目录

简介

先决条件

要求

使用的组件

规则

拓扑

构建四节点RPR

确认

第 1 步

步骤 2

步骤 3

步骤 4

相关信息

简介

本文档介绍在Cisco ONS 15454上通过多层(ML)卡构建具有四个节点的弹性分组环(RPR)的配置。

先决条件

要求

Cisco 建议您了解以下主题：

- Cisco ONS 15454

- Cisco ONS 15454 ML-Series以太网卡

- Cisco IOS®软件

- 桥接和IP路由

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行ONS版本5.02的Cisco ONS 15454

- 运行Cisco IOS软件版本12.2的ML（作为ONS 5.02版本的一部分捆绑）。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

拓扑

本文档使用包含四个ONS 15454节点（即Studio节点1、Studio节点2、Studio节点3和Studio节点4）的实验室设置(请参见图1)。 这四个节点组成一个OC48单向路径交换环(UPSR)。

注意：为便于理解，本文档的其余部分将这些节点称为节点1、节点2、节点3和节点4。

图1 -拓扑

每个节点在插槽6中安装一个ML 100T卡(请参见图2)。

图2 — 节点视图：插槽6中的ML 100T卡

图3显示了RPR环拓扑。RPR设置基于此拓扑。

图3 - RPR环拓扑

构建四节点RPR

要构建具有四个节点的RPR，请完成以下步骤：

1. 在节点1上的POS 1和节点2上的POS 0之间建立电路。

请完成以下步骤：

1. 选择“电路”>“创建”。

系统将显示“电路创建”对话框：

图4 — 电路创建

2. 选择STS，然后单击Next。

出现“Circuit Attributes（电路属性）”窗口(请参阅图5)。

3. 在Name字段中键入电路名称。

图5 — 电路属性窗口

4. 从“大小”(Size)列表中选择电路的相关大小，从“状态”(State)列表中选择相应的状态。

5. 单击 Next。

出现“Source（源）”窗口(参见图6)。

6. 从“节点”列表中选择“Studio节点1”作为源节点。

7. 从插槽列表中选择6(ML100T)，从端口列表中选择1(POS)。

注意：始终从pos 0开始振铃到pos 1。

图6 — 源窗口

8. 单击 Next。

出现“Destination（目标）”窗口(请参阅图7)。

9. 从“节点”列表中选择“Studio节点2”作为目标节点。

10. 从插槽列表中选择6(ML100T)，从端口列表中选择1(POS)。

图7 — 目标窗口

11. 单击 Next。

出现“Circuit Routing Preferences（电路路由首选项）”窗口(请参阅图8)。

当RPR执行保护时，取消选中Fully Protected Path复选框。您可以选中“自动路由”或手动路由电路。如果选择手动路由，请转至步骤m。

12. 取消选中完全保护路径复选框。

图8 — 电路路由首选项窗口

13. 单击 Next。

出现“Route Review/Edit（路由查看/编辑）”窗口(请参阅图9)。

14. 选择源节点，然后单击“添加Span”。

15. 单击 完成。

电路创建完成。图9显示了节点1上的POS 1和节点2上的POS 0之间的电路。

图9 — 节点1上POS1与节点2上POS0之间的电路

2. 在节点2上的POS 1和节点3上的POS 0之间建立电路。

使用步骤1中描述的相同详细步骤。图10显示了节点2上POS 1和节点3上POS 0之间的电路。

图10 — 节点2上POS 1和节点3上POS 0之间的电路

3. 同样，在节点3上的POS 1和节点4上的POS 0之间建立电路。

使用步骤1中描述的相同详细过程。图11显示了节点3上POS 1和节点4上POS 0之间的电路。

图11 — 节点3上POS 1和节点4上POS 0之间的电路

4. 最后，在节点4上的POS 1和节点1上的POS 0之间建立电路。

使用步骤1中描述的相同详细步骤。图12显示了节点4上POS 1和节点1上POS 0之间的电路。

图12 — 节点4上POS 1到节点1上POS 0之间的电路

5. 在节点1上配置ML100T卡。

请完成以下步骤：

1. 打开集成桥接和路由(IRB)。

bridge irb

2. 配置SRP接口：

interface SPR1

ip address 10.1.1.1 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 1

spr wrap delayed

hold-queue 150 in

3. 配置接口POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置接口POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

6. 在节点2上配置ML100T卡。

请完成以下步骤：

1. 打开集成桥接和路由(IRB)。

bridge irb

2. 配置SRP接口：

interface SPR1

ip address 10.1.1.2 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 2

spr wrap delayed

hold-queue 150 in

3. 配置接口POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置接口POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

7. 在节点3上配置ML100T卡。

请完成以下步骤：

1. 打开集成桥接和路由(IRB)。

bridge irb

2. 配置SRP接口：

interface SPR1

ip address 10.1.1.3 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 3

spr wrap delayed

hold-queue 150 in

3. 配置接口POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置接口POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

8. 在节点4上配置ML100T卡。

请完成以下步骤：

1. 打开集成桥接和路由(IRB)。

bridge irb

2. 配置SRP接口：

interface SPR1

ip address 10.1.1.4 255.0.0.0

carrier-delay msec 50

no keepalive

spr station-id 4

spr wrap delayed

hold-queue 150 in

3. 配置接口POS0:

interface POS0

no ip address

carrier-delay msec 50

spr-intf-id 1

crc 32

4. 配置接口POS1:

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

确认

要验证配置，必须成功从每个其他节点ping每个节点。本部分提供分步验证过程，以确保配置正确。

第 1 步

请完成以下步骤：

1. 从节点1对节点2、节点3和节点4执行ping操作：

Node_1_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/11/32 ms

Node_1_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/8/24 ms

Node_1_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/8 ms

2. 发出show cdp neighbor命令。

Node_1_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              137          R       ONS-ML100TSPR1

Node_3_Slot_6   SPR1              162         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              128          R       ONS-ML100TSPR1

步骤 2

接下来，完成以下步骤：

1. 从节点2，成功ping节点1、节点3和节点4。

Node_2_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

Node_2_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/8 ms

Node_2_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/4/8 ms

2. 发出show cdp neighbor命令。

Node_2_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              175          R       ONS-ML100TSPR1

Node_1_Slot_6   SPR1              171         R T      ONS-ML100TSPR1

Node_3_Slot_6   SPR1              141         R T      ONS-ML100TSPR1

步骤 3

请完成以下步骤：

1. 从节点3，成功ping节点1、节点2和节点4。

Node_3_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/8/12 ms

Node_3_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/12 ms

Node_3_Slot_6#ping 10.1.1.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.4, timeout is 2 seconds:

!!!!!

Success rate is 80 percent (4/5), round-trip min/avg/max = 4/5/8 ms

2. 发出show cdp neighbor命令。

Node_3_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_4_Slot_6   SPR1              170          R       ONS-ML100TSPR1

Node_1_Slot_6   SPR1              166         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              161          R       ONS-ML100TSPR1

步骤 4

最后，完成以下步骤：

1. 从节点4，成功ping节点1、节点2和节点3。

Node_4_Slot_6#ping 10.1.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

Node_4_Slot_6#ping 10.1.1.2

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.2, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/5/8 ms

Node_4_Slot_6#ping 10.1.1.3

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.1.3, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 4/6/12 ms

2. 发出show cdp neighbor命令。

Node_4_Slot_6#show cdp neighbor

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone

Device ID       Local Intrfce    Holdtme   Capability  Platform  Port ID

Node_1_Slot_6   SPR1              152         R T      ONS-ML100TSPR1

Node_3_Slot_6   SPR1              122         R T      ONS-ML100TSPR1

Node_2_Slot_6   SPR1              147          R       ONS-ML100TSPR1

相关信息

- 技术支持和文档 - Cisco Systems