目录

简介

先决条件

要求

使用的组件

规则

重要说明

配置

网络图

配置

验证

Catalyst 5500 交换机

Catalyst 5000 交换机

故障排除

相关信息

简介

本文提供了 Catalyst 5500 和 Catalyst 5000 交换机（都运行 Catalyst OS (CatOS)）之间的 Inter-Switch Link (ISL) 配置示例。 所有运行 CatOS 的 Catalyst 5000 或 6000 系列成员可以用于此方案，以获得相同结果。

简单来说，中继是一种在两个设备之间点对点链路上传输来自若干 VLAN 的流量的方式。实施以太网中继的方法有如下两种：

- ISL（Cisco 专有 Inter-Switch 链路协议）

- 802.1Q（IEEE 标准）

本文档仅显示交换机的配置文件，以及相关 show 命令示例的输出。有关怎样在 Catalyst 交换机之间配置 ISL 中继的详细信息，请参阅在 Catalyst 5500/5000 和 6500/6000的ISL 系列交换机上配置 ISL 中继。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 运行 Catalyst OS 6.1(1) 软件的 Catalyst 5500 交换机

- 运行 Catalyst OS 6.1(1) 软件的 Catalyst 5000 交换机

本文档中的信息都是基于特定实验室环境中的设备编写的。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。用clear config all和write erase命令清除所有设备的配置，以保证它们有一个默认配置。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

重要说明

运行 CatOS 的 Catalyst 4000 系列（包括 Catalyst 2948G 及 Catalyst 2980G）只支持 802.1Q 中继，不支持 ISL 中继。

Catalyst 6000 系列的所有以太网端口都支持 802.1Q 和 ISL 封装。

根据模块，支持 Catalyst 5000 中继的端口只支持 ISL 封装，或同时支持 ISL 和 802.1Q。验证这一点的最佳方式是发出 show port capabilities 命令。明确地陈述了中继容量。例如：

cat5000> show port capabilities 3

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),tx-(none)

CoS rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

确保整个中继链路范围内的中继模式匹配。如果链路的一端配置为 ISL中继，那么链路的另一端也应该配置为 ISL；同样地，如果链路一端配置为 802.1Q，那么链路另一端应该配置为 802.1Q。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

本文档使用以下配置：

- Catalyst 5500

- Catalyst 5000

Catalyst 5500

#version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$q.J7$O5n.pwx7aEC6NHWJfXadx1

set enablepass $2$o.h/$bAxfjJ4XUA/RMUHqBr1YQ0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5500

!

#frame distribution method

set port channel all distribution mac both

!

#vtp

!--- In this example, the VLAN Trunking Protocol (VTP) mode is set to be transparent. !--- Depending on your network, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp ieee

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp ibm

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.2/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 empty

!

#module 2 : 2-port 1000BaseSX Supervisor

!

#module 3 empty

!

#module 4 : 24-port 10/100BaseTX Ethernet

!--- Ports 4/13-24 are assigned to VLAN 2.

set vlan 2 4/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 4/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 4/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

#module 5 empty

!

#module 6 empty

!

#module 7 empty

!

#module 8 empty

!

#module 9 empty

!

#module 10 empty

!

#module 11 empty

!

#module 12 empty

!

#module 13 empty

end

Catalyst 5000

#Version 6.1(1)

!

set option fddi-user-pri enabled

set password $2$J75L$Ug4163kfeHTDcLJZ/L9es1

set enablepass $2$h/BN$i3S54iNvIXknFelh6gOve0

!

#errordetection

set errordetection portcounter enable

!

#system

set system name  cat5000

!

#frame distribution method

set port channel all distribution Mac both

!

#vtp

!--- In this example, the VTP mode is set to be transparent. !--- Depending on your network and requirements, set the VTP mode accordingly.

set vtp mode transparent

!--- For details on VTP, refer to Configuring VTP.

set vlan 1 name default type ethernet mtu 1500 said 100001 state active

set vlan 1002 name fddi-default type fddi mtu 1500 said 101002 state active

set vlan 1004 name fddinet-default type fddinet mtu 1500 said 101004 state active stp IEEE

set vlan 1005 name trnet-default type trbrf mtu 1500 said 101005 state active stp IBM

set vlan 2

set vlan 1003 name token-ring-default type trcrf mtu 1500 said 101003 state acti

ve mode srb aremaxhop 7 stemaxhop 7 backupcrf off

!

#ip

!--- IP address used for management.

set interface sc0 1 10.10.10.3/255.255.255.0 10.10.10.255

!

#set boot command

set boot config-register 0x2102

set boot system flash slot0:cat5000-sup3.6-1-1.bin

!

# default port status is enable

!

!

#module 1 : 0-port Supervisor III

!

#module 2 : 12-port 10/100BaseTX Ethernet

!

#module 3 : 24-port 10/100BaseTX Ethernet

!--- Ports 3/13-24 have been assigned to VLAN 2.

set vlan 2 3/13-24

!--- The ISL trunking mode is set to on. !--- Depending on your network and requirements, set the trunking mode accordingly.

set trunk 3/1 on isl 1-1005

!--- For details on different trunking modes, refer to !--- Configuring VLAN Trunks on Fast Ethernet and Gigabit Ethernet Ports !--- Portfast has been enabled on the ports connected to the workstations.

set spantree portfast 3/2-24 enable

!--- For details on why to enable portfast, refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays

!

!

#module 4 : 24-port 10/100BaseTX Ethernet

!

#module 5 : 12-port 10BaseFL Ethernet

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令（尤其是 show tech-support ），使用此工具可以查看对 show 命令输出的分析。

Catalyst 5500 交换机

show port capabilities module/port — 此命令用于验证端口是否可以进行中继。

cat5500> (enable)  show port capabilities 4/1

Model                    WS-X5234

Port                     4/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  4/1-2,4/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(1q4t)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port — 此命令用于确定特定端口的状态以及端口是否正在中继。

cat5500> (enable) show port 4/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

4/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

4/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

4/1  disabled  shutdown             0        0        1 disabled      11

Port  Num-Addr Secure-Src-Addr   Age-Left Last-Src-Addr     Shutdown/Time-Left

----- -------- ----------------- -------- ----------------- ------------------

4/1         0                 -        -                 -        -         -

!--- Output suppressed.

show trunk — 此命令用于验证中继状态和配置。

cat5500> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1      1-2

show vtp domain — 此命令用于检查 VTP 信息。

cat5500> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.2      disabled disabled 2-1000

Catalyst 5000 交换机

show port capabilities module/port — 此命令用于验证端口是否可以进行中继。

cat5000> (enable) show port capabilities 3/1

Model                    WS-X5225R

Port                     3/1

Type                     10/100BaseTX

Speed                    auto,10,100

Duplex                   half,full

Trunk encap type         802.1Q,ISL

Trunk mode               on,off,desirable,auto,nonegotiate

Channel                  3/1-2,3/1-4

Broadcast suppression    percentage(0-100)

Flow control             receive-(off,on),send-(off,on)

Security                 yes

Membership               static,dynamic

Fast start               yes

QOS scheduling           rx-(none),TX(none)

COs rewrite              yes

ToS rewrite              IP-Precedence

Rewrite                  no

UDLD                     yes

AuxiliaryVlan            1..1000,1025..4094,untagged,dot1p,none

SPAN                     source,destination

show port module/port — 此命令用于确定特定端口的状态以及端口是否正在中继。

cat5000> (enable) show port 3/1

Port  Name               Status     Vlan       Level  Duplex Speed Type

----- ------------------ ---------- ---------- ------ ------ ----- ------------

3/1                     connected  trunk      normal a-full a-100 10/100BaseTX

Port  AuxiliaryVlan AuxVlan-Status

----- ------------- --------------

3/1  none          none

Port  Security Violation Shutdown-Time Age-Time Max-Addr Trap     IfIndex

----- -------- --------- ------------- -------- -------- -------- -------

3/1  disabled  shutdown             0        0        1 disabled      57

!--- Output suppressed.

show trunk — 此命令用于验证中继状态和配置。

cat5000> (enable) show trunk

* - indicates vtp domain mismatch

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

3/1      on           isl            trunking      1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

3/1      1-1005

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

3/1      1-2

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

3/1      1-2

show vtp domain — 此命令用于检查 VTP 信息。

cat5000> (enable) show vtp domain

Domain Name                      Domain Index VTP Version Local Mode  Password

-------------------------------- ------------ ----------- ----------- ----------

1            2           Transparent -

Vlan-count Max-vlan-storage Config Revision Notifications

---------- ---------------- --------------- -------------

6          1023             0               disabled

Last Updater    V2 Mode  Pruning  PruneEligible on Vlans

--------------- -------- -------- -------------------------

10.10.10.3      disabled disabled 2-1000

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- LAN 产品支持页

- LAN 交换技术支持页

- 技术支持和文档 - Cisco Systems