目录

简介

先决条件

要求

使用的组件

规则

一个 MAC 地址

SRP接口的程序MAC地址

一端口 OC48 和 OC192 SRP 板

如何管理数据发送

结论

相关信息

简介

空间重用协议(SRP)是思科开发的MAC层协议，用于环配置。SRP环由两根反向旋转光纤组成，称为外环和内环。两者同时用于传输数据和控制数据包。控制数据包（如保持连接、保护交换和带宽控制传播）从对应的数据包沿相反方向传播，以确保数据采用到其目的地的最短路径。双光纤环提供高级别的数据包生存能力。如果节点出现故障或光纤中断，数据将通过备用环传输。拓扑数据包在外环上传输，除非环上的某个节点处于包状态。

本文档介绍SRP接口关系，这是误解MAC地址的最常见原因。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

一个 MAC 地址

任何SRP线卡(LC)上的一个SRP接口有两个MAC，但只有一个MAC地址。这两个MAC实际上构成一个由A侧和B侧组成的SRP接口。

请参阅以下show interface示例输出：

- 一方面：外环Rx，内环Tx

- B侧。外环Tx、内环Rx

例如：

Node2#show interface srp 4/0

SRP4/0 is up, line protocol is up

Hardware is SRP over SONET, address is 0000.4142.8799 (bia 0000.4142.8799)

Internet address is 9.64.1.35/24

MTU 4470 bytes, BW 622000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation SRP,

Side A: loopback not set

Side B: loopback not set

3 nodes on the ring   MAC passthrough not set

Side A: not wrapped   IPS local: SF  IPS remote: IDLE

Side B:     wrapped   IPS local: IDLE  IPS remote: IDLE

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 1 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

356572 packets input, 7674965 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

112289 input errors, 54938 CRC, 0 frame, 0 overrun, 0 ignored, 57351 abort

1943503 packets output, 67532068 bytes, 0 underruns

0 output errors, 0 collisions, 1 interface resets

0 output buffer failures, 0 output buffers swapped out

SRP接口的程序MAC地址

在show interface输出中，MAC地址为0000.4142.8799。它与此SRP接口的内置MAC地址(BIA)相同。您还可以对它进行编程，使其具有自定义值，如show srp topology输出中列出的MAC地址。

例如：

Node2#configure terminal

Node2(config)#interface srp 4/0

Node2(config-if)#mac-address 0.0.2

Node2#show interface srp 4/0h

SRP4/0 is up, line protocol is up

Hardware is SRP over SONET, address is 0000.0000.0002 (bia 0000.4142.8799)

Internet address is 9.64.1.35/24

MTU 4470 bytes, BW 622000 Kbit, DLY 100 usec, rely 255/255, load 1/255

Encapsulation SRP,

Side A: loopback not set

Side B: loopback not set

3 nodes on the ring   MAC passthrough not set

Side A: not wrapped   IPS local: SF  IPS remote: IDLE

Side B:     wrapped   IPS local: IDLE  IPS remote: IDLE

Last input 00:00:00, output 00:00:00, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

您可以将SRP接口的MAC地址编程为show srp topology输出中列出的地址。

Node2#show srp topology

Topology Map for Interface SRP4/0

Topology pkt. sent every 5 sec. (next pkt. after 0 sec.)

Last received topology pkt. 00:00:04

Last topology change was 00:00:09 ago.

Nodes on the ring: 3

Hops (outer ring)      MAC       IP Address      Wrapped SRR   Name

0             0000.0000.0002 9.64.1.35         Yes     -   Node2

1             0007.0dec.a300 9.64.1.36         No      -   Node3

2             0010.f60d.7a00 9.64.1.34         Yes     -   Node1

一端口 OC48 和 OC192 SRP 板

SRP LC上的任何SRP接口都有两个MAC，但只有一个MAC地址。对于单端口OC48和OC192 SRP卡，它是相同的。唯一的区别是接口的A和B侧位于两个相邻插槽中。有两个插槽，用于一个SRP接口。A侧始终是编号较小的插槽，B侧是编号较大的插槽。

如何管理数据发送

数据始终采用到达目的地的最短路径。源流量的节点知道由于SRP拓扑信息而到达目的地的最短路径。源节点通过较短的端发送流量，因为目的地具有接口A和B端的唯一MAC地址。

该图以及show topology和show arp命令输出显示了SRP环的示例。

Node1#show srp topology

Topology Map for Interface SRP4/0

Topology pkt. sent every 5 sec. (next pkt. after 2 sec.)

Last received topology pkt. 00:00:02

Last topology change was 00:07:27 ago.

Nodes on the ring: 3

Hops (outer ring)      MAC       IP Address      Wrapped SRR   Name

0             0010.f60d.7a00 9.64.1.34         No      -   Node1

1             0000.4142.8799 9.64.1.35         No      -   Node2

2             0007.0dec.a300 9.64.1.36         No      -   Node3

Node1#show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  9.64.1.34               -   0010.f60d.7a00  SRP-B  SRP4/0

Internet  9.64.1.35               4   0000.4142.8799  SRP-B  SRP4/0

Internet  9.64.1.36               4   0007.0dec.a300  SRP-A  SRP4/0

Internet  10.48.70.19           145   0060.4741.0432  ARPA   Ethernet0

Internet  10.48.70.12           145   0000.0c4a.dcb8  ARPA   Ethernet0

如本例所示，如果环中的Node1和Node2之间有光纤切口，则show topology和show arp输出如下所示：

Node1#show srp topology

Topology Map for Interface SRP4/0

Topology pkt. sent every 5 sec. (next pkt. after 2 sec.)

Last received topology pkt. 00:00:02

Last topology change was 00:02:02 ago.

Nodes on the ring: 3

Hops (outer ring)      MAC       IP Address      Wrapped SRR   Name

0             0010.f60d.7a00 9.64.1.34         Yes     -   Node1

1             0000.4142.8799 9.64.1.35         Yes     -   Node2

2             0007.0dec.a300 9.64.1.36         No      -   Node3

Node1#show arp

Protocol  Address          Age (min)  Hardware Addr   Type   Interface

Internet  9.64.1.34               -   0010.f60d.7a00  SRP-B  SRP4/0

Internet  9.64.1.35               9   0000.4142.8799  SRP-A  SRP4/0

Internet  9.64.1.36              10   0007.0dec.a300  SRP-A  SRP4/0

Internet  10.48.70.19           151   0060.4741.0432  ARPA   Ethernet0

Internet  10.48.70.12           151   0000.0c4a.dcb8  ARPA   Ethernet0

本示例显示，源节点选择到目的地的较短路由，并根据show srp拓扑信息通过接口的A侧或B侧发送。

结论

对于每个SRP接口，有两个Tx和Rx对。一对形成A侧，另一对形成接口B侧。此接口有一个唯一MAC地址，即使它有两个MAC覆盖每个Tx和Rx对。

相关信息

- 空间复用协议技术

- 动态数据包传输(DPT)/空间复用协议(SRP)线卡安装和配置说明

- 光技术支持页面

- 技术支持和文档 - Cisco Systems