目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

验证

故障排除

相关信息

简介

本文档提供第2层隧道协议第3版(L2TPv3)静态和迂回方法的示例配置。

下表介绍L2TPv3的Cisco IOS®软件版本修改支持：

Cisco IOS 软件版本

L2TPv3支持说明

12.0(21)S

Cisco 7200系列、Cisco 7500系列、Cisco 10720和Cisco 12000系列平台引入了对L2TPv3的初始数据平面支持。

12.0(23)S

Cisco 7200系列、Cisco 7500系列、Cisco 10720和Cisco 12000系列平台引入了L2TPv3控制平面支持。

12.3(2)T

此功能已集成到Cisco IOS软件版本12.3(2)T中。

您必须启用思科快速转发(CEF)才能使用L2TPv3功能。在启用CEF之前，Xconnect配置子模式将被阻止。在分布式平台（如Cisco 7500系列）上，如果在会话建立时禁用了CEF，则会话会被关闭并保持关闭，直到CEF重新启用。使用ip cef或ip cef distributed命令启用CEF。

强烈建议指定源IP地址以配置环回接口。如果不配置环回接口，路由器将选择最佳可用本地地址，该地址可以是在面向核心的接口上配置的任何IP地址。此配置可能会阻止建立控制信道。环回地址必须可从核心网络访问。

先决条件

要求

在尝试此配置之前，请确保您了解：

- L2TPv3:第2层隧道协议第3版

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

注意：提供商使用路由器R2和R3。路由器R1、R4、R5和R6是最终客户。通过使用L2TPv3，路由器R4似乎与R5有直接连接；路由器R1与路由器R6之间的连接也是如此。

配置

本文档使用以下配置：

- 通过IP云的静态伪线。在配置了两个单向隧道的R2和R3中，可以找到配置的相关部分。

- 发夹伪线或本地交换（从同一路由器的一个端口到另一个端口）。 该配置仅在R2上完成，包括配置两个指向两个环回的单向隧道，这两个环回都在路由器R2上。

R2

R2# show running-config

Building configuration...

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R2

!

!

clock timezone EST 10

ip subnet-zero

ip cef

no ip domain-lookup

l2tp-class R2signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR5R4

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback0

ip dfbit set

!

pseudowire-class wireR6R1

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback1

ip dfbit set

!

pseudowire-class wireR1R6

encapsulation l2tpv3

protocol l2tpv3 R2signal

ip local interface Loopback2

ip dfbit set

!

interface Loopback0

description Used by wireR5R4 for Static Connection

ip address 2.2.2.2 255.255.255.255

no ip directed-broadcast

!

interface Loopback1

description Used by wireR6R1 for Hair Pinning Connection

ip address 2.2.2.6 255.255.255.255

no ip directed-broadcast

!

interface Loopback2

description Used by wireR1R6 for Hair Pinning Connection

ip address 2.2.2.1 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

description Connection to R1

no ip address

no ip directed-broadcast

xconnect 2.2.2.6 16 encapsulation l2tpv3 pw-class wireR1R6

!

interface Ethernet1/0

description Connection to Pretend Cloud.

ip address 20.20.20.2 255.255.255.0

no ip directed-broadcast

no cdp enable

!

interface Ethernet2/0

description Connection to R5

no ip address

no ip directed-broadcast

no cdp enable

xconnect 3.3.3.3 12 encapsulation l2tpv3 pw-class wireR5R4

!

interface Ethernet3/0

description Connection to R6

no ip address

no ip directed-broadcast

xconnect 2.2.2.1 16 encapsulation l2tpv3 pw-class wireR6R1

!

ip classless

ip route 3.3.3.3 255.255.255.255 20.20.20.3

!--- The other end of wireR5R4 loopback (3.3.3.3) must be

!--- reachable from this router. Hair Pinning loopbacks

!--- are reachable—there is no need for additional routes.

!

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R3

R3# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R3

!

!

clock timezone EST 10

ip subnet-zero

ip cef

!

l2tp-class R3signal

hello 10

password 0 cisco

cookie size 8

!

pseudowire-class wireR4R5

encapsulation l2tpv3

protocol l2tpv3 R3signal

ip local interface Loopback0

ip dfbit set

!

interface Loopback0

description Use by wireR4R5 for static connection

ip address 3.3.3.3 255.255.255.255

no ip directed-broadcast

!

interface Ethernet0/0

ip address 20.20.20.3 255.255.255.0

no ip directed-broadcast

!

interface Ethernet1/0

no ip address

no ip directed-broadcast

no cdp enable

xconnect 2.2.2.2 12 encapsulation l2tpv3 pw-class wireR4R5

!

ip classless

ip route 2.2.2.2 255.255.255.255 Ethernet0/0

!--- The other end of wireR4R5 loopback (3.3.3.3) must be

!--- reachable from this router.

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

客户R1R6隧道（伪线）终端路由器配置：

R1

R1# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R1

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.1 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R6

R6# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R6

!

!

clock timezone EST 10

ip subnet-zero

no ip domain-lookup

!

interface Ethernet0/0

ip address 10.10.10.6 255.255.255.0

no ip directed-broadcast

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

客户R4R5隧道（伪线）终端路由器配置：

R4

R4# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R4

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.4 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

R5

R5# show running-config

Building configuration...

version 12.0

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname R5

!

!

ip subnet-zero

!

interface Ethernet0/0

ip address 30.30.30.5 255.255.255.0

no ip directed-broadcast

!

router ospf 1

log-adjacency-changes

network 30.30.30.0 0.0.0.255 area 0

!

ip classless

!

line con 0

exec-timeout 0 0

privilege level 15

line aux 0

line vty 0 4

login

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

R4# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.5    1   FULL/DR   00:00:39    30.30.30.5  Ethernet0/0

R5# show ip ospf neighbor

Neighbor ID  Pri  State     Dead Time   Address     Interface

30.30.30.4    1   FULL/BDR  00:00:38    30.30.30.4  Ethernet0/0

R1# show cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater

Device ID   Local Intrfce  Holdtme Capability Platform  Port ID

R6           Eth 0/0       158        R       7206VXR   Eth 0/0

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show l2tun tunnel all — 要显示L2TPv3会话的当前状态并显示有关当前配置的会话的信息，包括本地和远程L2TP主机名、聚合数据包计数和L2TP控制通道，请在EXEC模式下使用show l2tun tunnel all命令。

R2# show l2tun tunnel all

Tunnel Information Total tunnels 3 sessions 3

Tunnel id 54217 is up, remote id is 44186, 1 active sessions

Tunnel state is established, time since change 00:12:07

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.6, port 0

Local tunnel name is R2

Internet Address 2.2.2.1, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

88 packets sent, 87 received

10086 bytes sent, 11092 received

Control Ns 76, Nr 74

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 0, ZLB ACKs sent 72

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 44186 is up, remote id is 54217, 1 active sessions

Tunnel state is established, time since change 00:12:08

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.1, port 0

Local tunnel name is R2

Internet Address 2.2.2.6, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

87 packets sent, 88 received

11092 bytes sent, 10086 received

Control Ns 74, Nr 76

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 0, ZLB ACKs sent 74

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 0 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

Tunnel id 24124 is up, remote id is 48735, 1 active sessions

Tunnel state is established, time since change 00:11:00

Tunnel transport is IP (115)

Remote tunnel name is R3

Internet Address 3.3.3.3, port 0

Local tunnel name is R2

Internet Address 2.2.2.2, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R2signal

155 packets sent, 158 received

15230 bytes sent, 17586 received

Control Ns 69, Nr 67

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 2

Total resends 1, ZLB ACKs sent 65

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

R3# show l2tun tunnel all

Tunnel Information Total tunnels 1 sessions 1

Tunnel id 48735 is up, remote id is 24124, 1 active sessions

Tunnel state is established, time since change 00:12:36

Tunnel transport is IP (115)

Remote tunnel name is R2

Internet Address 2.2.2.2, port 0

Local tunnel name is R3

Internet Address 3.3.3.3, port 0

Tunnel domain is

VPDN group for tunnel is -

L2TP class for tunnel is R3signal

180 packets sent, 176 received

19766 bytes sent, 17316 received

Control Ns 77, Nr 79

Local RWS 1024 (default), Remote RWS 1024 (max)

Tunnel PMTU checking disabled

Retransmission time 1, max 1 seconds

Unsent queuesize 0, max 0

Resend queuesize 0, max 1

Total resends 1, ZLB ACKs sent 78

Current nosession queue check 0 of 5

Retransmit time distribution: 0 0 1 0 0 0 0 0 0

Sessions disconnected due to lack of resources 0

- show l2tun session all — 要显示第2层会话的当前状态并显示有关L2TPv3控制通道的协议信息，请在EXEC模式下使用show l2tun session all命令。

R2# show l2tun session all

Session Information Total tunnels 3 sessions 3

Session id 19996 is up, tunnel id 54217

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.6

Session is L2TP signalled

Session state is established, time since change 00:15:37

112 Packets sent, 111 received

12309 Bytes sent, 13312 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet0/0

Circuit state is UP

Remote session id is 19999, remote tunnel id 44186

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

remote cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 19999 is up, tunnel id 44186

Call serial number is 1492400000

Remote tunnel name is R2

Internet address is 2.2.2.1

Session is L2TP signalled

Session state is established, time since change 00:15:38

111 Packets sent, 112 received

13312 Bytes sent, 12309 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 16

Session Layer 2 circuit, type is Ethernet, name is Ethernet3/0

Circuit state is UP

Remote session id is 19996, remote tunnel id 54217

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 7F 9F 65 C4 C7 5B 57 FF

remote cookie, size 8 bytes, value 6E 47 8C 4A BA BF 7E A4

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

Session id 20005 is up, tunnel id 24124

Call serial number is 1492400002

Remote tunnel name is R3

Internet address is 3.3.3.3

Session is L2TP signalled

Session state is established, time since change 00:14:29

200 Packets sent, 204 received

19650 Bytes sent, 22100 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet2/0

Circuit state is UP

Remote session id is 17834, remote tunnel id 48735

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

remote cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

R3# show l2tun session all

Session Information Total tunnels 1 sessions 1

Session id 17834 is up, tunnel id 48735

Call serial number is 1492400002

Remote tunnel name is R2

Internet address is 2.2.2.2

Session is L2TP signalled

Session state is established, time since change 00:23:53

327 Packets sent, 322 received

33758 Bytes sent, 31248 received

Receive packets dropped:

out-of-order: 0

total: 0

Send packets dropped:

exceeded session MTU: 0

total: 0

Session vcid is 12

Session Layer 2 circuit, type is Ethernet, name is Ethernet1/0

Circuit state is UP

Remote session id is 20005, remote tunnel id 24124

DF bit on, ToS reflect disabled, ToS value 0, TTL value 255

Session cookie information:

local cookie, size 8 bytes, value 39 DD CB 00 9C 4B 1C 8C

remote cookie, size 8 bytes, value 22 09 F1 E9 BC 8C 00 94

FS cached header information:

encap size = 32 bytes

00000000 00000000 00000000 00000000

00000000 00000000 00000000 00000000

Sequencing is off

故障排除

本部分提供的信息可用于对配置进行故障排除。

您可以使用Bug工具包(仅注册客户)获取有关以下L2TPv3功能相关Bug的详细信息：

- CSCdz01467(仅限注册客户) — 已解析(R)L2TPv3:隧道数据包计数器，显示不准确的计数。

- CSCeb56061(仅限注册客户) — 已解析(R)L2TPv3:L2TPv3oETH生成僵尸隧道。

- CSCeb35497(仅限注册客户) — 已解决(R)L2TPv3排序：Tx Seqnum在16777215后不换行为1。

- CSCdz48481(仅限注册客户) — 不再支持已解析(R)L2TPv3迂回配置。

- CSCec00463(仅限注册客户) — 已解析(R)L2TPv3:千兆以太网端口模式decap故障

- CSCec44356(仅限注册客户) — 已解决(R)C10720:L2TPv3发夹中的匹配802.1P已断开。

相关信息

- IP 路由协议支持页

- IP 路由 支持页

- 技术支持 - Cisco Systems