目录

简介

先决条件

要求

使用的组件

规则

将NAM软件升级到版本3.x

任务

逐步指导

验证

故障排除

相关信息

简介

本文档提供了如何将网络分析模块(NAM)软件升级到3.x版的分步过程。

先决条件

要求

尝试进行此配置之前，请确保满足以下要求：

- 熟悉文件传输协议(FTP)

- 熟悉命令行中的Catalyst交换机管理

使用的组件

本文档中的信息基于以下软件和硬件版本：

- WS-X6380（原始NAM）

- NAM 3.0版软件

- NAM-1和NAM-2硬件设备

- 运行CatOS 7.3.1的Catalyst 6505

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

将NAM软件升级到版本3.x

任务

本节介绍将NAM软件升级到3.x版的信息。

逐步指导

要升级软件，请完成以下步骤：

1. 下载文件：

- 原始NAM — 请参阅适用于Cat 6500的软件下载NAM(生产代码：WS-X6380-NAM)(仅注册客户)，并获取c6nam.3-1-1.bin.gz文件。

- NAM1/NAM2 — 请参阅适用于Cat 6500的软件下载NAM(生产代码：WS-SVC-NAMx)(仅注册客户)，并获取c6svc-nam.3-1-1.bin.gz文件。

2. 将文件放在要使用的FTP服务器上帐户的根目录中。

注意：此图示使用WS-X6380-NAM，但同时适用于WS-SVC-NAM-1和WS-SVC-NAM-2。

本示例使用以下信息：

- FTP服务器是：

- 名称：rtp-sycamore.cisco.com

- 地址 :172.18.123.68

- 帐户ID为cse。

- 帐户密码为csec。

- cse的根目录为：~ rtp-sycamore cse %4> pwd /local/home/cse。

- 文件列在此处，因此：/local/home/cse/c6nam.3-1-1.bin.gz。

~ rtp-sycamore cse %4>ls -al c6nam.3-1-1.bin.gz-rw-r—r— 1 cse other 75671244 5月28日11:17 c6nam.3-1-1.bin.gz

3. 要验证FTP服务器是否正常工作，请测试以查看此FTP服务器是否可从另一台工作站访问：

注意：此处使用rtp-cse-205作为示例。

rtp-cse-205_oansari-> ftp rtp-sycamore

Connected to rtp-sycamore.cisco.com.

220 rtp-sycamore FTP server (SunOS 5.7) ready.

Name (rtp-sycamore:oansari): cse

331 Password required for cse.

Password: csecse

230 User cse logged in.

Remote system type is UNIX.

Using binary mode to transfer files.

4. 当您访问FTP服务器时，请确保文件可用：

ftp> ls c6nam.3-1-1.bin.gz

227 Entering Passive Mode (172,18,123,68,222,205)

150 ASCII data connection for /bin/ls (64.102.51.64,35372) (0 bytes).

-rw-r--r-- 1 cse other 75671244 May 28 11:17 c6nam.3-1-1.bin.gz

226 ASCII Transfer complete.

当您验证文件存在且可用时，您会更加确信文件传输到NAM将成功。这确认FTP服务正在运行，且所需文件可下载到FTP客户端。

5. 开始升级NAM的步骤。示例如下：

1. 检查模块：

nms-6506a> (enable) sh mod

...

Mod Slot Ports Module-Type               Model               Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

1   1    2     1000BaseX Supervisor      WS-X6K-SUP1A-2GE    yes ok

15  1    1     Multilayer Switch Feature WS-F6K-MSFC         no  ok

2   2    0     FlexWAN Module            WS-X6182-2PA        no  power-down

4   4    2     Network Analysis Module   WS-X6380-NAM        no  ok

5   5    8     1000BaseX Ethernet        WS-X6408-GBIC       no  ok

6   6    48    10/100BaseTX Ethernet     WS-X6348-RJ-45      yes ok

输出显示，所关注的NAM位于插槽4中，状态为ok。

2. 检查CatOS交换机的版本：

nms-6506a> (enable) sh ver

WS-C6506 Software, Version NmpSW: 7.3(1)

注意：版本必须是7.3(1)或更高版本。如果您的交换机未升级到此版本，请勿继续升级NAM。首先升级交换机软件。

3. 如果指示的版本为7.3(1)或更高版本，则重置NAM:

nms-6506a> (enable) reset 4 hdd:2

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

nms-6506a> (enable)

注意：对于NAM1/NAM2，必须使用以下命令：reset <module> cf:1。

您在终端上看到以下输出：

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:28:36 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 11:28:36 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

003 May 28 11:28:50 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:28:50 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483090709 ticks

2003 May 28 11:28:50 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 11:29:07 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483092362 ticks

2003 May 28 11:29:07 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:26 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 11:30:26 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 11:30:27 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 11:30:27 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483100353 ticks

2003 May 28 11:30:27 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 11:30:27 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

4. 确保NAM重新启动成功：

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

!--- Yes, it is up again.

5. 会话到NAM并发出upgrade 命令：

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

Maintenance Partition

!--- Notice how this states Maint Partition now.

login: root

Password:

!--- Enter the password (the default password here is 'cisco').

Network Analysis Module (WS-X6380-NAM) Console, 1.2(1a)m

Copyright (c) 1999, 2000, 2001 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz

!--- Notice that the complete path was specified after the IP address, !--- the same path that was retrieved from the "pwd" command on the server. !--- For this reason, it is encouraged to use your UNIX server as your !--- FTP server. If necessary, get your sysadmin to enable FTP on it !--- temporarily to upgrade this NAM. !--- This step takes the longest time to upgrade.

root@nms-6506a-nam.123.cisco.com#upgrade ftp://cse:csecse@172.18.123.68/

local/home/cse/c6nam.3-1-1.bin.gz500 'SIZE c6nam.3-1-1.bin.gz':

command not understood.

ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

(unknown size) - [|] 41362K

!--- This goes on for a long time.

!--- You have to be patient through this. !--- Then, after a lot of time, (can run for hours):

75671250 bytes transferred in 3010.21 sec (24.55k/sec)

downloaded image version 3.1(1)

Upgrade file ftp://cse:csecse@172.18.123.68/local/home/cse/c6nam.3-1-1.bin.gz

is downloaded. Upgrading will wipe out the

contents of the application partition on the hard disk.

Do you want to proceed installing it [y|N]: y

Proceeding with installation. Please do not interrupt.

If installation is interrupted or fails, boot this

partition again and restart upgrade.

!--- After a few minutes, you should see this:

Upgrade complete. You can boot the new application partition.

root@nms-6506a-nam.123.cisco.com#

6. 返回并重置交换机：

root@nms-6506a-nam.123.cisco.com#exit

nms-6506a> (enable) reset 4

This command will reset module 4.

Unsaved configuration on module 4 will be lost

Do you want to continue (y/n) [n]? y

Module 4 shut down in progress, do not remove module until shutdown completed.

you might see these log messages as well:

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:47:45 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:47:45 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "failed(7)"

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:48:00 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:48:00 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483565551 ticks

2003 May 28 12:48:00 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "unknown(1)"

2003 May 28 12:48:16 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483567205 ticks

2003 May 28 12:48:16 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:22 %SNMP-5-ENTITYMODTRAP:Module 4 status

changed to "ok(2)"

2003 May 28 12:50:22 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:50:22 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:50:22 %SNMP-5-ENTITYTRAP:Entity Mib last change time

483579792 ticks

2003 May 28 12:50:22 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:50:23 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync

for Module 4

7. 最后，再次登录NAM:

nms-6506a> (enable) sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

!--- NOTE #1: The 3.1 application image upgrade requires a special !--- one-time extra reboot for optimal NAM 3.1 operation. !--- Reboot the NAM immediately after logging in. !--- NOTE #2: Although it is NOT recommended, if for some reason you either !--- want to downgrade the application image later on this NAM or reinstall !--- the maintenance image, it is necessary to first install the NAM !--- downgrade patch.

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

root@nms-6506a-nam.123.cisco.com# reboot

!--- Reboot the NAM one last time.

Reboot the NAM? (Y/N) [N]: y

6. 等待NAM重新启动

!--- Note: NAM 3.1 takes a little longer to reboot (7-10 minutes).

Look for these logs:

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:08 %SNMP-5-MODULETRAP:Module 4 [Down] Trap

2003 May 28 12:55:08 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "failed(7)"

2003 May 28 12:55:23 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:55:23 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483609821 ticks

2003 May 28 12:55:23 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "unknown(1)"

2003 May 28 12:55:39 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483611474 ticks

2003 May 28 12:55:39 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

最后：

2003 May 28 12:57:17 %SNMP-5-ENTITYMODTRAP:Module 4 status changed to "ok(2)"

2003 May 28 12:57:17 %SNMP-5-MODULETRAP:Module 4 [Up] Trap

2003 May 28 12:57:18 %SNMP-5-FRUREMOVEDTRAP:module 4 removed

2003 May 28 12:57:18 %SNMP-5-ENTITYTRAP:Entity Mib last change time 483621409 ticks

2003 May 28 12:57:18 %SNMP-5-FRUINSERTEDTRAP:module 4 inserted

2003 May 28 12:57:18 %SYS-3-MOD_PORTINTFINSYNC:Port Interface in sync for Module 4

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

- show mod

nms-6506a> (enable) sh mod 4

Mod Slot Ports Module-Type Model Sub Status

--- ---- ----- ------------------------- ------------------- --- --------

4 4 2 Network Analysis Module WS-X6380-NAM no ok

(i) login again to see the version:

nms-6506a> (enable)sess 4

Trying NAM-4...

Connected to NAM-4.

Escape character is '^]'.

Cisco Network Analysis Module (WS-X6380-NAM)

login: root

Password:

Terminal type: vt100

Cisco Network Analysis Module (WS-X6380-NAM) Console, 3.1(1)

Copyright (c) 1999-2003 by cisco Systems, Inc.

root@nms-6506a-nam.123.cisco.com#

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 思科网络分析模块流量分析器用户指南，3.6

- 技术支持和文档 - Cisco Systems