目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

show ipv6 route

show ipv6 route bgp

show bgp ipv6 unicast summary

相关信息

简介

本文档提供用于IPv6的多协议边界网关协议(BGP)的示例配置。BGP是一种外部网关协议(EGP)，主要用于连接包含独立路由策略（自治系统）的独立路由域。在访问 Internet 时，BGP 通常用于连接到服务提供商。BGP 还可以用在自治系统中，这种变体称为内部 BGP (iBGP)。 多协议 BGP 是一种增强型 BGP，可以为多个网络层协议地址系列（如 IPv6 地址系列）及 IP 多播路由传送路由信息。所有 BGP 命令和路由策略功能均可以与多协议 BGP 一起使用。

先决条件

要求

尝试进行此配置之前，请确保满足以下要求：

- 实现 IPv6 编址和基本连通性

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

在此拓扑中，路由器R0和R1形成EBGP关系：R0位于自治系统编号1(AS1)中，R1位于AS2中。路由器R0通告两个IPv6网络：2010:AB8:2::/48和2010:AB8:3::/48。

网络图

本文档使用以下网络设置：

配置

这是图中所示路由器的 IPv6 多协议 BGP 示例配置：

路由器 R0

ipv6 unicast-routing

!--- Enables forwarding of IPv6 packets.

ipv6 cef

interface Loopback10

no ip address

ipv6 address 2010:AB8:2::/48

ipv6 enable

!

interface Loopback20

no ip address

ipv6 address 2010:AB8:3::/48

ipv6 enable

!

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2010:AB8:0:2::/64 eui-64

ipv6 enable

!

router bgp 1

bgp router-id 1.1.1.1

no bgp default ipv4-unicast

!--- Without configuring ""no bgp default ipv4-unicast"" only IPv4 will be !--- advertised

bgp log-neighbor-changes

neighbor 2010:AB8:0:2:C601:10FF:FE58:0 remote-as 2

!

address-family ipv6

neighbor 2010:AB8:0:2:C601:10FF:FE58:0 activate

network 2010:AB8:2::/48

network 2010:AB8:3::/48

exit-address-family

!

路由器 R1

ipv6 unicast-routing

ipv6 cef

interface FastEthernet0/0

no ip address

duplex auto

speed auto

ipv6 address 2010:AB8:0:2::/64 eui-64

ipv6 enable

!

router bgp 2

bgp router-id 2.2.2.2

no bgp default ipv4-unicast

bgp log-neighbor-changes

neighbor 2010:AB8:0:2:C600:10FF:FE58:0 remote-as 1

!

address-family ipv6

neighbor 2010:AB8:0:2:C600:10FF:FE58:0 activate

exit-address-family

!

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

show ipv6 route

此命令用于显示 IPv6 路由表。

R1#

show ipv6 route

IPv6 Routing Table - 5 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

C   2010:AB8:0:2::/64 [0/0]

via ::, FastEthernet0/0

L   2010:AB8:0:2:C601:10FF:FE58:0/128 [0/0]

via ::, FastEthernet0/0

B   2010:AB8:2::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

B   2010:AB8:3::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

L   FF00::/8 [0/0]

via ::, Null0

show ipv6 route bgp

在指定协议时，仅显示特定路由协议的路由。此输出示例为带 BGP 关键字的 show ipv6 route 命令的输出：

R1#

show ipv6 route bgp

IPv6 Routing Table - 5 entries

Codes: C - Connected, L - Local, S - Static, R - RIP, B - BGP

U - Per-user Static route, M - MIPv6

I1 - ISIS L1, I2 - ISIS L2, IA - ISIS interarea, IS - ISIS summary

O - OSPF intra, OI - OSPF inter, OE1 - OSPF ext 1, OE2 - OSPF ext 2

ON1 - OSPF NSSA ext 1, ON2 - OSPF NSSA ext 2

D - EIGRP, EX - EIGRP external

B   2010:AB8:2::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

B   2010:AB8:3::/48 [20/0]

via FE80::C600:10FF:FE58:0, FastEthernet0/0

show bgp ipv6 unicast summary

此命令提供类似于 show ip bgp summary 命令的输出，但该命令特定于 IPv6。

R1#

show bgp ipv6 unicast summary

BGP router identifier 2.2.2.2, local AS number 2

BGP table version is 3, main routing table version 3

2 network entries using 304 bytes of memory

2 path entries using 152 bytes of memory

2/1 BGP path/bestpath attribute entries using 248 bytes of memory

1 BGP AS-PATH entries using 24 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 728 total bytes of memory

BGP activity 2/0 prefixes, 2/0 paths, scan interval 60 secs

Neighbor        V    AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

2010:AB8:0:2:C600:10FF:FE58:0

4     1      15      14        3    0    0 00:11:52        2

相关信息

- IP 版本 6 (IPv6) 技术支持

- 实现 IPv6 的多协议 BGP

- 技术支持和文档 - Cisco Systems