目录

简介

先决条件

要求

使用的组件

规则

背景信息

命令语法

示例

数据包流

相关信息

简介

本文档介绍到Null接口的静态路由如何防止路由环路。

先决条件

要求

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS® 软件版本 12.3。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

Null 接口通常用于防止路由环路。例如，增强型内部网关路由协议 (EIGRP) 总是在汇总一组路由时创建一个通往 Null0 接口的路由。每当路由协议进行总结时，它就意味着路由器可以接收该总结中任何IP地址的流量。由于并非所有 IP 地址都在使用中，所以如果收到汇总流量的路由器使用默认路由，就可能造成数据包循环。

命令语法

指向Null0的静态路由是正常的静态路由，不同之处在于它指向Null0接口，该接口是虚拟Cisco IOS接口。有关ip route命令的详细信息，请参阅独立于IP路由协议的命令A至R一章的ip route部分。下一节举例说明如何使用ip route命令创建到Null0的静态路由。

示例

需要向Null0添加静态路由的常见场景是接入服务器，该接入服务器有许多客户端拨入。这种情况会导致主机路由被安装到接入服务器的路由表中。为确保客户端的可达性，同时又不至于造成整个网络充斥着主机路由，网络中的其他路由器通常会有指向接入服务器的汇总路由。在此类配置中，接入服务器必须具有指向接入服务器Null0接口同一汇总路由。如果不是，则当外部主机尝试访问当前未分配给客户端所拨的IP地址（但属于汇总路由的一部分）时，可能出现路由环路。这是因为接入服务器由于缺少通往目标的主机路由，而通过接入服务器的默认路由将数据包反弹回核心网络。

请考虑以下示例：

网络拓扑

小型ISP(ISP-R1)为其中一个用户分配了网络块192.168.0.0/16。在本示例中，用户将192.168.0.0/16划分为/24网络，目前仅使用192.168.1.0/24和192.168.2.0/24。在路由器ISP-R1上，ISP为192.168.0.0/16配置通往用户路由器(cust-R2)的静态路由。然后 ISP 连接到骨干网 ISP，后者用路由器 BB-R3 表示。路由器 BB-R3 向 ISP-R1 发送默认路由，并通过 ISP-R1 的 BGP 接收网络 192.168.0.0/16。

现在可保证从Internet（主干ISP路由器BB-R3）到用户路由器cust-R2的可达性，因为cust-R2已配置默认路由以指向ISP-R1。然而，如果数据包被发往 192.168.0.0/16 范围以外的尚未使用的网络地址块，则 cust-R2 路由器会使用指向 ISP-R1 的默认路由来转发那些数据包。然后，数据包在 ISP-R1 和 cust-R2 之间形成环路，直到 TTL 超时。这会对路由器的 CPU 和链路利用率造成巨大的影响。例如，流向未使用IP地址的流量可能来自拒绝服务攻击、扫描IP块以查找易受攻击的主机等。

相关配置：

cust-R2

version 12.3

!

hostname cust-R2

!

ip subnet-zero

!

interface Loopback0

ip address 10.2.2.2 255.255.255.255

!

interface Ethernet0/0

ip address 192.168.1.1 255.255.255.0

!

interface Ethernet1/0

ip address 192.168.2.1 255.255.255.0

!

interface Serial2/0

ip address 10.0.0.2 255.255.255.252

!--- This interface leads to ISP-R1.

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.0.0.1

!--- Default route going to ISP-R1.

!

end

ISP-R1

version 12.3

!

hostname ISP-R1

!

ip subnet-zero

!

interface Loopback0

ip address 10.1.1.1 255.255.255.255

!

interface Serial0/0

ip address 10.0.0.1 255.255.255.252

!--- Interface to cust-R2.

!

interface Serial1/0

ip unnumbered Loopback0

!--- Interface going to BB-R3.

!

router bgp 65501

no synchronization

network 192.168.0.0 mask 255.255.0.0

!--- ISP-R1 injects 192.168.0.0/16 into BGP to

!--- advertise it to BB-R3.

neighbor 10.3.3.3 remote-as 65503

neighbor 10.3.3.3 ebgp-multihop 255

no auto-summary

!

ip classless

ip route 10.3.3.3 255.255.255.255 Serial1/0

ip route 192.168.0.0 255.255.0.0 Serial0/0

!--- The first route is necessary for the eBGP

!--- session to BB-R3 to come up.

!--- The route to 192.168.0.0/16 points towards cust-R2.

!

!

end

BB-R3

version 12.3

!

hostname BB-R3

!

ip subnet-zero

!

!

interface Loopback0

ip address 10.3.3.3 255.255.255.255

!

interface Serial2/0

ip unnumbered Loopback0

!--- This interface goes to ISP-R1.

!

router bgp 65503

no synchronization

bgp log-neighbor-changes

neighbor 10.1.1.1 remote-as 65501

neighbor 10.1.1.1 ebgp-multihop 255

neighbor 10.1.1.1 default-originate

!--- BB-R3 injects a default route into BGP and

!--- sends it to ISP-R1.

no auto-summary

!

ip classless

ip route 10.1.1.1 255.255.255.255 Serial2/0

!--- This route points to ISP-R1 and is

!--- used to establish the eBGP peering.

!

end

数据包流

注意：在路由器上启用了debug命令以更好地说明数据包流，特别是debug ip packet和debug ip icmp。除非已经充分了解后果，否则切勿在生产环境中启用这些命令。

BB-R3#ping ip 192.168.20.1 repeat 1

Type escape sequence to abort.

Sending 1, 100-byte ICMP Echos to 192.168.20.1, timeout is 2 seconds:

*Oct  6 09:36:45.355: IP: tableid=0, s=10.3.3.3 (local), d=192.168.20.1 (Serial2/0), routed via FIB

*Oct  6 09:36:45.355: IP: s=10.3.3.3 (local), d=192.168.20.1 (Serial2/0), len 100, sending.

Success rate is 0 percent (0/1)

BB-R3#

*Oct  6 09:36:50.943: ICMP: time exceeded rcvd from 10.0.0.1

BB-R3 向一个位于 192.168.0.0/16 地址块内但又未在 cust-R2 上使用的 IP 地址发送单个 ICMP 请求。BB-R3 收到从 ISP-R1 返回的 ICMP 超时。

在 ISP-R1 上：

18:50:22: IP: tableid=0, s=10.3.3.3 (Serial1/0), d=192.168.20.1 (Serial0/0), routed via RIB

18:50:22: IP: s=10.3.3.3 (Serial1/0), d=192.168.20.1 (Serial0/0), g=192.168.20.1, len 100, forward

18:50:22: IP: tableid=0, s=10.3.3.3 (Serial0/0), d=192.168.20.1 (Serial0/0), routed via RIB

18:50:22: IP: s=10.3.3.3 (Serial0/0), d=192.168.20.1 (Serial0/0), g=192.168.20.1, len 100, forward

18:50:22: IP: tableid=0, s=10.3.3.3 (Serial0/0), d=192.168.20.1 (Serial0/0), routed via RIB

18:50:22: IP: s=10.3.3.3 (Serial0/0), d=192.168.20.1 (Serial0/0), g=192.168.20.1, len 100, forward

18:50:22: IP: tableid=0, s=10.3.3.3 (Serial0/0), d=192.168.20.1 (Serial0/0), routed via RIB

初始数据包在ISP-R1的serial1/0接口上从BB-R3接收，然后按预期转发到serial0/0接口的cust-R2。由于以下路由，同一数据包返回到 ISP-R1 的 serial0/0 上，并立即通过同一接口发送到 cust-R2。

ISP-R1#show ip route 192.168.20.1

Routing entry for 192.168.0.0/16, supernet

Known via "static", distance 1, metric 0 (connected)

Advertised by bgp 65501

Routing Descriptor Blocks:

* directly connected, via Serial0/0

Route metric is 0, traffic share count is 1

是什么导致 cust-R2 把流量发送回 ISP-R1 呢？

在 cust-R2 上：

*Oct  6 09:41:43.495: IP: s=10.3.3.3 (Serial2/0), d=192.168.20.1 (Serial2/0), g=10.0.0.1, len 100, forward

*Oct  6 09:41:43.515: IP: tableid=0, s=10.3.3.3 (Serial2/0), d=192.168.20.1 (Serial2/0), routed via RIB

*Oct  6 09:41:43.515: IP: s=10.3.3.3 (Serial2/0), d=192.168.20.1 (Serial2/0), g=10.0.0.1, len 100, forward

*Oct  6 09:41:43.555: IP: tableid=0, s=10.3.3.3 (Serial2/0), d=192.168.20.1 (Serial2/0), routed via RIB

您可以看到，由于以下路由，cust-R2将这些数据包发送回ISP-R1:

cust-R2#show ip route 192.168.20.1 longer-prefixes

Codes: C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route

Gateway of last resort is 10.0.0.1 to network 0.0.0.0

cust-R2#

路由器cust-R2没有通往192.168.20.1的路由，因为该网络在用户网络中未使用，因此通往192.168.20.1的最佳路由是指向ISP-R1的默认路由。

结果是，数据包在 ISP-R1 和 cust-R2 之间循环，直到 TTL 超时。

如果ICMP请求发送到正在使用的网络中的IP地址，则不会出现此结果。例如，如果 ICMP 请求的是 192.168.1.x，而该地址直接连接到 cust-R2，则不会出现环路：

cust-R2#show ip route 192.168.1.1

Routing entry for 192.168.1.0/24

Known via "connected", distance 0, metric 0 (connected, via interface)

Routing Descriptor Blocks:

* directly connected, via Ethernet0/0

Route metric is 0, traffic share count is 1

此问题的解决方案是，在 cust-R2 上为 192.168.0.0/16 配置指向 Null0 的静态路由。

cust-R2#configure terminal

Enter configuration commands, one per line.  End with CNTL/Z.

cust-R2(config)#ip route 192.168.0.0 255.255.0.0 Null0

cust-R2(config)#end

cust-R2#

*Oct  6 09:53:18.015: %SYS-5-CONFIG_I: Configured from console by console

cust-R2#show ip route 192.168.20.1

Routing entry for 192.168.0.0/16, supernet

Known via "static", distance 1, metric 0 (connected)

Routing Descriptor Blocks:

* directly connected, via Null0

Route metric is 0, traffic share count is 1

如果您现在将来自BB-R3的ICMP请求重新发送到192.168.20.1,cust-R2会将此流量发送到Null0，这会触发生成ICMP不可达。

BB-R3#ping ip 192.168.20.1 repeat 1

Type escape sequence to abort.

Sending 1, 100-byte ICMP Echos to 192.168.20.1, timeout is 2 seconds:

U

Success rate is 0 percent (0/1)

BB-R3#

*Oct  6 09:54:33.051: ICMP: dst (10.3.3.3) host unreachable rcv from 10.0.0.2

有时候，使用指向Null0的汇总静态路由是不可行的。例如，如果在上一个示例中：

- 192.168.1.0/24 地址块被连接到另一个路由器上，该路由器通过 ISDN 拨入 cust-R2

- ISP-R1 不分配 192.168.0.0/16，只分配 192.168.1.0/24

- 此时出现 ISDN 链路断开的情况

注意：结果是传输中的数据包或尝试到达此IP地址块的应用程序会创建与前面所述相同的路由环路。

注：要解决此路由环路，必须使用ip route 192.168.1.0 255.255.255.0 Null0 200命令为192.168.1.0/24配置到Null0的浮动静态路由。此命令中的 200 是管理距离。有关详细信息，请参阅什么是管理距离？。

注意：由于我们使用的管理距离比任何路由协议都高，因此如果通过ISDN链路到达192.168.1.0/24的路由变为非活动状态，cust-R2将安装浮动静态路由。随后，数据包将被发送到 Null0，直到 ISDN 链路变为活动状态为止。

相关信息

- 思科技术支持和下载