目录

简介

先决条件

要求

使用的组件

规则

配置

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档介绍了针对支持 MUX-PPP 和子网接入协议 (SNAP) 并使用 atm ilmi-pvc-discovery 子接口的 Cisco 6400 通用接入复用器 (UAC) 的配置示例。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

配置

本文档使用以下配置：

思科6400 NRP1

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname Access-6400-NRP1

!

enable password <password>

!

username <username> password 0 <password>

username <username1> password 0 <password1>

username <username2> password 0 <password2>

!

!

!

!

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip domain-name cisco.com

ip name-server 171.68.10.70

!

!

!

bridge irb

!

!

process-max-time 200

!

interface Loopback1

ip address 10.1.1.1 255.255.255.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm ilmi-pvc-discovery subinterface

pvc 0/16 ilmi

!

!

interface ATM0/0/0.1 multipoint

!--- For VPI starting with number 1 (example: 1/34).

no ip directed-broadcast

class-int bridge1

bridge-group 1

!

interface ATM0/0/0.4 multipoint

!--- For VPI starting with number 4 (example: 4/33).

no ip directed-broadcast

class-int router

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

ip address 171.68.186.117 255.255.255.240

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

shutdown

!

interface Virtual-Template1

ip unnumbered Loopback1

no ip directed-broadcast

peer default ip address pool mypool

ppp authentication chap

!

interface BVI1

mac-address

ip address 10.10.33.1 255.255.255.0

no ip directed-broadcast

!

ip local pool mypool 10.1.1.2 10.1.1.200

ip classless

ip route 0.0.0.0 0.0.0.0 171.68.186.113

no ip http server

!

!

vc-class atm bridge1

encapsulation aal5snap

!

vc-class atm router

encapsulation aal5mux ppp Virtual-Template1

tacacs-server host 171.68.201.249

tacacs-server last-resort succeed

tacacs-server optional-passwords

tacacs-server extended

!

bridge 1 protocol ieee

bridge 1 route ip

!

line con 0

transport input none

line aux 0

line vty 0 4

password xxxxxx

login local

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

show atm pvc 命令输出

Access-6400-NRP1# show atm pvc

VCD /               Peak Avg/Min Burst

Interface  Name  VPI  VCI  Type  Encaps  SC  Kbps  Kbps  Cells  Sts

0/0/0         2    0   16  PVC     ILMI  UBR 155000              UP

0/0/0.1       7    1   34  PVC-D   SNAP  UBR 155000              UP

!--- Snap (bridge). !--- Subinterface 1 took VPI .

0/0/0.4       8    4   33  PVC-D    MUX  UBR 155000              UP

!--- mux (ppp) !--- Subinterface 4 took VPI 4.

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

调试 ATM 事件

以下输出显示节点路由处理器(NRP)从节点交换处理器(NSP)获取的虚拟路径标识符/虚拟通道标识符(VPI/VCI)。

Access-6400-NRP1# debug atm events

ATM events debugging is on

Shut/no Shut on main ATM0/0/0 interface

Access-6400-NRP1#

*Dec 16 15:51:43.667: ATM0/0/0 nrp_sarmgr_shutdown: state=0

*Dec 16 15:51:44.515: Resetting ATM0/0/0

*Dec 16 15:51:45.015: Resetting ATM0/0/0

*Dec 16 15:51:45.015: nrp_sarmgr_config(ATM0/0/0)

*Dec 16 15:51:45.015: nrp_sarmgr_enable(ATM0/0/0

*Dec 16 15:51:45.215: nrp_sarmgr_enable(ATM0/0/0): restarting VCs: 0

*Dec 16 15:51:45.215: nrp_sarmgr_setup_vc(ATM0/0/0): vc:2 vpi:0 vci:16

*Dec 16 15:51:45.223: %SYS-5-CONFIG_I: Configured from console by console

*Dec 16 15:51:45.667: %LINK-3-UPDOWN: Interface ATM0/0/0, changed state to up

*Dec 16 15:51:46.667: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM0/0/0,

changed state to up

*Dec 16 15:51:47.219: %LINK-3-UPDOWN: Interface BVI1, changed state to up

*Dec 16 15:51:47.471: Reserved bw for 1/34 Available bw = 155000

*Dec 16 15:51:47.471: nrp_sarmgr_setup_vc(ATM0/0/0): vc:13 vpi:1 vci:34

*Dec 16 15:51:47.475: Reserved bw for 4/33 Available bw = 155000

*Dec 16 15:51:47.527: nrp_sarmgr_setup_vc(ATM0/0/0): vc:14 vpi:4 vci:33

*Dec 16 15:51:48.219: %LINEPROTO-5-UPDOWN: Line protocol on Interface BVI1,

changed state to up

*Dec 16 15:51:49.019: nrp_sarmgr_teardown_vc(ATM0/0/0): vc:13 vpi:1 vci:34

*Dec 16 15:51:49.179: nrp_sarmgr_teardown_vc(ATM0/0/0): vc:14 vpi:4 vci:33

*Dec 16 15:51:49.339: PPP-ATM(Virtual-Access1) deleting vaccess on VC 14

*Dec 16 15:51:49.351: %LANE-6-INFO: ATM0/0/0: ILMI prefix add event received

*Dec 16 15:51:49.659: Reserved bw for 1/34 Available bw = 155000

*Dec 16 15:51:49.659: nrp_sarmgr_setup_vc(ATM0/0/0): vc:15 vpi:1 vci:34

*Dec 16 15:51:49.659: Reserved bw for 4/33 Available bw = 155000

*Dec 16 15:51:49.715: nrp_sarmgr_setup_vc(ATM0/0/0): vc:16 vpi:4 vci:33

*Dec 16 15:51:55.419: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

Access-6400-NRP1#

IP 路由模式中的 Cisco 675 的 PPP Debug输出

Success rate is 0 percent (0/5)

Access-6400-NRP1#

*Dec 16 15:38:03.439: Vi1 LCP: I CONFREQ [Open] id 42 len 14

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0xA60C0000 (0x0506A60C0000)

*Dec 16 15:38:03.439: Vi1 LCP: MRU 2048 (0x01040800)

*Dec 16 15:38:03.439: Vi1 IPCP: State is Closed

*Dec 16 15:38:03.439: Vi1 PPP: Phase is ESTABLISHING

*Dec 16 15:38:03.439: Vi1 LCP: O CONFREQ [Open] id 132 len 15

*Dec 16 15:38:03.439: Vi1 LCP: AuthProto CHAP (0x0305C22305)

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0x30995E50 (0x050630995E50)

*Dec 16 15:38:03.439: Vi1 LCP: O CONFACK [Open] id 42 len 14

*Dec 16 15:38:03.439: Vi1 LCP: MagicNumber 0xA60C0000 (0x0506A60C0000)

*Dec 16 15:38:03.439: Vi1 LCP: MRU 2048 (0x01040800)

*Dec 16 15:38:03.443: Vi1 IPCP: Remove route to 10.1.1.2

*Dec 16 15:38:03.443: Vi1 LCP: I CONFACK [ACKsent] id 132 len 15

*Dec 16 15:38:03.443: Vi1 LCP: AuthProto CHAP (0x0305C22305)

*Dec 16 15:38:03.443: Vi1 LCP: MagicNumber 0x30995E50 (0x050630995E50)

*Dec 16 15:38:03.447: Vi1 LCP: State is Open

*Dec 16 15:38:03.447: Vi1 PPP: Phase is AUTHENTICATING, by this end

*Dec 16 15:38:03.447: Vi1 CHAP: O CHALLENGE id 4 len 37 from "Access-6400-NRP1"

*Dec 16 15:38:03.451: Vi1 CHAP: I RESPONSE id 4 len 26 from "cisco"

*Dec 16 15:38:03.451: Vi1 CHAP: O SUCCESS id 4 len 4

*Dec 16 15:38:03.451: Vi1 PPP: Phase is UP

*Dec 16 15:38:03.451: Vi1 IPCP: O CONFREQ [Closed] id 5 len 16

*Dec 16 15:38:03.451: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.451: Vi1 IPCP: Type20 (0x900600000000)

*Dec 16 15:38:03.455: Vi1 IPCP: I CONFREQ [REQsent] id 43 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.2 (0x03060A010102)

*Dec 16 15:38:03.455: Vi1 IPCP: O CONFACK [REQsent] id 43 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.2 (0x03060A010102)

*Dec 16 15:38:03.455: Vi1 IPCP: I CONFREJ [ACKsent] id 5 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Type20 (0x900600000000)

*Dec 16 15:38:03.455: Vi1 IPCP: O CONFREQ [ACKsent] id 6 len 10

*Dec 16 15:38:03.455: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.463: Vi1 IPCP: I CONFACK [ACKsent] id 6 len 10

*Dec 16 15:38:03.463: Vi1 IPCP: Address 10.1.1.1 (0x03060A010101)

*Dec 16 15:38:03.463: Vi1 IPCP: State is Open

*Dec 16 15:38:03.463: Vi1 IPCP: Install route to 10.1.1.2

show 命令输出

Access-6400-NRP1# show user

Line       User      Host(s)            Idle Location

* 0        con 0     idle               00:00:00

Vi1                  Virtual PPP (ATM)  00:06:45

Interface  User      Mode               Idle Peer Address

Access-6400-NRP1# show interface atm 0/0/0 accounting

ATM0/0/0

Protocol       Pkts In    Chars In  Pkts Out   Chars Out

Trans. Bridge        0           0         3         222

Spanning Tree        0           0      1384       65048

PPP over ATM       358        6646       605       11657

Access-6400-NRP1# show interface atm 0/0/0

ATM0/0/0 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, sub MTU 4470, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM, loopback not supported

Keepalive not supported

Encapsulation(s): AAL5, PVC mode

2047 maximum active VCs, 3 current VCCs

VC idle disconnect time: 300 seconds

Last input 00:09:37, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

1307 packets input, 57832 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

2876 packets output, 123055 bytes, 0 underruns

0 output errors, 0 collisions, 3 interface resets

0 output buffer failures, 0 output buffers swapped out

Access-6400-NRP1#

Access-6400-NRP1#

Access-6400-NRP1#

Access-6400-NRP1# show interface atm 0/0/0.1

ATM0/0/0.1 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM

0 packets input, 0 bytes

1392 packets output, 59937 bytes

0 OAM cells input, 0 OAM cells output

Access-6400-NRP1# show interface atm 0/0/0.4

ATM0/0/0.4 is up, line protocol is up

Hardware is ATM-SAR

MTU 4470 bytes, BW 156250 Kbit, DLY 80 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ATM

705 packets input, 11705 bytes

615 packets output, 9415 bytes

0 OAM cells input, 0 OAM cells output

Access-6400-NRP1# show atm vc 15

ATM0/0/0.1: VCD: 15, VPI: 1, VCI: 34

UBR, PeakRate: 155000

AAL5-LLC/SNAP, etype:0x0, Flags: 0xC20, VCmode: 0x0

OAM frequency: 0 second(s)

InARP frequency: 15 minutes(s)

InPkts: 0, OutPkts: 321, InBytes: 0, OutBytes: 13803

InPRoc: 0, OutPRoc: 321, Broadcasts: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

Access-6400-NRP1#

Access-6400-NRP1# show atm vc 16

ATM0/0/0.4: VCD: 16, VPI: 4, VCI: 33

UBR, PeakRate: 155000

AAL5-MUX, etype:0x9, Flags: 0xC23, VCmode: 0x0

OAM frequency: 0 second(s)

InARP DISABLED

InPkts: 6, OutPkts: 143, InBytes: 48, OutBytes: 2420

InPRoc: 3, OutPRoc: 143

InFast: 0, OutFast: 0, InAS: 3, OutAS: 0

OAM cells received: 0

OAM cells sent: 0

Status: UP

PPP: Virtual-Access1 from Virtual-Template1

Access-6400-NRP1#

Access-6400-NRP1# show interface virtual-access 1

Virtual-Access1 is up, line protocol is down

Hardware is Virtual Access interface

Interface is unnumbered. Using address of Loopback1 (10.1.1.1)

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

DTR is pulsed for 5 seconds on reset

LCP REQsent

Closed: IPCP

Bound to ATM0/0/0.4 VCD: 16, VPI: 4, VCI: 33

Cloned from virtual-template: 1

Last input 00:12:07, output never, output hang never

Last clearing of "show interface" counters 00:12:18

Queueing strategy: fifo > Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

3 packets input, 18 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

158 packets output, 2675 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Access-6400-NRP1#

相关信息

- DSL技术支持

- 产品支持

- 技术支持 - Cisco Systems