目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

检查 OSPF 数据库

计算最短路径

故障排除

相关信息

简介

本文档显示两个开放式最短路径优先（OSPF）路由器使用一个编号的点对点链路相连。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用此图所示的网络设置。

配置

本文档使用此处所示的配置。

- 路由器 1.1.1.1

- 路由器 2.2.2.2

路由器 1.1.1.1

Current configuration:

hostname r1.1.1.1

interface Loopback0

ip address 1.1.1.1 255.0.0.0

interface Ethernet2/0/0

ip address 4.0.0.1 255.0.0.0

interface Serial2/1/0

ip address 5.0.0.1 255.0.0.0

router ospf 1

network 4.0.0.0 0.255.255.255 area 0

network 5.0.0.0 0.255.255.255 area 0

end

路由器 2.2.2.2

Current configuration:

hostname r2.2.2.2

interface Loopback0

ip address 2.2.2.2 255.0.0.0

interface Ethernet0/0/4

ip address 6.0.0.2 255.0.0.0

interface Serial2/1/0

ip address 5.0.0.2 255.0.0.0

router ospf 2

network 6.0.0.0 0.255.255.255 area 0

network 5.0.0.0 0.255.255.255 area 0

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show ip ospf database -显示Link State Advertisement (LSA)列表并且键入他们到连结状态数据库。此列表仅显示 LSA 报头中的信息。

- show ip ospf database [router] [link-state-id] -显示在数据库中的一台路由器所有的LSA列表。LSA是由每个路由器生产的。这些基本LSA列出所有路由器链路或接口，以及状态和链路流出的开销。他们也仅在他们产生的区域内被泛洪。

检查 OSPF 数据库

查看show ip ospf database 命令的输出，以了解此网络环境中的OSPF数据库是什么样子的。

r2.2.2.2#show ip ospf database

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

Link ID   ADV Router   Age   Seq#          Checksum   Link count

1.1.1.1   1.1.1.1      522   0x80000002    0x96D3         3

2.2.2.2   2.2.2.2      401   0x80000003    0x9FC2         3

r2.2.2.2#show ip ospf database router 1.1.1.1

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

LS age: 540

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 1.1.1.1

!--- For router links, the Link State Id is always the same !--- as the Advertising Router (the next line).

Advertising Router: 1.1.1.1

!--- This is the router ID of the router that !--- created this LSA.

LS Seq Number: 80000002

Checksum: 0x96D3

Length: 60

Number of Links: 3

Link connected to: another Router (point-to-point)

!--- This entry shows that this router (1.1.1.1) is a neighbor !--- with 2.2.2.2.

(Link ID) Neighboring Router ID: 2.2.2.2

(Link Data) Router Interface address: 5.0.0.1

!--- Interface on this router (1.1.1.1) which connects the !--- neighbor (2.2.2.2).

Number of TOS metrics: 0

TOS 0 Metrics: 64

!--- The OSPF cost of the link is 64.

Link connected to: a Stub Network

!--- This represents the subnet of the serial link 5.0.0.0/8.

(Link ID) Network/subnet number: 5.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 64

!--- The OSPF cost of the link is 64.

Link connected to: a Stub Network

!--- This represents the subnet of the !--- Ethernet segment 4.0.0.0/8.

(Link ID) Network/subnet number: 4.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

!--- The OSPF cost of the link is 10.

r2.2.2.2#show ip ospf database router 2.2.2.2

OSPF Router with ID (2.2.2.2) (Process ID 2)

Router Link States (Area 0)

LS age: 424

Options: (No TOS-capability, DC)

LS Type: Router Links

Link State ID: 2.2.2.2

Advertising Router: 2.2.2.2

LS Seq Number: 80000003

Checksum: 0x9FC2

Length: 60

Number of Links: 3

Link connected to: a Stub Network

(Link ID) Network/subnet number: 6.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 10

Link connected to: another Router (point-to-point)

(Link ID) Neighboring Router ID: 1.1.1.1

(Link Data) Router Interface address: 5.0.0.2

Number of TOS metrics: 0

TOS 0 Metrics: 64

Link connected to: a Stub Network

(Link ID) Network/subnet number: 5.0.0.0

(Link Data) Network Mask: 255.0.0.0

Number of TOS metrics: 0

TOS 0 Metrics: 64

计算最短路径

此部分从Router2.2.2.2的角度计算最短路径树。

Router2.2.2.2在其自己的LSA中查找，发现Router1.1.1.1是邻居。路由器2.2.2.2查看1.1.1.1的路由器LSA，以检验1.1.1.1是否将2.2.2.2视为邻居。如果两个路由器互相看见作为邻居，则他们被认为可及的。

每台路由器还检查其本地邻居表(您可以使用show ip ospf neighbor命令检查它)，以验证其接口和邻居的接口是否位于公共IP子网中。如果是，路由器会为邻居的路由器LSA中列出的任何末节网络安装路由。

在本例中，Router 2.2.2.2 保存了到4.0.0.0/8的路由在其路由表中，因为Router 1.1.1.1列出4.0.0.0/8在其自己的路由器LSA中作为一个末端网络。路由器1.1.1.1还将5.0.0.0/8列为末节网络。但是，路由器2.2.2.2没有为5.0.0.0/8安装OSPF路由，因为它有5.0.0.0/8的连接路由。连接的路由总比动态获取的路由好。

Router 2_2_2_2#

show ip route ospf

O    4.0.0.0/8 [110/74] via 5.0.0.1, 00:09:26, Serial0/1/0

Router 1_1_1_1#show ip route ospf

O    6.0.0.0/8 [110/74] via 5.0.0.2, 00:00:49, Serial2/1/0

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- OSPF 数据库说明指南

- OSPF 支持页

- IP 路由 支持页

- 技术支持和文档 - Cisco Systems