目录

简介

快速十六进制/十进制转换

一次执行多个CLI

使用CLI变量

自定义终端设置

根据需要延迟命令执行

访问路由环境/VRF

连接到LC时，为各VDC运行CLI:N7k特定

在Linux内核和NX-OS之间来回切换而不退出调试插件

直接通过VSH加载配置

使用差分 — 列出计数器之间的差异

使用Watch CLI — 自7.0(3)I2(x)起特定于N9k

在内部检查CPU使用率

发布内部版本

简介

本文档介绍一些可能增强NX-OS故障排除体验的快速提示和技巧。

快速十六进制/十进制转换

十六进制表示十六进制十进制，十进制表示十进制

NX-OS# dec 0x89

137

NX-OS# hex 137

0x89

一次执行多个CLI

CLI代表命令行界面

N7k-LabSW# show clock ; show switchname ; show license host-id

19:10:59.016 UTC Mon Apr 04 2016

N7k-LabSW

License hostid: VDH=TBM14354170

#也适用于配置：

N7k-LabSW# conf t ; hostname N7k-LabSW-DEFAULT ; end

Enter configuration commands, one per line.  End with CNTL/Z.

N7k-LabSW-DEFAULT#

# CLI完成所花的时间：

N7k-LabSW# show clock ; show run | ex .* ; show clock

07:56:08.709 UTC Tue Apr 05 2016

07:56:08.834 UTC Tue Apr 05 2016

使用CLI变量

N7k-LabSW# show cli variables

VSH Variable List (* = session vars)

-----------------

SWITCHNAME="N7k-LabSW"

TIMESTAMP="2016-04-05-08.34.18"

N7k-LabSW# tac-pac bootflash:$(SWITCHNAME)-$(TIMESTAMP)-show-tech-all.gz

N7k-LabSW# dir bootflash: | i show-tech-all

15091722    Apr 05 08:41:27 2016  N7k-LabSW-2016-04-05-08.35.57-show-tech-all.gz

还可以创建您自己的变量：

CCO参考

自定义终端设置

1)避免终端会话超时：

N7k-LabSW# show terminal | i Timeout

Session Timeout: 30 minutes

N7k-LabSW# terminal session-timeout ?

<0-525600>  Enter timeout in minutes, 0 to disable

N7k-LabSW# terminal session-timeout 0

N7k-LabSW# show terminal | i Timeout

Session Timeout: 0 minutes

2)设置显示终端的宽度/长度：

当您不希望输出中断到长宽输出的新行时，该功能非常方便

N7k-LabSW# show terminal | i Width

Length: 25 lines, Width: 98 columns

N7k-LabSW# terminal width 300

N7k-LabSW# show terminal | i Width

Length: 25 lines, Width: 300 columns

根据需要延迟命令执行

N7k-LabSW# show clock ; sleep 10 ; show clock

19:27:07.435 UTC Mon Apr 04 2016

19:27:17.445 UTC Mon Apr 04 2016

访问路由环境/VRF

VRF代表虚拟路由和转发

为特定VRF运行CLI，而不每次向命令添加VRF <>:

N7k-LabSW# routing-context vrf management

N7k-LabSW%management# sh ip route

IP Route Table for VRF "management"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

0.0.0.0/0, ubest/mbest: 1/0

*via 10.48.61.129, [1/0], 1w4d, static

10.48.61.128/26, ubest/mbest: 1/0, attached

*via 10.48.61.150, mgmt0, [0/0], 1w4d, direct

10.48.61.150/32, ubest/mbest: 1/0, attached

*via 10.48.61.150, mgmt0, [0/0], 1w4d, local

N7k-LabSW%management#

N7k-LabSW%management# routing-context vrf default

N7k-LabSW# sh ip route

IP Route Table for VRF "default"

'*' denotes best ucast next-hop

'**' denotes best mcast next-hop

'[x/y]' denotes [preference/metric]

'%<string>' in via output denotes VRF <string>

连接到LC时，为各VDC运行CLI:N7k特定

VDC代表虚拟设备环境

LC代表线路卡

N7K代表Nexus 7000

连接到LC后，CLI将针对默认VDC运行，或需要为相关命令指定VDC #。

您可以像路由情景一样在VDC #空间中运行CLI。

示例：

N7k-LabSW# attach module 4

Attaching to module 4 ...

To exit type 'exit', to abort type '$.'

module-4# show hardware mac address-table

FE | Valid| PI|  BD  |      MAC      |  Index| Stat| SW  | Modi| Age| Tmr| GM| Sec| TR| NT| RM| RMA| Cap| Fld|Always| PV | RD| NN| UC|PI_E8| VIF | SWID| SSWID|  LID

|      |   |      |               |       |  ic |     | fied|Byte| Sel|   | ure| AP| FY|   |    |TURE|    | Learn|    |   |   |   |     |     |     |      |

---+------+---+------+---------------+-------+-----+-----+-----+----+----+---+----+---+---+---+----+----+----+------|----|---|---|---|-----|-----|-----|------|-------

4    1     1   2     0023.ac66.1dc1  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

5    1     1   2     0023.ac66.1dc1  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

Command outputs from Default VDC are pulled here

module-4# vdc 6  >>>>>>> switches LC to pull this VDC specific outputs only

module-4# show hardware mac address-table

FE | Valid| PI|  BD  |      MAC      |  Index| Stat| SW  | Modi| Age| Tmr| GM| Sec| TR| NT| RM| RMA| Cap| Fld|Always| PV | RD| NN| UC|PI_E8| VIF | SWID| SSWID|  LID

|      |   |      |               |       |  ic |     | fied|Byte| Sel|   | ure| AP| FY|   |    |TURE|    | Learn|    |   |   |   |     |     |     |      |

---+------+---+------+---------------+-------+-----+-----+-----+----+----+---+----+---+---+---+----+----+----+------|----|---|---|---|-----|-----|-----|------|-------

0    1     1   92    0023.ac66.1dc6  0x010c7   1   0x000   0    0     0    1    0   0   0   0    0    0    0    0   0x00  0   0   0    0   0x000 0x000  0x000 0x010c7

0    1     0   91    0019.3074.9c02  0x00414   0   0x009   0    118   2    0    0   0   0   0    0    0    0    0   0x00  1   0   1    0   0x000 0x000  0x000 0x00414

在Linux内核和NX-OS之间来回切换而不退出调试插件

N5600-Lab# load dplugg

Loading plugin version 7.1(1)N1(1)

###############################################################

Warning: debug-plugin is for engineering internal use only!

For security reason, plugin image has been deleted.

###############################################################

Successfully loaded debug-plugin!!!

Linux(debug)# vsh >>>>> Moves back to NX-OS prompt

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2015, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

N5600-Lab# show clock

20:20:07.468 UTC Mon Apr 04 2016

N5600-Lab# exit >>>>> Moves back to Linux prompt

Linux(debug)#

Linux(debug)# clock

Mon Apr  4 20:20:13 2016   -0.282195 seconds UTC

NOTE: "Debug Plugin" should only be used in presence of Cisco TAC and is not available for customer use.

Please do not modify any setting unless guided by Cisco TAC.

或者，NX-OS CLI可以直接从调试插件运行：

Linux(debug)# vsh -c "show switchname"

N5600-Lab

Linux(debug)# vsh -c "show module"

Mod Ports Module-Type                         Model                  Status

--- ----- ----------------------------------- ---------------------- -----------

1   52    Nexus 56128P Supervisor             N5K-C56128P-SUP        active *

Mod  Sw              Hw      World-Wide-Name(s) (WWN)

---  --------------  ------  ---------------------------------------------------

1    7.1(1)N1(1)     1.1     --

<snipped>

直接通过VSH加载配置

VSH代表虚拟外壳

NEXUS-LABSWICTH# echo "hostname LAB" | vsh

LAB#

Mon Apr  4 20:51:14 2016:type=update:id=10.61.236.97@pts/1:user=admin:cmd=echo "hostname LAB" | vsh (SUCCESS)

Mon Apr  4 20:51:14 2016:type=start:id=vsh.9326:user=admin:cmd=

Mon Apr  4 20:51:14 2016:type=update:id=vsh.9326:user=admin:cmd=configure terminal ; hostname LAB (SUCCESS)

LAB# echo "hostname NEXUS-LABSWITCH" | vsh

NEXUS-LABSWITCH#

Mon Apr  4 20:51:23 2016:type=update:id=10.61.236.97@pts/1:user=admin:cmd=echo "hostname NEXUS-LABSWITCH" | vsh (SUCCESS)

Mon Apr  4 20:51:23 2016:type=start:id=vsh.9390:user=admin:cmd=

Mon Apr  4 20:51:23 2016:type=update:id=vsh.9390:user=admin:cmd=configure terminal ; hostname NEXUS-LABSWITCH (SUCCESS)

N5600-Lab# show run | i hostname | sed "s/N5600-Lab/N56128/" | vsh

N56128#

N56128# show accounting log | last 3

Mon Apr  4 21:23:23 2016:type=start:id=vsh.6762:user=admin:cmd=

Mon Apr  4 21:23:23 2016:type=update:id=vsh.6762:user=admin:cmd=configure terminal ; hostname N56128 (SUCCESS)

Mon Apr  4 21:23:23 2016:type=stop:id=vsh.6762:user=admin:cmd=

N5600-Lab# echo "hostname N56128" > bootflash:CLI

N5600-Lab#

N5600-Lab# show file CLI

hostname N56128

N5600-Lab# show file CLI | vsh

N56128#

使用差分 — 列出计数器之间的差异

差异代表差异

N5600-Lab# show int mgmt0 | diff

N5600-Lab# show int mgmt0 | diff

11,12c11,12

<     9393 input packets 829764 bytes

< 141 unicast packets 3715 multicast packets

---

>     9395 input packets 830217 bytes

> 142 unicast packets 3716 multicast packets

15,16c15,16

<     214 output packets 47396 bytes

< 27 unicast packets 181 multicast packets

---

>     215 output packets 47640 bytes

> 27 unicast packets 182 multicast packets

使用Watch CLI — 自7.0(3)I2(x)起特定于N9k

N9K代表Nexus 9000

BRU-N9K3-1# watch differences interval 1 show int mgmt0 counter

Every 1.0s:  vsh -c "show int mgmt0 counter"                                                                                                                              Mon Apr  4 23:42:27 2016

CCO reference

在内部检查CPU使用率

CPU代表中央处理器

此命令每5秒（可以更改）提供一次输出，显示哪个进程消耗了CPU。它的输出与linux top命令相同：

NEXUS# show system internal processes cpu 5 | no-more

top - 12:41:55 up 117 days, 17:00,  5 users,  load average: 0.44, 0.50, 0.55

Tasks: 2883 total,   2 running, 1022 sleeping,   0 stopped, 1859 zombie

Cpu(s):  1.0%us,  0.9%sy,  0.0%ni, 98.0%id,  0.0%wa,  0.0%hi,  0.1%si,  0.0%st

Mem:  32744992k total, 14563132k used, 18181860k free,    61308k buffers

Swap:        0k total,        0k used,        0k free,  4091160k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

18465 admin     20   0  5200 3108 1148 R 16.6  0.0   0:00.17 top

6389 root      20   0  699m  53m  14m S  3.3  0.2 113:49.07 netstack

18473 root      20   0 97940 3804 2796 R  3.3  0.0   0:00.02 vsh

10 root      15  -5     0    0    0 S  1.7  0.0   9:10.85 ksoftirqd/2

4876 root      15  -5  369m  27m 6564 S  1.7  0.1  67:33.91 sysmgr

9581 svc-isan  20   0  446m  41m  11m S  1.7  0.1  21:16.15 isis_l2mp

1 root      20   0  1980  652  572 S  0.0  0.0   3:02.73 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.03 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.49 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0  22:48.66 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:00.00 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.65 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   2:27.70 ksoftirqd/1

top - 12:42:01 up 117 days, 17:00,  5 users,  load average: 0.37, 0.48, 0.54

Tasks: 2887 total,   1 running, 1027 sleeping,   0 stopped, 1859 zombie

Cpu(s):  1.0%us,  0.9%sy,  0.0%ni, 98.0%id,  0.0%wa,  0.0%hi,  0.1%si,  0.0%st

Mem:  32744992k total, 14562360k used, 18182632k free,    61308k buffers

Swap:        0k total,        0k used,        0k free,  4091160k cached

PID USER      PR  NI  VIRT  RES  SHR S %CPU %MEM    TIME+  COMMAND

18502 admin     20   0  5200 3112 1148 R 18.5  0.0   0:00.17 top

6389 root      20   0  699m  53m  14m S  1.7  0.2 113:49.08 netstack

6402 root      -2   0  366m  13m 8660 S  1.7  0.0   1032:41 clx

9015 root      20   0  482m  21m  11m S  1.7  0.1 225:45.72 pm

10066 svc-isan  20   0  403m  22m 9.9m S  1.7  0.1 268:31.28 ospf

10487 svc-isan  20   0  354m 9992 6596 S  1.7  0.0 194:52.11 ecp

1 root      20   0  1980  652  572 S  0.0  0.0   3:02.73 init

2 root      15  -5     0    0    0 S  0.0  0.0   0:00.03 kthreadd

3 root      RT  -5     0    0    0 S  0.0  0.0   0:00.49 migration/0

4 root      15  -5     0    0    0 S  0.0  0.0  22:48.66 ksoftirqd/0

5 root      -2  -5     0    0    0 S  0.0  0.0   0:00.00 watchdog/0

6 root      RT  -5     0    0    0 S  0.0  0.0   0:00.65 migration/1

7 root      15  -5     0    0    0 S  0.0  0.0   2:27.70 ksoftirqd/1

发布内部版本

N7k/N9k

N7k-LabSW# show version internal build-identifier

Kickstart image file: bootflash:///n7000-s2-kickstart.6.2.10.bin :  S102

System image file: bootflash:///n7000-s2-dk9.6.2.10.bin :  S102

BRU-N9K3-1# show version internal build-identifier

nxos image file: bootflash:///nxos.7.0.3.I2.2a.bin :  S30

N5k/6k:

N5600-Lab# show platform fwm info global | i FwM

FwM build Details: Built at Sat Apr 18 11:11:18 PDT 2015 on nuo-sw-build40 in directory /auto/n5kiluka/daily_build/iplus/nexus/522/src/build by buildsa)