目录

简介

先决条件

要求

使用的组件

DSL接口上的参考带宽

相关信息

简介

本文档介绍数字用户线路(DSL)接口上参考带宽的概念。还讨论了在DSL控制器和接口下看到的值的差异。

作者：Richika Jain，Cisco TAC工程师。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于Cisco路由器，它支持DSL连接，如超高比特率数字用户线(VDSL)、对称高速数字用户线(SHDSL)、接入端非对称数字用户线(ADSL)。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

DSL接口上的参考带宽

在DSL中，与其他介质不同，上行和下行带宽有差异。

例如，对于E1，上行2.048 mb，下行2.048 mb，当路由器计算txload和重新加载时，它会将其作为上游和下行的2.048 mb的一小部分，并以255的比例将其规范化并显示。因此，如果接口下的输入速率是2048000，您将看到rxload为255/255。

现在，当涉及到DSL时，路由器需要参考带宽值来进行相同的计算。但这里有两个带宽，上游和下游。接口下显示的带宽为上游带宽。

Ethernet0/0/0 is up, line protocol is up

Hardware is VDSL_ETHERNET, address is 3033.199e.1948

MTU 1500 bytes, BW 9998 Kbit/sec, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation 802.1Q Virtual LAN, Vlan ID  1., loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 05:00:00

Last input 3w6d, output 00:00:00, output hang never

Last clearing of "show interface" counters 06:15:00

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: fifo

Output queue: 0/1024 (size/max)

5 minute input rate 2850000 bits/sec, 420 packets/sec

5 minute output rate 5749000 bits/sec, 1747 packets/sec

3887957 packets input, 3183892807 bytes, 0 no buffer

Received 0 broadcasts (0 IP multicasts)

0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1573 packets output, 100231 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 unknown protocol drops

0 babbles, 0 late collision, 0 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

此处选择上游带宽作为参考带宽的原因是QoS策略在输出方向使用的时间大多数，并且需要准确的参考带宽。

在VDSL控制器的此输出中，有两种速度值：Eachable Rate和Speed（上行和下行）。 Speed是ISP培训线路的值，Eachable Rate是VDSL电路的最大速度。

n3-ne-r-hi-435773-01#sh controller vdsl 0/1/0 | i Speed|Attainable

Attainable Rate:        40440 kbits/s            3280 kbits/s

Speed (kbps):             0            25087             0              3192

VDSL控制器的完整输出：

Router#show controller vdsl 0/1/0

Controller VDSL 0/1/0 is UP

Daemon Status:         Up

XTU-R (DS)        XTU-C (US)

Chip Vendor ID:        'BDCM'             'BDCM'

Chip Vendor Specific:   0x0000             0xA1AA

Chip Vendor Country:    0xB500             0xB500

Modem Vendor ID:        'CSCO'             '    '

Modem Vendor Specific:  0x4602             0x0000

Modem Vendor Country:   0xB500             0x0000

Serial Number Near:     FOC15163V2Q 2911/K9 15.5(1)T

Serial Number Far:

Modem Version Near:     15.5(1)T

Modem Version Far:      0xa1aa

Modem Status:         TC Sync (Showtime!)

DSL Config Mode:     AUTO

Trained Mode:        G.993.2 (VDSL2) Profile 17a

TC Mode:             PTM

Selftest Result:     0x00

DELT configuration:  disabled

DELT state:          not running

Full inits:          1

Failed full inits:   0

Short inits:         0

Failed short inits:  0

Firmware    Source        File Name

--------    ------        ----------

VDSL        embedded       VDSL_LINUX_DEV_01212008

Modem FW  Version:    130205_1433-4.02L.03.B2pvC035j.d23j

Modem PHY Version:    B2pvC035j.d23j

Trellis:         ON              ON

SRA:              disabled         disabled

SRA count:          0             0

Bit swap:          enabled         enabled

Bit swap count:     0             0

Line Attenuation:        0.0 dB          0.0 dB

Signal Attenuation:      0.0 dB          0.0 dB

Noise Margin:           11.1 dB          6.0 dB

Attainable Rate:       40440 kbits/s    3280 kbits/s

Actual Power:           14.5 dBm          4.9 dBm

Per Band Status:        D1      D2      D3      U0     U1     U2     U3

Line Attenuation(dB):   20.0    48.3    73.7    9.4    37.9   56.2   N/A

Signal Attenuation(dB): 20.0    48.3    N/A    10.2    36.2   53.3   N/A

Noise Margin(dB):       10.9    11.3    N/A     5.9    6.0    6.0    N/A

Total FECC:        97252         0

Total ES:          7             0

Total SES:         0             0

Total LOSS:        0             0

Total UAS:        24             24

Total LPRS:        0             0

Total LOFS:        0             0

Total LOLS:        0             0

!--- DSL trained speed can be found below

DSChannel1   DSChannel0    US Channel1   US Channel0

Speed (kbps):              0           25087             0            3192

SRA Previous Speed:        0               0             0               0

Previous Speed:            0               0             0               0

Reed-Solomon EC:           0           97252             0               0

CRC Errors:                0              15             0               0

Header Errors:             0              62             0               0

Interleave (ms):        0.00            8.00          0.00            8.00

Actual INP:             0.00            3.01          0.00            2.00

Training Log :    Stopped

Training Log Filename :    flash:vdsllog.bin

n对于txload和rxload计算，它使用相同的参考带宽（即上游带宽）。因此，当例如输入流量速率为9998000时，您会看到rxload为255/255，当输入速率高于(20 mb，30 mb)时，它显示rxloadload 255/255。因此，在默认参考带宽下，显示的rxload值不会始终准确。但是，它不会对您接收的实际带宽/速度或吞吐量产生任何影响。

如果要出于QoS目的更改它，可以在接口下使用bandwidth命令更改它。但是，无论bandwidth命令设置为什么值，接口都不会更改其传输速度。

相关信息

- Cisco DSL路由器配置与故障排除指南- PPPoA实施选择

- Cisco DSL 路由器配置与故障排除指南

- 技术支持和文档 - Cisco Systems