目录

简介

先决条件

要求

使用的组件

规则

要执行的任务

PC 上可能需要的配置步骤

配置

配置

验证

故障排除

相关信息

简介

您的互联网服务提供商有已分配一个单独的静态公有IP地址到您的Cisco数字用户线路DSL路由器。

提示：如果您不熟悉思科设备的配置方法，且希望逐步进行配置，请参阅使用静态 IP 地址逐步配置 PPPoE。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

要执行的任务

- 设计一个您的专用LAN的编址方案。

- 在思科 DSL 路由器以太网接口上配置 IP 地址、子网掩码和 TCP 最大报文段长度 (MSS) 调整。

- 配置拥有ATM永久虚拟电路(PVC)和封装的Cisco DSL路由器上的ATM接口(非对称数字用户线(ADSL)接口)。

- 为高于 12.2(13)T 版本的思科 IOS® 软件配置以太网点对点协议 (PPPoE) 虚拟专用数据网络 (VPDN) 组。

- 使用静态 IP 地址为 PPPoE 创建并配置思科 DSL 路由器的拨号接口。

- 对于网络地址转换(NAT) ：在Cisco DSL路由器上配置NAT，以允许共享拨号接口的动态公用IP地址。

- 可选：NAT池，如果您的ISP提供了额外的IP地址。

- 可选：静态NAT，如果互联网用户需要对内部服务器的访问。

- 使用 IP 地址、子网掩码、默认网关和域名系统 (DNS) 服务器配置每个 PC 客户端。

对动态主机配置协议(DHCP) ：或者，如果您希望由思科 DSL 路由器分配您的 PC 客户端动态 IP 地址，请配置每台 PC 以通过 DHCP 自动获取 IP 地址和 DNS 服务器地址。

PC 上可能需要的配置步骤

如果您的思科 DSL 路由器软件支持 ip tcp adjust-mss 1452 或 ip adjust-mss 1452 配置命令，则无需进一步操作，您即可继续执行配置部分的操作。

如果您的思科 DSL 路由器软件不支持 ip tcp adjust-mss 1452 或 ip adjust-mss 1452 配置命令，则您必须对通过思科 DSL 路由器访问互联网的 LAN 中的每台 PC 更改最大传输单元 (MTU) 大小。完成这些步骤以更改 MTU 大小。

1. 从http://www.dslreports.com/front/drtcp.html下载Dr. TCP实用程序的最新版本 。

2. 刷新浏览器页面以确保页面为最新页面。

3. 运行 Dr. TCP 实用程序。

4. 从菜单中选择你的以太网适配器；

5. 在MTU字段键入1492；

6. 点击“Apply”保存修改，然后点击“Exit”；

7. 重新启动 PPPoE PC 客户端。

此过程完成后，系统会保存对注册表的更改。因此，每台 PC 只需要运行此实用程序一次。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

配置

提示：如果您不熟悉思科设备的配置方法，且希望逐步进行配置，请参阅使用静态 IP 地址逐步配置 PPPoE。

有静态IP地址的Cisco DSL路由器

!--- Comments contain explanations and additional information.

service timestamps debug datetime msec

service timestamps log datetime msec

vpdn enable

no vpdn logging

vpdn-group pppoe

request-dialin

protocol pppoe

!--- These commands are needed only on Cisco IOS Software earlier than than 12.2(13)T.

!

!

ip subnet-zero

!

!--- For DHCP:

ip dhcp excluded-address

ip dhcp pool

network

default-router

dns-server

!

interface ethernet0

no shut

ip address <ip address> <subnet mask>

ip tcp adjust-mss 1452

!--- If the ip tcp adjust-mss 1452 command is not supported, try this !--- configuration statement: ip adjust-mss 1452. If this command is not !--- supported in your current Cisco DSL Router software release, upgrade to the !--- latest Cisco DSL Router software or follow the procedure in the !--- "Possible Required Configuration Steps on the PC" section of this document.

!--- For NAT:

ip nat inside

no ip directed-broadcast

!

interface atm0

no ip address

bundle-enable

dsl operating-mode auto

!

interface atm0.1 point-to-point

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc <vpi/vci>

pppoe-client dial-pool-number 1

!--- Common PVC values supported by ISPs are 0/35 or 8/35. !--- Confirm your PVC values with your ISP.

!

!

interface dialer1

ip address <ip address> <subnet mask>

mtu 1492

!--- For NAT:

ip nat outside

encapsulation ppp

dialer pool 1

ppp chap hostname <username>

ppp chap password <password>

ppp pap sent-username <username> password <password>

!

!--- For NAT:

ip nat inside source list 1 interface dialer1 overload

!--- If you have a pool (a range) of public IP addresses provided !--- by your ISP, you can use a NAT Pool. Replace !--- ip nat inside source list 1 interface dialer1 overload

!--- with these two configuration statements: !--- ip nat inside source list 1 pool

overload

!--- ip nat pool

!--- netmask

!--- If Internet users require access to an internal server, you can !--- add this static NAT configuration statement: !--- ip nat inside source static tcp

{80 or 25}

!---

{80 or 25} extendable

!--- Note: TCP port 80 (HTTP/web) and TCP port 25 (SMTP/mail) are used !--- for this example. You can open other TCP or UDP ports, if needed.

!

ip classless

ip route 0.0.0.0 0.0.0.0 interface dialer1

!--- For NAT:

access-list 1 permit

!--- In this configuration, access-list 1 defines a standard access list !--- that permits the addresses that NAT translates. For example, if !--- your private IP network is 10.10.10.0, configure !--- access-list 1 permit 10.10.10.0 0.0.0.255 in order to allow NAT to translate !--- packets with source addresses between 10.10.10.0 and 10.10.10.255.

!

end

验证

当前没有可用于此配置的验证过程。

故障排除

如果您的 DSL 服务不能正常工作，请参阅思科 DSL 路由器 PPPoE 客户端故障排除。

相关信息

- 作为 PPPoE 客户端的思科 DSL 路由器的 PPPoE 实施方案

- Cisco DSL 路由器配置与故障排除指南

- 技术支持和文档 - Cisco Systems