目录

简介

先决条件

要求

使用的组件

规则

背景信息

配置

网络图

配置

验证

故障排除

故障排除命令

相关信息

简介

本文档提供了使用拨号程序配置文件通过ISDN使用每个站点一个B信道桥接两个不同站点的示例配置。

先决条件

要求

在尝试此配置之前，您需要从ISDN服务提供商处收集以下信息：

- ISDN交换机类型

- ISDN服务配置文件标识符(SPID)和本地目录号码(LDN)（如果适用）。在北美，除5ESS自定义点对点交换机外，所有ISDN交换机类型都需要SPIDS。LDN是路由器的本地七位ISDN电话号码（无区号）。DMS-100需要LDN。

您还需要收集以下网络信息：

- 点对点协议(PPP)主机名 — 您必须为两台设备分配PPP客户端名称。

- 首选PPP身份验证类型 — 质询握手身份验证协议(CHAP)身份验证，本示例中使用。

- PPP密码 — 您必须为所有位置分配PPP密码。

- IP地址信息 — 您必须创建IP网络设计。

- 电话号码 — 两个位置的ISDN电话号码。

- 用户名和密码。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

拨号程序配置文件允许物理接口的配置与呼叫所需的逻辑配置分离。使用拨号程序配置文件时，逻辑和物理配置会按呼叫动态绑定。

注意：您不能在一个B信道上桥接，而在另一个信道上桥接路由。

配置

本节提供配置本文档中描述的功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用以下网络设置：

配置

路由器 1

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router1

no ip routing

!

enable password foo

!

username Router2 password bar

username Router3 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.1 255.255.255.0

media-type 10BaseT

bridge-group 1

!

interface BRI0

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer pool-member 1

ppp authentication chap

!

interface Dialer0

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer remote-name Router2

dialer string 5552323

dialer pool 1

dialer-group 2

no fair-queue

no cdp enable

ppp authentication chap

bridge-group 1

!

interface Dialer1

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer remote-name Router3

dialer string 5553434

dialer pool 1

dialer-group 2

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

end

路由器 2

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router2

no ip routing

!

enable password foo

!

username Router1 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.2 255.255.255.0

no ip route-cache

bridge-group 1

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

dialer pool-member 1

!

interface Dialer0

no ip address

encapsulation ppp

no ip route-cache

dialer remote-name Router1

dialer string 5551212

dialer pool 1

dialer-group 2

no fair-queue

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

!

end

路由器 3

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router3

no ip routing

!

username Router1 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.3 255.255.255.0

no ip route-cache

bridge-group 1

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

dialer pool-member 1

ppp authentication chap

!

interface Dialer0

no ip address

encapsulation ppp

no ip route-cache

dialer remote-name Router1

dialer string 5551212

dialer pool 1

dialer-group 2

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

!

end

验证

当前没有可用于此配置的验证过程。

故障排除

本部分提供的信息可用于对配置进行故障排除。

故障排除命令

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

- debug ppp authentication — 查看客户端是否通过身份验证。如果使用Cisco IOS®软件版本11.2之前的版本，请改用debug ppp chap命令。

- debug ppp negotiation — 查看客户端是否通过点对点协议(PPP)协商；这是您检查地址协商的时候。

- debug ppp error - 显示和PPP连接协商与操作相关的协议错误以及统计错误。

- debug isdn q931 — 在用户拨入时检查ISDN连接，以便查看ISDN呼叫发生的情况（例如，如果连接被丢弃）。

- show isdn status - 状态应为：

layer 1 = active

layer 2 = MULTIPLE_FRAMES_ESTABLISHED

如果第1层未激活，则配线适配器或端口可能损坏或未插入。如果第2层处于TEI_Assign状态，则路由器不会与交换机通信。

- show bridge — 查看网桥转发数据库中条目的类。

- show span — 显示路由器已知的生成树拓扑。

相关信息

- 拨号技术支持页面

- 技术支持 - Cisco Systems