目录

简介

先决条件

要求

使用的组件

配置

网络图

配置步骤

迁移步骤

验证

故障排除

常见问题

Q. 在新成员被添加后，它是否是可能的添加从M卡的新建的成员到vPC对等体链路，但是留下套件的一个当前F1成员然后删除它？

简介

本文定义了必要的步骤移植从连结7000 F1模块的一条虚拟PortChannel (vPC)对等体链路到M1模块。当F1模块需要为可扩展性或其他原因时，升级此方案也许发生。

先决条件

要求

Cisco 建议您了解以下主题：

- 连结操作系统CLI

- vPC规则

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 连结7000版本6.1.x和以后

- M1/F1系列线卡

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

网络图

对于此测验，蓝线映射彼此通信两台主机的数据路径。

配置步骤

模块3和模块4是N7K-F132XP-15线卡。这是当前配置从vPC观点。

N7K1# show run vpc

version 6.1(2)feature vpc

vpc domain 10

role priority 100

peer-keepalive destination 10.201.254.254 source 10.201.254.253 vrf VPC

peer-gateway

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel20

vpc 20

interface port-channel30

vpc 30

N7K2# show run vpc

version 6.1(2)

feature vpc

vpc domain 10

role priority 200

peer-keepalive destination 10.201.254.253 source 10.201.254.254 vrf VPC

peer-gateway

auto-recovery

interface port-channel1

vpc peer-link

interface port-channel20

vpc 20

interface port-channel30

vpc 30

interface port-channel50

vpc 50

迁移步骤

1. 关闭vPC对等体链路端口通道1。
Int po1

Shut
此操作暂停在第二侧的vPC链路。vPC链路在主要的侧。

2. 关闭端口e3/1和e4/1并且从两个连结模块删除信道组配置。
Int e3/1,e4/1

Shut

No channel-group 1

N7K1# show port-c sum

Flags:  D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

--------------------------------------------------------------------------------

1     Po1(SD)     Eth      NONE      --

20    Po20(SU)    Eth      LACP      Eth3/4(P)

30    Po30(SU)    Eth      LACP      Eth4/4(P)

50    Po50(SD)    Eth      LACP      Eth2/12(D)

100   Po100(RU)   Eth      LACP      Eth2/48(P)

3. 请使用M1端口并且捆绑它到vPC端口通道。请使用模块的7端口，是N7K-M108X2-12L线卡。配置e7/7有相同的配置作为e3/1或e4/1在两边。对于此示例，使用单个端口。在真实世界情况下，将有超过一个端口。然而，同样步骤适用。

interface Ethernet7/7

switchport

switchport mode trunk

channel-group 1 mode active

no shutdown

N7K1# show port-c sum

Flags:   D - Down        P - Up in port-channel (members)

I - Individual  H - Hot-standby (LACP only)

s - Suspended   r - Module-removed

S - Switched    R - Routed

U - Up (port-channel)

M - Not in use. Min-links not met

--------------------------------------------------------------------------------

Group Port-       Type     Protocol  Member Ports

Channel

--------------------------------------------------------------------------------

1     Po1(SD)     Eth      LACP      Eth7/7(D)

20    Po20(SU)    Eth      LACP      Eth3/4(P)

30    Po30(SU)    Eth      LACP      Eth4/4(P)

50    Po50(SD)    Eth      LACP      Eth2/12(D)

100   Po100(RU)   Eth      LACP      Eth2/48(P)

4. 启动在两边的端口通道1。

Int po1

No shut
这启动在第二侧的vPC链路。现在您的对等体链路在M1线卡。

在此测验中，将有在使用辅助路径的流量的一个小中断，当故障切换到主路径。更改窗口为更改的这些类型总是推荐为所有不需要的suprises适应。

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。

常见问题

Q. 在新成员被添加后，它是否是可能的添加从M卡的新建的成员到vPC对等体链路，但是留下套件的当前F1成员然后删除它？

A.对等体链路不可能形成用从不同的卡类型的端口例如M1和F1。