目录

简介

先决条件

要求

使用的组件

规则

拓扑

添加一个节点

最终配置

ML 1

ML 2

ML 3

相关信息

简介

本文档介绍在Cisco ONS 15454的ML卡上向弹性分组环(RPR)添加一个或多个节点的过程。

先决条件

要求

Cisco 建议您了解以下主题：

- Cisco ONS 15454

- Cisco ONS 15454 ML-Series以太网卡

- Cisco IOS®软件

- 桥接和IP路由

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行ONS版本4.1.3的Cisco ONS 15454。

- 运行Cisco IOS软件版本12.1(19)EO1的ML（作为ONS 4.1.3版本的一部分捆绑）。

注意：本文档中的配置基于RPR桥接解决方案。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

拓扑

弹性分组环(RPR)是基于标准的第2层架构，针对突发数据流量进行了优化。RPR支持基于环的架构，无需以太网生成树或SONET/SDH保护方案，同时仍为以太网和IP服务提供低于50毫秒的环融合时间。RPR提供SONET类型的保护，无需保留带宽。RPR可以与SONET保护一起使用，也可以不使用SONET保护。ML卡上的RPR在SONET分组(POS)接口和以太网接口之间引入了另一个点。共享数据包环(SPR)接口是提供此链路的虚拟接口。对于RPR，两个POS端口都充当SPR接口的成员。SPR接口自动执行保护包装。

图1表示ONS 15454节点上POS端口之间的两条电路。每个ML卡上的单个SPR1接口处理RPR功能。

图1 — 两个节点弹性分组环

添加第三个节点后，SONET上15454个节点的POS端口之间有三条电路(见图2)。

图2 — 三节点弹性分组环

添加一个节点

要向RPR添加一个节点，请完成以下步骤：

1. 关闭ML1上面向要添加新节点的跨度的POS端口。端口为POS 1:

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. 关闭ML2上面向要添加新节点的跨度的POS端口。在本例中，端口为POS 0:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. 删除RPR的相邻节点之间的同步传输信号(STS)路径(见图3)。

图3 — 删除STS路径

4. 验证RPR上是否仍存在以太网连接（使用客户的测试集和路由表）。

5. 添加新节点(假设已为目标标识符(TID)、IP地址、SONET端口IS、SONET数据通信通道(SDCC)启用等调配节点)。

6. 将ML配置上传到新节点(ML 3)。 请参阅最终配置部分的ML 3配置。

7. 构建两条新电路（并确保选择IS作为电路状态），从ML2的POS 0到ML3的POS 1，从ML3的POS 0到ML1的POS 1(请参阅图4)。 检查审核日志，查看电路是在ADMIN_IS还是ADMIN_OOS中。

图4 — 添加两条新电路

8. 对ML 1中面向新节点的POS 1端口执行no shutdown:

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. 对ML 2中面向新节点的POS 0端口执行no shutdown:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. 验证RPR上是否仍存在以太网连接（使用客户的测试集和路由表）

11. 在节点插入后监控以太网流量至少一小时。

最终配置

本节提供ML 1、ML 2和ML3的最终配置。

ML 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

ML 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

ML 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

相关信息

- 配置弹性数据包环

- 技术支持和文档 - Cisco Systems