com和为Port字段，为端口80设置。

5. 空着认证(可选的)字段。

6. (*)仅ESA -主机(McAfee抗病毒定义， PXE引擎更新， Sophos抗病毒定义， IronPort反垃圾邮件规则，爆发过滤规则， DLP更新，时间区域规则和登记客户端(过去常常拿来URL过滤的证书)字段，输入updates-static.ironport.com。 (端口80是可选的。)

7. 离开更新服务器(列表)部分和字段所有设置为默认Cisco IronPort更新服务器。

8. 如果必须保证您有选择当必要时接口为外部通信，在一个特定接口沟通。 默认配置将设置为自动精选。

9. 验证并且更新被配置的代理服务器，如果必须。

10. 单击 submit。

11. 在右上角，请点击进行更改。

12. 最后，再请点击进行更改为了确认所有配置更改。

进行对本文的验证部分。

updateconfig的配置通过CLI

同样更改可以适用通过在工具上的CLI。 完成这些步骤为了从CLI更改下载、更新或者升级配置在AsyncOS ：

1. 运行CLI命令updateconfig。

2. 进入在setup命令。

3. 被提交的第一部分配置是“功能键更新”。 使用‘2。请使用拥有服务器’和输入http://downloads-static.ironport.com:80/。

4. (*)仅ESA -被提交的第二部分配置是“服务(镜像)”。 使用‘2。请使用拥有服务器’和输入updates-static.ironport.com。

5. 其他配置提示可以留给集合默认。

6. 如果必须保证您有选择当必要时接口为外部通信，在一个特定接口沟通。 默认配置将设置为自动。

7. 验证并且更新被配置的代理服务器，如果必须。

8. 按下回归回到主要CLI提示。

9. 运行CLI命令进行保存所有配置更改。

进行对本文的验证部分。

验证

更新

对于更新的验证在工具上的从CLI验证是最佳的。

从CLI ：

1. 运行updatenow。

1. (*)仅ESA -您能治军updatenow有所有服务，并且规则设置更新。

2. 运行尾标updater_logs。

您将要注意密切注意以下线路“http://updates-static.ironport.com/..”。 这应该发信号通信和下载与静态更新服务器。

示例，从更新Cisco Antispam引擎(案件)和相关的规则的ESA ：

Wed Aug 2 09:22:05 2017 Info: case was signalled to start a new update

Wed Aug 2 09:22:05 2017 Info: case processing files from the server manifest

Wed Aug 2 09:22:05 2017 Info: case started downloading files

Wed Aug 2 09:22:05 2017 Info: case waiting on download lock

Wed Aug 2 09:22:05 2017 Info: case acquired download lock

Wed Aug 2 09:22:05 2017 Info: case beginning download of remote file "http://updates-static.ironport.com/case/2.0/case/default/1480513074538790"

Wed Aug 2 09:22:07 2017 Info: case released download lock

Wed Aug 2 09:22:07 2017 Info: case successfully downloaded file "case/2.0/case/default/1480513074538790"

Wed Aug 2 09:22:07 2017 Info: case waiting on download lock

Wed Aug 2 09:22:07 2017 Info: case acquired download lock

Wed Aug 2 09:22:07 2017 Info: case beginning download of remote file "http://updates-static.ironport.com/case/2.0/case_rules/default/1501673364679194"

Wed Aug 2 09:22:10 2017 Info: case released download lock

<<<SNIP FOR BREVITY>>>

只要服务沟通，下载然后顺利地更新，设置您。

一旦服务更新完成， updater_logs将显示：

Wed Aug 2 09:22:50 2017 Info: case started applying files

Wed Aug 2 09:23:04 2017 Info: case cleaning up base dir [bindir]

Wed Aug 2 09:23:04 2017 Info: case verifying applied files

Wed Aug 2 09:23:04 2017 Info: case updating the client manifest

Wed Aug 2 09:23:04 2017 Info: case update completed

Wed Aug 2 09:23:04 2017 Info: case waiting for new updates

升级

为了验证升级通信是成功的并且完成，请连接对Upgrade页的系统并且点击可用的升级。如果可用的版本列表显示，则您的设置完成。

从CLI，您能运行upgrade命令。 如果有可用的升级，选择下载选项查看明显的升级。

myesa.local> upgrade

Choose the operation you want to perform:

- DOWNLOADINSTALL - Downloads and installs the upgrade image (needs reboot).

- DOWNLOAD - Downloads the upgrade image.

[]> download

Upgrades available.

1. AsyncOS 9.6.0 build 051 upgrade For Email, 2015-09-02 this release is for General Deployment

2. AsyncOS 9.7.0 build 125 upgrade For Email, 2015-10-15. This release is for General Deployment

3. AsyncOS 9.7.1 build 066 upgrade For Email, 2016-02-16. This release is for General Deployment.

4. cisco-sa-20150625-ironport SSH Keys Vulnerability Fix

[4]>

排除故障

更新

当更新发生故障时，工具发送通知戒备。这是通常接收的电子邮件通知的示例：

The updater has been unable to communicate with the update server for at least 1h.

Last message occurred 4 times between Tue Mar 1 18:02:01 2016 and Tue Mar 1 18:32:03 2016.

Version: 9.7.1-066

Serial Number: 888869DFCCCC-3##CV##

Timestamp: 01 Mar 2016 18:52:01 -0500

您将要测试从工具的通信到指定的更新服务器。 在这种情况下，我们关注downloads-static.ironport.com。 使用telnet，工具应该有在端口80的开放通信：

myesa.local> telnet downloads-static.ironport.com 80

Trying 208.90.58.105...

Connected to downloads-static.ironport.com.

Escape character is '^]'.

同样，应该为updates-static.ironport.com看到同样：

> telnet updates-static.ironport.com 80

Trying 208.90.58.25...

Connected to origin-updates.ironport.com.

Escape character is '^]'.

如果您的工具有多个接口，您可以希望从CLI运行telnet，并且指定接口，为了验证适当的接口选择：

> telnet

Please select which interface you want to telnet from.

1. Auto

2. Management (172.18.249.120/24: myesa.local)

[1]>

Enter the remote hostname or IP address.

[]> downloads-static.ironport.com

Enter the remote port.

[25]> 80

Trying 208.90.58.105...

Connected to downloads-static.ironport.com.

Escape character is '^]'.

升级

当设法升级时，您可以发现以下回应：

No available upgrades. If the image has already been downloaded it has been de-provisioned from the upgrade server. Delete the downloaded image, if any and run upgrade.

您将要查看在工具上运行AsyncOS的版本并且查看您升级AsyncOS的版本的版本注释。 很可能，没有从您运行到版本您设法升级的版本的升级路径。

如果升级到一个热补丁程序(HP)，早期部署(ED)或者有限部署(LD) AsyncOS版本，您可能需要开支持案件为了请求适当的设置完成，为了您的工具能发现升级路径当必要时。

Related Information

- Cisco电子邮件安全工具-版本注释

- Cisco Web安全工具-版本注释

- Cisco安全管理工具-版本注释

- Technical Support & Documentation - Cisco Systems