目录

简介

先决条件

要求

使用的组件

相关产品

规则

配置

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档说明了广播介质（例如，以太网和令牌环）上的 Open Shortest Path First (OSPF) 配置示例。show ip ospf interface 命令会验证在所有广播介质上运行的 OSPF 是否默认为广播网络类型。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- 以太网技术

- 配置 OSPF

- OSPF 邻居状态

使用的组件

本文档中的信息适用于以下软件和硬件版本。

- 两个 Cisco 2501 路由器

- Cisco IOS® 软件版本 12.2(27)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

相关产品

您还可以将此配置用于任意两个至少包含一个以太网、令牌环或 FDDI 接口的路由器。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

配置

本部分为您提供了可用于配置本文档所述功能的信息。

注意：要查找有关本文档使用的命令的其他信息，请参阅OSPF命令或使用命令查找工具(仅限注册的客户)。

网络图

本文档使用此网络设置。

配置

本文档使用以下配置。

- 路由器1

- 路由器2

路由器1

interface Loopback0

ip address 192.168.45.1 255.255.255.0

!

interface Ethernet0

ip address 10.10.10.1 255.255.255.0

!

router ospf 1

network 10.10.10.0 0.0.0.255 area 0

!--- OSPF is configured to run on the !--- Ethernet interface with an Area ID of 1.

!

路由器2

interface Loopback0

ip address 172.16.10.1 255.255.255.0

!

interface Ethernet0

ip address 10.10.10.2 255.255.255.0

!

router ospf 1

network 10.10.10.0 0.0.0.255 area 0

!--- OSPF is configured to run on the !--- Ethernet interface with an Area ID of 1.

!

验证

本部分提供的信息可帮助您确认您的配置是否可正常运行。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show ip ospf neighbor - 按接口显示 OSPF 邻居信息。Router1 的输出如下所示：

Router1#show ip ospf neighbor

Neighbor ID   Pri    State          Dead Time      Address       Interface

172.16.10.1    1     FULL/BDR       00:00:38     10.10.10.2      Ethernet0

根据此输出，对于邻居ID为172.16.10.1的Router2,Router1的邻居状态为“Full”。Router2是该广播网络中的备用指定路由器(BDR)。要了解有关 show ip ospf neighbor 命令显示内容的详细信息，请参阅 show ip ospf neighbor 命令显示什么内容？

- show ip ospf interface - 显示与 OSPF 相关的接口信息。在以太网接口上发出的 Router1 的输出如下所示：

Router1#show ip ospf interface ethernet 0

Ethernet0 is up, line protocol is up

Internet Address 10.10.10.1/24, Area 0

Process ID 1, Router ID 192.168.45.1, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State DR, Priority 1

Designated Router (ID) 192.168.45.1, Interface address 10.10.10.1

Backup Designated router (ID) 172.16.10.1, Interface address 10.10.10.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 2/2, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 2, maximum is 2

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 172.16.10.1 (Backup Designated Router)

Suppress hello for 0 neighbor(s)

从此输出可以了解到，以太网 0 接口的网络类型为广播。要了解有关 show ip ospf interface 命令显示内容的详细信息，请参阅 show ip ospf interface 命令显示什么内容？

同样，在 Router2 上，show 命令的输出如下所示。

Router2#show ip ospf neighbor

Neighbor ID    Pri    State       Dead Time       Address        Interface

192.168.45.1    1     FULL/DR       00:00:31      10.10.10.1       Ethernet0

从 show ip ospf neighbor 命令的输出可以了解到，Router1 是此广播网络中的指定路由器 (DR)。

Router2#show ip ospf interface ethernet 0

Ethernet0 is up, line protocol is up

Internet Address 10.10.10.2/24, Area 0

Process ID 1, Router ID 172.16.10.1, Network Type BROADCAST, Cost: 10

Transmit Delay is 1 sec, State BDR, Priority 1

Designated Router (ID) 192.168.45.1, Interface address 10.10.10.1

Backup Designated router (ID) 172.16.10.1, Interface address 10.10.10.2

Timer intervals configured, Hello 10, Dead 40, Wait 40, Retransmit 5

Hello due in 00:00:00

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 192.168.45.1 (Designated Router)

Suppress hello for 0 neighbor(s)

Router2 的 show ip ospf interface ethernet 0 命令输出也显示以太网 0 接口的网络类型为广播。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关debug命令的重要信息。

两个路由器之间形成邻接时，会有多种状态。您可以使用 debug ip ospf adj 命令来查看各种状态，以及在广播 OSPF 网络中发生的 DR 和 BDR 选择。在较早的 Cisco IOS 软件版本中，您可以使用 debug ip ospf adjacency 命令。您需要在邻居关系建立之前发出此 debug 命令。

此输出从Router1的角度出发。输出中以粗体显示的部分是邻接过程经历的各种状态。

Router1#debug ip ospf adj

OSPF adjacency events debugging is on

*Mar  1 01:41:23.319: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x1F6C opt

0x42 flag 0x7 len 32  mtu 1500 state INIT

*Mar  1 01:41:23.323: OSPF: 2 Way Communication to 172.16.10.1

on Ethernet0, state 2WAY

*Mar  1 01:41:23.327: OSPF: Neighbor change Event on interface Ethernet0

*Mar  1 01:41:23.327: OSPF: DR/BDR election on Ethernet0

*Mar  1 01:41:23.331: OSPF: Elect BDR 172.16.10.1

*Mar  1 01:41:23.331: OSPF: Elect DR 192.168.45.1

*Mar  1 01:41:23.335:        DR: 192.168.45.1 (Id)   BDR: 172.16.10.1 (Id)

*Mar  1 01:41:23.339: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2552 opt

0x42 flag 0x7 len 32

*Mar  1 01:41:23.343: OSPF: First DBD and we are not SLAVE

*Mar  1 01:41:23.359: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2552 opt

0x42 flag 0x2 len 52  mtu 1500 state EXSTART

*Mar  1 01:41:23.363: OSPF: NBR Negotiation Done. We are the MASTER

*Mar  1 01:41:23.367: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2553 opt

0x42 flag 0x3 len 72

*Mar  1 01:41:23.387: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2553 opt

0x42 flag 0x0 len 32  mtu 1500 state EXCHANGE

*Mar  1 01:41:23.391: OSPF: Send DBD to 172.16.10.1 on Ethernet0 seq 0x2554 opt

0x42 flag 0x1 len 32

*Mar  1 01:41:23.411: OSPF: Rcv DBD from 172.16.10.1 on Ethernet0 seq 0x2554 opt

0x42 flag 0x0 len 32  mtu 1500 state EXCHANGE

*Mar  1 01:41:23.415: OSPF: Exchange Done with 172.16.10.1 on Ethernet0

*Mar  1 01:41:23.419: OSPF: Synchronized with 172.16.10.1 on Ethernet0, state FULL

01:41:23: %OSPF-5-ADJCHG: Process 1, Nbr 172.16.10.1 on Ethernet0

from LOADING to FULL, Loading Done

*Mar  1 01:41:23.879: OSPF: Build router LSA for area 0, router ID 192.168.45.1,

seq 0x80000004

*Mar  1 01:41:23.923: OSPF: Build network LSA for Ethernet0, router ID 192.168.45.1

*Mar  1 01:41:25.503: OSPF: Neighbor change Event on interface Ethernet0

*Mar  1 01:41:25.507: OSPF: DR/BDR election on Ethernet0

*Mar  1 01:41:25.507: OSPF: Elect BDR 172.16.10.1

*Mar  1 01:41:25.511: OSPF: Elect DR 192.168.45.1

*Mar  1 01:41:25.511:        DR: 192.168.45.1 (Id)   BDR: 172.16.10.1 (Id)

发出 debug ip ospf events 命令可验证 hello 计时器值，如此示例输出所示。

Router1#debug ip ospf events

OSPF events debugging is on

Router1#

*Mar  1 04:04:11.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:11.930: OSPF: End of hello processing

*Mar  1 04:04:21.926: OSPF: Rcv hello from 172.16.10.1

area 0 from Ethernet0 10.10.10.2

*Mar  1 04:04:21.930: OSPF: End of hello processing

*Mar  1 04:04:31.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:31.930: OSPF: End of hello processing

*Mar  1 04:04:41.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:41.930: OSPF: End of hello processing

*Mar  1 04:04:51.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:04:51.930: OSPF: End of hello processing

*Mar  1 04:05:01.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:01.930: OSPF: End of hello processing

*Mar  1 04:05:11.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:11.930: OSPF: End of hello processing

*Mar  1 04:05:21.926: OSPF: Rcv hello from 172.16.10.1 area 0 from

Ethernet0 10.10.10.2

*Mar  1 04:05:21.930: OSPF: End of hello processing

此输出显示 Hello 数据包每 10 秒交换一次。

相关信息

- 通过多接入网络连接的OSPF路由器

- 基于非广播型链路的 OSPF 的初始配置

- OSPF 故障排除

- OSPF 支持页

- IP 路由技术支持页

- 技术支持和文档 - Cisco Systems