目录

简介

先决条件

要求

使用的组件

规则

网络图

配置

观察

故障排除

解决方案

相关信息

简介

本文档通过案例研究讨论了Cisco IOS®中由于网络设计不佳而导致的Dot1Q/L2P隧道丢包故障的故障排除。

先决条件

要求

Cisco 建议您了解以下主题：

- 关于Dot1Q隧道的基本知识

- OSPF的基本知识

使用的组件

本文档不限于特定的软件或硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

网络图

在此网络设置中，路由器7600-Core的接口Gi1/44和Gi1/43将路由器分别设置为单臂路由器3400-Metro-1的Fa0/13和Fa0/12。在7600-Dot1Q交换机中，接口Gi9/44和Gi 9/45已启用Dot1q隧道模式。在3400 — 城域边缘上创建SVI vlan接口，Fa0/13和Fa0/12配置为中继端口。路由器使用OSPF相互通信。

配置

- 7609核心

- 7609-Dot1Q

- 3400-Metro-1

- 3400 — 城域边缘

7609核心

!

version 15.0

hostname 7609-CORE

interface GigabitEthernet1/43

mtu 9216

no ip address

no ip redirects

no ip proxy-arp

load-interval 60

carrier-delay 2

flowcontrol send off

storm-control broadcast level 1.00

!

interface GigabitEthernet1/43.3503

encapsulation dot1Q 3503

ip address 172.16.41.17 255.255.255.252

no ip redirects

no ip proxy-arp

ip mtu 1500

ip ospf authentication-key 7 072C0E6B6B272D

ip ospf network point-to-point

ip ospf hello-interval 3

ip ospf dead-interval 10

!

!

interface GigabitEthernet1/44

mtu 9216

no ip address

no ip redirects

no ip proxy-arp

load-interval 60

carrier-delay 2

flowcontrol send off

storm-control broadcast level 1.00

!

interface GigabitEthernet1/44.3803

encapsulation dot1Q 3803

ip address 172.16.73.137 255.255.255.248 secondary

ip address 172.16.41.21 255.255.255.252

no ip redirects

no ip proxy-arp

ip mtu 1500

ip ospf authentication-key 7 072C0E6B6B272D

ip ospf network point-to-point

ip ospf cost 5

ip ospf hello-interval 3

ip ospf dead-interval 10

!--- Output omitted.

!

end

7609 DOT1Q

!

version 12.2

!

interface GigabitEthernet9/44

switchport

switchport access vlan 24

switchport mode dot1q-tunnel

mtu 9216

load-interval 60

carrier-delay 2

flowcontrol send off

storm-control broadcast level 1.00

l2protocol-tunnel cdp

l2protocol-tunnel stp

l2protocol-tunnel vtp

no cdp enable

spanning-tree portfast disable

spanning-tree bpdufilter enable

!

!

interface GigabitEthernet9/45

switchport

switchport access vlan 24

switchport mode dot1q-tunnel

mtu 9216

load-interval 60

carrier-delay 2

flowcontrol send off

storm-control broadcast level 1.00

l2protocol-tunnel cdp

l2protocol-tunnel stp

l2protocol-tunnel vtp

no cdp enable

spanning-tree portfast disable

spanning-tree bpdufilter enable

!

!--- Output omitted.

!

end

3400-Metro-1

!

version 12.2

!

interface FastEthernet0/3

port-type nni

switchport trunk allowed vlan 1052,3503

switchport mode trunk

load-interval 60

!

interface FastEthernet0/4

port-type nni

switchport trunk allowed vlan 1052,3803

switchport mode trunk

load-interval 60

!

!

interface FastEthernet0/12

port-type nni

switchport trunk allowed vlan 2-4094

switchport mode trunk

!

interface FastEthernet0/13

port-type nni

switchport trunk allowed vlan 2-4094

switchport mode trunk

!

end

3400 — 城域边缘

!

version 12.2

!

interface FastEthernet0/12

port-type nni

switchport mode trunk

load-interval 60

storm-control broadcast level 1.00

spanning-tree portfast disable

spanning-tree bpdufilter disable

!

interface FastEthernet0/13

port-type nni

switchport mode trunk

load-interval 60

storm-control broadcast level 1.00

spanning-tree portfast disable

spanning-tree bpdufilter disable

!

!

interface Vlan3503

ip address 172.16.41.18 255.255.255.252

no ip redirects

no ip proxy-arp

ip ospf authentication-key 7 072C0E6B6B272D

ip ospf network point-to-point

ip ospf hello-interval 3

ip ospf dead-interval 10

!

interface Vlan3803

ip address 172.16.73.139 255.255.255.248 secondary

ip address 172.16.41.22 255.255.255.252

no ip redirects

no ip proxy-arp

ip ospf authentication-key 7 072C0E6B6B272D

ip ospf network point-to-point

ip ospf cost 5

ip ospf hello-interval 3

ip ospf dead-interval 10

!

!--- Output omitted.

!

end

观察

当数据包通过Dot1Q隧道时，会发生随机Ping丢弃。但是，接口上没有输入/输出丢弃，也没有物理层问题的症状。发出show interface <interface >命令以检查接口上的输入/输出丢弃：

7609-Dot1Q#show interface gi9/44

!--- Output omitted.

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

0 input errors, 0 CRC, 1 frame, 0 overrun, 0 ignored

0 output errors, 0 collisions, 1 interface resets

0 lost carrier, 0 no carrier, 0 PAUSE output

!--- Output omitted.

当从城域边缘发出约100个Ping的ICMP流量时，核心层仅接收95个回显，这表明ICMP数据包在路径中被丢弃。

Metro-Edge#ping 172.16.41.21 re 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 172.16.41.21, timeout is 2 seconds:

.....!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 95 percent (95/100), round-trip min/avg/max = ½/9 ms

注意：7609中的show ip traffic命令显示，仅接收95条回声，而城域边缘中只接收100条回声。

show ip traffic

城域边缘
ICMP statistics:

Rcvd: 0 format errors, 0 checksum errors, 0 redirects, 0 unreachable

0 echo, 95 echo reply, 0 mask requests, 0 mask replies, 0 quench

0 parameter, 0 timestamp, 0 info request, 0 other

0 irdp solicitations, 0 irdp advertisements

Sent: 0 redirects, 0 unreachable, 100 echo, 0 echo reply

0 mask requests, 0 mask replies, 0 quench, 0 timestamp

0 info reply, 0 time exceeded, 0 parameter problem

0 irdp solicitations, 0 irdp advertisements

!--- The above output shows that 100 echos are sent !--- but received 95 replies from 7609-Core.

在7609-Core中

ICMP statistics:

Rcvd: 0 format errors, 0 checksum errors, 0 redirects, 0 unreachable

95 echo, 0 echo reply, 0 mask requests, 0 mask replies, 0 quench

0 parameter, 0 timestamp, 0 info request, 0 other

0 irdp solicitations, 0 irdp advertisements

Sent: 0 redirects, 0 unreachable, 0 echo, 95 echo reply

0 mask requests, 0 mask replies, 0 quench, 0 timestamp

0 info reply, 0 time exceeded, 0 parameter problem

0 irdp solicitations, 0 irdp advertisements

故障排除

检验MAC地址是否正确学习以排除数据包丢弃故障。

使用show mac address table 命令验证MAC地址条目。

要成功执行Ping操作

7609-DOT1q#sh mac-address-table address E05F.B972.1F00 all

Legend: * - primary entry

age - seconds since last seen

n/a - not available

vlan mac address type learn age ports

------+----------------+--------+-----+----------+--------------------------

Active Supervisor:

* 24 e05f.b972.1f00 dynamic Yes 0 Gi9/44

!--- This output displays the MAC address learnt !--- and its associated port, in this case the associated !--- port for successful ping is Gi9/44.

对于失败Ping

7609-DOT1q#sh mac-address-table address E05F.B972.1F00 all

Legend: * - primary entry

age - seconds since last seen

n/a - not available

vlan mac address type learn age ports

------+----------------+--------+-----+----------+--------------------------

Active Supervisor:

* 24 e05f.b972.1f00 dynamic Yes 5 Gi9/45

!--- This output displays the MAC address learnt !--- and its associated port, in this case, !--- the port number is Gi9/45.

要查看详细的MAC索引编程，请使用show mac-address-table命令。

7609-DOT1q#sh mac-address-table address E05F.B972.1F00 det

MAC Table shown in details

========================================

PI_E RM RMA Type Alw-Lrn Trap Modified Notify Capture Flood Mac Address Age Pvlan SWbits Index XTag

----+---+---+----+-------+----+--------+------+-------+------+--------------+----+------+------+----

Active Supervisor:

Yes No No DY No No Yes No No No e05f.b972.1f00 0xE0 24 0 0x22C 0

发出Remote login 开关和test mcast ltl-info index <Index number>命令，以便知道前一个HEX值表示的端口号。

7609-DOT1q-sp#test mcast ltl-info index 22B

index 0x22B contain ports 9/44

7609-DOT1q-sp#test mcast ltl-info index 22C

index 0x22C contain ports 9/45

!--- The output shows that hex number 22B !--- points to 9/44 port and hex 22C points to 9/45.

对于ping失败，源和目标索引是相同的端口，因此是丢弃。当在7600上使用mac-address-table notification mac-move命令启用Mac-move时，它会显示两个不同端口之间的MAC摆动，这是错误消息：

注意：由于6500/7600为交换机使用一个通用MAC地址，因此不同端口之间分配的MAC地址相同。show catalyst 6000 chassis-mac-address命令显示保留的交换机MAC地址。

* Jul 2 10:29:44.011: %MAC_MOVE-SP-4-NOTIF: Host e05f.b972.1f00 in

vlan 24 is flapping between port Gi9/45 and port Gi9/44

!--- The previous error message indicates !--- that the same MAC address is assigned between !--- two different ports: Gi9/45 and port Gi9/44.

解决方案

上一个网络是在同一交换机上具有DOT1Q隧道终端的全网状网络设置。在这种网络设置中，需要MAC抖动。为了避免MAC抖动，可以实施其中一种解决方案。

- 将隧道终端移动到其他交换机，例如，封装和解封应发生在不同的交换机。

- VLAN修剪可以用来调节任何中继端口中的VLAN。

相关信息

- 配置IEEE 802.1Q隧道

- 技术支持和文档 - Cisco Systems