目录

简介

先决条件

要求

使用的组件

配置

网络图

配置

CE1

CE2

PE1

PE2

验证

第 1 种情况：通过MP-BGP接受和交换客户路由

第 2 种情况：将路由从一个VRF泄露到另一个VRF。

解决方法

相关的思科支持社区讨论

简介

本文讨论当客户边缘(CE)和提供商边缘(PE)运行内部BGP(iBGP)协议时，VRF间路由泄漏。讨论了当前路由泄漏的限制和解决方法。

先决条件

要求

建议本文的读者具备 BGP 的基础知识。

使用的组件

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

配置

之前不支持将iBGP作为PE到CE协议。但是，现在已经纳入了此功能，iBGP也可以视为PE到CE路由的潜在候选。此功能允许客户在所有站点上拥有一个自治系统。为此，引入了新属性ATTR_SET，以透明方式跨服务提供商网络传输VPN BGP属性。此外，它还需要使PE成为与CE路由器的iBGP会话的路由反射器。新引入的命令neighbor x.x.x.x internal vpn-client有助于实现此目标。当配置此单个命令时，它会自动配置“neighbor x.x.x.x route-reflector-client”和“neighbor x.x.x.x next-hop-self”。

网络图

配置

CE1

interface Loopback10

ip address 10.10.0.1 255.255.255.0

interface Ethernet0/0

ip address 10.0.12.1 255.255.255.0

router bgp 100

bgp router-id 10.1.1.1

bgp log-neighbor-changes

neighbor 10.0.12.2 remote-as 100

!

address-family ipv4

network 10.10.0.0 mask 255.255.255.0

neighbor 10.0.12.2 activate

exit-address-family

CE2

interface Loopback10

ip address 10.20.0.1 255.255.255.0

interface Ethernet0/1

ip address 10.0.45.5 255.255.255.0

router bgp 100

bgp router-id 10.5.5.5

bgp log-neighbor-changes

neighbor 10.0.45.4 remote-as 100

!

address-family ipv4

network 10.20.0.0 mask 255.255.255.0

neighbor 10.0.45.4 activate

exit-address-family

PE1

vrf definition A

rd 10:10

route-target export 100:100

route-target import 100:100

!

address-family ipv4

exit-address-family

!

vrf definition B

rd 20:20

!

address-family ipv4

route-target import 50:50

route-target import 100:100

exit-address-family

interface Loopback0

ip address 10.2.2.2 255.255.255.255

ip ospf 100 area 0

!

interface Ethernet0/0

vrf forwarding A

ip address 10.0.12.2 255.255.255.0

!

interface Ethernet0/1

ip address 10.0.23.2 255.255.255.0

mpls ip

router bgp 100

bgp router-id 10.2.2.2

bgp log-neighbor-changes

neighbor 10.4.4.4 remote-as 100

neighbor 10.4.4.4 update-source Loopback0

!

address-family vpnv4

neighbor 10.4.4.4 activate

neighbor 10.4.4.4 send-community extended

exit-address-family

!

address-family ipv4 vrf A

neighbor 10.0.12.1 remote-as 100

neighbor 10.0.12.1 activate

neighbor 10.0.12.1 internal-vpn-client // needed to exchange routes between PEs

neighbor 10.0.12.1 next-hop-self

exit-address-family

!

address-family ipv4 vrf B

exit-address-family

PE2

vrf definition A

rd 10:10

route-target export 100:100

route-target import 100:100

!

address-family ipv4

exit-address-family

interface Loopback0

ip address 10.4.4.4 255.255.255.255

ip ospf 100 area 0

!

interface Ethernet0/0

ip address 10.0.34.4 255.255.255.0

mpls ip

!

interface Ethernet0/1

vrf forwarding A

ip address 10.0.45.4 255.255.255.0

router bgp 100

bgp router-id 10.4.4.4

bgp log-neighbor-changes

neighbor 10.2.2.2 remote-as 100

neighbor 10.2.2.2 update-source Loopback0

!

address-family vpnv4

neighbor 10.2.2.2 activate

neighbor 10.2.2.2 send-community extended

exit-address-family

!

address-family ipv4 vrf A

neighbor 10.0.45.5 remote-as 100

neighbor 10.0.45.5 activate

neighbor 10.0.45.5 internal-vpn-client //needed to exchange routes between PEs

neighbor 10.0.45.5 route-reflector-client

neighbor 10.0.45.5 next-hop-self

exit-address-family

验证

第 1 种情况：通过MP-BGP接受和交换客户路由

如前所述，iBGP作为PE到CE需要使用命令“neighbor x.x.x.x internal vpn-client”配置与VRF内部客户的BGP对等。 如果没有此命令，本地PE将接受来自VRF中本地CE的路由，但这些客户路由不通过MP-BGP与其他PR路由器共享。以下输出已采用“neighbor x.x.x.x internal vpn-client”预配置。

以下输出显示PE1和PE2上vrf A中的路由。

PE1#show ip route vrf A

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C        10.0.12.0/24 is directly connected, Ethernet0/0

L        10.0.12.2/32 is directly connected, Ethernet0/0

B        10.10.0.0/24 [200/0] via 10.0.12.1, 00:35:23

B        10.20.0.0/24 [200/0] via 10.4.4.4, 00:40:55

PE2#show ip route vrf A

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

C        10.0.45.0/24 is directly connected, Ethernet0/1

L        10.0.45.4/32 is directly connected, Ethernet0/1

B        10.10.0.0/24 [200/0] via 10.2.2.2, 00:00:08

B        10.20.0.0/24 [200/0] via 10.0.45.5, 00:41:55

CE1#show ip route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

B        10.20.0.0/24 [200/0] via 10.0.12.2, 00:03:56

CE2#show ip route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 5 subnets, 2 masks

B        10.10.0.0/24 [200/0] via 10.0.45.4, 00:04:21

第 2 种情况：将路由从一个VRF泄露到另一个VRF。

案例1，成功演示了CE1和CE2之间的路由交换。现在考虑另一个vrf B，它需要将vrf A中的路由安装到自身中。常规方法是在VRF A中使用export-map值，在VRF B中导入相同值，如下所示。

!

vrf definition A

rd 10:10

route-target export 100:100

route-target import 100:100

!

address-family ipv4

exit-address-family

!

vrf definition B

rd 20:20

!

address-family ipv4

route-target import 100:100

exit-address-family

!

完成上述配置后，VRF B无法安装从本地CE接收的任何BGP路由。但是，通过MP-BGP从其他PE接收的路由已成功安装，如下所示在输出中。10.20.0.0/24属于CE，在VRF A中成功接收并且也导出到VRF B。但本地从CE1接收的10.10.0.0/24无法进入VRF B。

PE1#show ip route vrf A bgp

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 4 subnets, 2 masks

B        10.10.0.0/24 [200/0] via 10.0.12.1, 00:12:35

B        10.20.0.0/24 [200/0] via 10.4.4.4, 00:54:22

PE1#show ip route vrf B

Routing Table: B

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/24 is subnetted, 1 subnets

B        10.20.0.0 [200/0] via 10.4.4.4, 00:46:38

只有在配置了“neighbor x.x.x.x internal vpn-client”点之前，才会发现从VRF A到B的本地CE路由的VRF路由泄漏问题。从PE1删除此命令后，VRF B就能成功看到本地CE1路由10.10.0.0/24，如下所示。

!

router bgp 100

address-family ipv4 vrf A

no  neighbor 10.0.12.1 internal-vpn-client

!

PE1#show ip route vrf B bgp

Routing Table: B

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/24 is subnetted, 2 subnets

B        10.10.0.0 [200/0] via 10.0.12.1 (A), 00:00:11

B        10.20.0.0 [200/0] via 10.4.4.4, 00:58:33

远程站点B停止接收站点A的路由（因为邻居x.x.x.x内部vpn客户端已删除）。

PE2#show ip route vrf A bgp

Routing Table: A

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

B        10.20.0.0/24 [200/0] via 10.0.45.5, 01:04:21           // 10.10.0.0/24 is missing.

这是一个限制，已经提出了CSCuw43489增强版来解决此问题。

解决方法

有一种解决方法可用于检查上述问题。此解决方法允许在出现命令“neighbor x.x.x.x internal vpn-client”时将路由从VRF A导入VRF B。 此解决方法要求在从客户导入路由时设置虚拟社区（以下示例中为50:50）。将此虚拟扩展社区导入vrf B。

!

route-map TEST, permit, sequence 10

Match clauses:

Set clauses:

extended community RT:50:50

Policy routing matches: 0 packets, 0 bytes

!

vrf definition B

rd 20:20

address-family ipv4

route-target import 100:100

route-target import 50:50                         // match dummy community

!

router bgp 100

address-family ipv4 vrf A

neighbor 10.0.12.1 route-map TEST in             // Set dummy community

!

PE1#show bgp vpnv4 uni vrf B 10.10.0.0

BGP routing table entry for 20:20:10.10.0.0/24, version 4

Paths: (1 available, best #1, table B)

Not advertised to any peer

Refresh Epoch 1

Local, (Received from ibgp-pece RR-client), imported path from 10:10:10.10.0.0/24 (A)

10.0.12.1 (via vrf A) (via A) from 10.0.12.1 (10.1.1.1)

Origin IGP, metric 0, localpref 100, valid, internal, best

Extended Community: RT:50:50

rx pathid: 0, tx pathid: 0x0

PE1#show ip route vrf B

Routing Table: B

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, H - NHRP, l - LISP

a - application route

+ - replicated route, % - next hop override

Gateway of last resort is not set

10.0.0.0/24 is subnetted, 2 subnets

B        10.10.0.0 [200/0] via 10.0.12.1 (A), 00:00:25

B        10.20.0.0 [200/0] via 10.4.4.4, 00:00:25

如上所示，此解决方法使路由10.10.0.0/24出现在VRF A的VRF B中。