目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

故障排除命令

转换集不匹配

ACL 不匹配

一端有加密映射，另一端没有

Crypto 引擎加速卡启用

相关信息

简介

此示例配置允许您在 IPSec 手动密钥设置的帮助下加密 12.12.12.x 和 14.14.14.x 网络之间的数据流。出于测试目的，使用主机 12.12.12.12 至 14.14.14.14 的访问控制列表 (ACL) 和扩展 ping。

仅当 Cisco 设备配置为将数据流加密至不支持 Internet 密钥交换 (IKE) 的另一供应商设备时，才需要手动密钥设置。 如果 IKE 在两个设备上均可配置，则最好使用自动密钥设置。Cisco 设备安全参数索引 (SPI) 采用十进制，但某些供应商的 SPI 采用十六进制。在这种情况下，有时需要进行转换。

先决条件

要求

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco 3640 及 1605 路由器

- Cisco IOS® 软件版本 12.3.3.a

注意：在包含硬件加密适配器的所有平台上，启用硬件加密适配器时不支持手动加密。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络是活的，在您使用指令前请切记您了解所有指令潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- Light 配置

- House 配置

Light 配置

light#show running-config

Building configuration...

Current configuration : 1177 bytes

!

version 12.3

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname light

!

boot-start-marker

boot-end-marker

!

enable password cisco

!

no aaa new-model

ip subnet-zero

!

no crypto isakmp enable

!

!--- IPsec configuration

crypto ipsec transform-set encrypt-des esp-des esp-sha-hmac

!

!

crypto map testcase 8 ipsec-manual

set peer 11.11.11.12

set session-key inbound esp 1001 cipher 1234abcd1234abcd authenticator 20

set session-key outbound esp 1000 cipher abcd1234abcd1234 authenticator 20

set transform-set encrypt-des

!--- Traffic to encrypt

match address 100

!

!

interface Ethernet2/0

ip address 12.12.12.12 255.255.255.0

half-duplex<br>!

interface Ethernet2/1

ip address 11.11.11.11 255.255.255.0

half-duplex

!--- Apply crypto map.

crypto map testcase

!

ip http server

no ip http secure-server

ip classless

ip route 0.0.0.0 0.0.0.0 11.11.11.12

!

!

!--- Traffic to encrypt

access-list 100 permit ip host 12.12.12.12 host 14.14.14.14

!

!

!

!

line con 0

line aux 0

line vty 0 4

login

!

!

!

House 配置

house#show running-config

Current configuration : 1194 bytes

!

version 12.3

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname house

!

!

logging buffered 50000 debugging

enable password cisco

!

no aaa new-model

ip subnet-zero

ip domain name cisco.com

!

ip cef

!

!

no crypto isakmp enable

!

!

!--- IPsec configuration

crypto ipsec transform-set encrypt-des esp-des esp-sha-hmac

!

crypto map testcase 8 ipsec-manual

set peer 11.11.11.11

set session-key inbound esp 1000 cipher abcd1234abcd1234 authenticator 20

set session-key outbound esp 1001 cipher 1234abcd1234abcd authenticator 20

set transform-set encrypt-des

!--- Traffic to encrypt

match address 100

!

!

interface Ethernet0

ip address 11.11.11.12 255.255.255.0

!--- Apply crypto map.

crypto map testcase

!

interface Ethernet1

ip address 14.14.14.14 255.255.255.0

!

ip classless

ip route 0.0.0.0 0.0.0.0 11.11.11.11

no ip http server

no ip http secure-server

!

!

!--- Traffic to encrypt

access-list 100 permit ip host 14.14.14.14 host 12.12.12.12

!

!

line con 0

exec-timeout 0 0

transport preferred none

transport output none

line vty 0 4

exec-timeout 0 0

password cisco

login

transport preferred none

transport input none

transport output none

!

!

end

验证

此部分提供您能使用的确认您的配置功能的信息。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

- show crypto ipsec sa — 显示阶段2安全关联。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

注意：在使用debug命令之前，请参阅有关Debug命令的重要信息。

- debug crypto ipsec — 显示第2阶段的IPsec协商。

- debug crypto engine - 显示已加密的流量。

转换集不匹配

Light 具有 ah-sha-hmac，而 House 具有 esp-des。

*Mar  2 01:16:09.849: IPSEC(sa_request): ,

(key eng. msg.) OUTBOUND local= 11.11.11.11, remote= 11.11.11.12,

local_proxy= 12.12.12.12/255.255.255.255/0/0 (type=1),

remote_proxy= 14.14.14.14/255.255.255.255/0/0 (type=1),

protocol= AH, transform= ah-sha-hmac ,

lifedur= 3600s and 4608000kb,

spi= 0xACD76816(2899798038), conn_id= 0, keysize= 0, flags= 0x400A

*Mar  2 01:16:09.849: IPSEC(manual_key_stuffing):

keys missing for addr 11.11.11.12/prot 51/spi 0.....

ACL 不匹配

在 side_A（“light”路由器）端为内部主机到内部主机，而在 side_B（“house”路由器）端为接口到接口。ACL 必须始终对称（而这些不对称）。

hostname house

match address 101

access-list 101 permit ip host 11.11.11.12 host 11.11.11.11

!

hostname light

match address 100

access-list 100 permit ip host 12.12.12.12 host 14.14.14.14

此输出来自 side_A 启动 ping：

nothing

light#show crypto engine connections active

ID Interface       IP-Address      State  Algorithm           Encrypt  Decrypt

2000 Ethernet2/1     11.11.11.11     set    DES_56_CBC                5        0

2001 Ethernet2/1     11.11.11.11     set    DES_56_CBC                0        0

当 side_A 启动 ping 时，此输出来自 side_B：

house#

1d00h: IPSEC(epa_des_crypt): decrypted packet failed SA identity check

1d00h: IPSEC(epa_des_crypt): decrypted packet failed SA identity check

1d00h: IPSEC(epa_des_crypt): decrypted packet failed SA identity check

1d00h: IPSEC(epa_des_crypt): decrypted packet failed SA identity check

1d00h: IPSEC(epa_des_crypt): decrypted packet failed SA identity check

house#show crypto engine connections active

ID Interface       IP-Address      State  Algorithm           Encrypt  Decrypt

2000 Ethernet0       11.11.11.12     set    DES_56_CBC                0        0

2001 Ethernet0       11.11.11.12     set    DES_56_CBC                0       5

此输出来自 side_B 启动 ping：

side_ B

%CRYPTO-4-RECVD_PKT_NOT_IPSEC: Rec'd packet not an IPSEC packet.

(ip) vrf/dest_addr= /12.12.12.12, src_addr= 14.14.14.14, prot= 1

一端有加密映射，另一端没有

%CRYPTO-4-RECVD_PKT_NOT_IPSEC: Rec'd packet not an IPSEC packet.

(ip) vrf/dest_addr= /14.14.14.14, src_addr= 12.12.12.12, prot= 1

此输出来自具有加密映射的 side_B：

house#show crypto engine connections active

ID Interface       IP-Address      State  Algorithm           Encrypt  Decrypt

2000 Ethernet0       11.11.11.12     set    DES_56_CBC                5        0

2001 Ethernet0       11.11.11.12     set    DES_56_CBC                0        0

Crypto 引擎加速卡启用

1d05h: %HW_VPN-1-HPRXERR: Hardware VPN0/13: Packet

Encryption/Decryption error, status=4098.....

相关信息

- IPsec 协商/IKE 协议

- 技术支持和文档 - Cisco Systems