目录

简介

开始使用前

规则

先决条件

使用的组件

配置

网络图

配置

验证

故障排除

相关信息

简介

Cisco 1700、2600及3600系列路由器支持非对称数字用户线路(ADSL)广域网接口卡。 所有三个平台的配置基本一样，但是硬件以及每个平台所需Cisco IOS®软件版本不相同。在本文档中，Cisco 1700/2600/3600 将称作“Cisco ADSL WIC”。

该示例配置显示了一个Cisco ADSL WIC连接到一个Cisco 6130数字用户线路访问多路复用器(DSLAM)，终止在一个Cisco 6400通用接入集中器(UAC)。

Cisco ADSL WIC 配置了RFC1483桥接和集成路由和桥接(IRB)，运行网络地址转换(NAT)。

Cisco 6400 ATM接口配置了路由的网桥封装(RBE)。

对Cisco 6400，在Cisco 6400节点路由处理器(NRP)的ATM RBE功能寻址在跨接的从末端桥接LAN的RFC1483以太网流量的IP。

在配置为route-bridged 模式的ATM接口上收到的桥接IP包通过IP报头被路由。界面利用stub LAN结构的特性常用为DSL存取和在IRB上获得更完善的性能和灵活性。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- Cisco 6400 UAC-NRP IOS软件版本12.1(3)DC1

- Cisco 6400 UAC-Node交换机处理器(NSP) IOS软件版本12.1(3)DB

- Cisco 6130 DSLAM-NI2 IOS软件版本12.1(5)DA

- 适用于Cisco 2600上的ADSL WIC — 机箱WIC插槽和NM-2W

- 适用于Cisco 3600上的ADSL WIC - NM-1FE1R2W、NM-1FE2W、NM-2FE2W和NM-2W

注意：对于Cisco 3600，以下不支持ADSL WIC:

- NM-1E1R2W

- NM-1E2W

- NM-2E2W

要支持ADSL WIC，需要以下最低Cisco IOS软件版本：

- Cisco IOS软件版本12.1(5)yb (仅加强版本)在Cisco2600/3600上。

- Cisco 1700上的Cisco IOS软件版本12.1(3)XJ或更高版本（仅Plus版本或ADSL功能集）。ADSL功能集由镜像名称中的"y7"确定;例如， c1700-sy7-mz.121-3.XJ.bin。

当您为Cisco 1700下载镜像时，确定您选择1700镜像名称。不要下载1720或1750镜像;这些功能不支持ADSL WIC。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

配置

本文档使用如下所示的配置。

- Cisco ADSL WIC

- Cisco 6400 NRP — 示例1

- Cisco 6400 NRP — 示例2

Cisco ADSL WIC

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname R1

!

ip subnet-zero

!

bridge irb

!

interface FastEthernet0

ip address 10.0.0.1 255.0.0.0

no ip directed-broadcast

ip nat inside

no ip mroute-cache

!

interface ATM0

no ip address

no ip directed-broadcast

no ip mroute-cache

no atm ilmi-keepalive

pvc 4/100

encapsulation aal5snap

!

bundle-enable

bridge-group 1

hold-queue 224 in

!

interface BVI1

ip address 172.16.0.1 255.255.0.0

no ip directed-broadcast

ip Nat outside

!

ip Nat inside source list 1 interface BVI1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 <next hop IP address>

!--- The next hop IP address is also called the default !--- gateway and is provided by your ISP. For this example, !--- one valid default gateway could be the loopback !--- interface of the Cisco 6400 NRP, 172.16.0.2.

no ip http server

!

access-list 1 permit 10.0.0.0 0.255.255.255

bridge 1 protocol ieee

bridge 1 route ip

!

end

Cisco 6400 NRP — 示例1

Current configuration:

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-cpu

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface Loopback1

ip address 172.16.0.2 255.255.0.0

no ip directed-broadcast

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

!--The interface ATM0/0/0.4 point-to-point uses IP !--unnumbered Loopback1 for its IP address requirements.

ip unnumbered Loopback1

no ip directed-broadcast

no ip route-cache

ATM route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

ip route 172.16.0.1 255.255.255.255 ATM0/0/0.4

end

Cisco 6400 NRP — 示例2

Current configuration:

!

version 12.0

no service pad

service timestamps debug datetime msec

service timestamps log datetime msec

!

hostname NRP

!

redundancy

main-CPU

no auto-sync standard

no secondary console enable

ip subnet-zero

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

no ip mroute-cache

no ATM ilmi-keepalive

!

interface ATM0/0/0.4 point-to-point

ip address 172.16.0.2 255.255.0.0

no ip directed-broadcast

no ip route-cache

ATM route-bridged ip

PVC 4/100

encapsulation aal5snap

!

interface Ethernet0/0/1

no ip address

no ip directed-broadcast

!

interface Ethernet0/0/0

no ip directed-broadcast

!

interface FastEthernet0/0/0

no ip address

no ip directed-broadcast

full-duplex

!

ip classless

ip route 172.16.0.1 255.255.255.255 ATM0/0/0.4

end

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- Cisco 6400软件设置指南

- Cisco DSL技术支持信息

- Cisco DSL产品支持信息

- 技术支持 - Cisco Systems