目录

简介

开始使用前

规则

先决条件

使用的组件

背景理论

配置

网络图

配置

验证

测试备份链路

显示命令

show 输出示例

故障排除

调试命令

排除 DDR 备份故障

调试输出示例

相关信息

简介

此配置演示使用ISDN基本速率接口(BRI)电路备份专线、WAN或者串行连接。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

背景理论

backup interface 命令将接口置于备用模式，直到主接口关闭。欲知备用接口功能的更多信息，参见评估备份接口、浮动静态路由和DDR备份的拨号程序监视。

此示例对备份接口功能使用 Dialer Profiles。使用 backup interface 命令强制将已配置的物理或逻辑接口置于备用模式。使用拨号程序配置文件，只有逻辑接口(拨号程序接口)采用备用模式，而物理接口(BRI)仍然可以用于其他连接，作为其他连接池的成员。有关 Dialer Profiles 的详细信息，请参阅使用 Dialer Profiles 配置 ISDN DDR。

配置

本部分提供有关如何配置本文档所述功能的信息。

配置按需拨号路由 (DDR) 备份包括以下这些不同步骤：

1. 配置 DDR。您可以使用传统 DDR (Dialer Maps) 或 Dialer Profiles。此配置使用 Dialer Profiles。在实施备份配置前验证您的DDR连接正常工作。这允许您在配置备份之前验证所使用的拨号方法、点到点协议(PPP)协商和认证是否成功。欲知基于拨号映射的备份配置，使用BRI和backup interface命令，参见“DDR备份”文件。

2. 配置其中一个路由器以在主链路出现故障时启动 DDR 连接。此配置使用 backup interface 命令来触发拨出。

3. 定义在主链路出现故障时将触发备份连接的相关流量。

欲知更多信息，建议您参见“配置和故障排除DDR备份文件”文件。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本文档使用下图所示的网络设置。

配置

此配置使用BRI电路备份串行链路。它还在两个路由器之间使用 Open Shortest Path First (OSPF) 路由协议。一旦激活备用连接，您必须保证更新路由表，使用新的备份链路。只有一端 (maui-soho-01) 配置为拨出。另一端 (maui-nas-05) 配置为只接受呼叫。

在此配置中，我们使用串行连接，有一个连接到Cisco 3640路由器的Cisco 1604路由器。两个路由器也通过BRI接口安装，此接口用于备份链路。Cisco 1604 运行的是 Cisco IOS® 软件版本 12.1(5)T，而 Cisco 3640 使用的是 Cisco IOS 12.1(2)。

注意：在配置备份接口和备份延迟命令之前，请配置DDR连接（使用BRI0的拨号程序1）并验证其是否正常工作。这将允许在您配置备份之前，有效管理排除拨号配置文件故障、ISDN、PPP和认证问题。

maui-soho-01 (1600)

maui-soho-01#show running-config

Building configuration...

Current configuration : 1687 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname maui-soho-01

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- Basic AAA configuration for ppp calls.

enable secret 5 <deleted>

!

username maui-nas-05 password 0 cisco

!--- Username for remote router (maui-nas-05) and shared secret(used for !--- CHAP authentication). !--- Shared secret must be the same on both sides.

ip subnet-zero

no ip finger

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.17.1.1 255.255.255.0

!--- The loopback address will be used by OSPF for the router ID.

!

interface Ethernet0

ip address 172.16.1.1 255.255.255.0

!

interface Serial0

!--- Primary Interface

backup delay 10 30

!--- Backup link will be activated 10 seconds after primary link goes down. !--- Backup link will be deactivated 30 seconds after primary link is restored.

backup interface Dialer1

!--- Interface Dialer 1 will provide backup. Dialer 1 will be placed in Standby !--- until the primary link goes down.

ip address 192.168.10.2 255.255.255.252

encapsulation ppp

no fair-queue

clockrate 64000

ppp authentication chap

!

interface BRI0

no ip address

encapsulation ppp

dialer pool-member 10

!--- Assign BRI0 as member of dialer pool 10. !--- Dialer pool 10 is specified in interface Dialer 1.

isdn switch-type basic-ni

isdn spid1 51255511110101 5551111

isdn spid2 51255511120101 5551112

ppp authentication chap

!--- Use PPP CHAP authentication.

ppp multilink

!

interface Dialer1

!--- Dialer 1 provides backup for the serial link. !--- This interface will be in standby until the primary link is down.

ip address 172.20.10.2 255.255.255.0

!--- Address for the dialer interface. !--- The remote side dialer interface is in the same subnet.

encapsulation ppp

dialer pool 10

!--- Defines Dialer pool 10. !--- BRI 0 is a member of this pool.

dialer remote-name maui-nas-05

!--- Specifies remote router name. !--- This name must match that used by the remote router to authenticate itself.

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- The link will be disconnected if there is no interesting traffic for 900 secs. !--- Since OSPF hellos are interesting traffic, this will reset the idle timeout !--- and cause the link to stay up until the primary link is restored and the dialer !--- returns to standby mode.

dialer string 5552222

!--- Defines the destination routers phone number.

dialer load-threshold 80 outbound

!--- This sets the outbound load level for traffic at which !--- additional connections will be added to the MP bundle load level. !--- Values range from 1 (unloaded) to 255 (fully loaded). The threshold !--- in this case is 80/255=32%.

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

ppp authentication chap

!--- Use PPP CHAP authentication.

ppp multilink

!

router ospf 5

!--- OSPF configuration. You can use any routing protocol here without any other !--- changes to the configuration.

log-adjacency-changes

network 172.16.1.0 0.0.0.255 area 0

network 172.17.1.0 0.0.0.255 area 0

network 172.20.10.0 0.0.0.255 area 0

network 192.168.10.0 0.0.0.3 area 0

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to Interface Dialer 1 using dialer-group 1. !--- OSPF hello packets will trigger the dial.

!

line con 0

exec-timeout 0 0

login authentication NO_AUTHEN

transport input none

line vty 0 4

!

end

在 maui-soho-01 的配置中，请注意以下几点：

- 备份链路使用 Dialer Profiles。不使用物理接口(BRI 0)时，允许备份接口（拨号程序1）采用备用模式。当主链路处于活动状态时，允许您使用物理接口(通过把它用作不同拨号池的成员)。有关 Dialer Profiles 的详细信息，请参阅 Dialer Profiles 的配置与故障排除文档。

- 路由器使用 OSPF 作为路由协议。您也可以使用任何其他路由协议（例如 RIP、EIGRP）。请参阅相应的路由协议配置指南 IPC：第 2 部分：IP 路由协议。确保路由协议配置中包括主要接口网络和备份接口网络，以便信息可以使用路由协议传播。如果您希望使用静态路由而不是路由协议，则使用远程BRI接口的下一跳创建静态路由(根据实际情况，您可以把它创建为浮动静态路由)。

- 任何 IP 流量都将触发拨号（基于 dialer-list 1 和 dialer-group 1）。 由于主链路正常运行时备份链路处于备用模式而无法拨号，因此备份链路在备份接口DDR备份环境中运行良好。因为备份链路要求触发数据流拨通备份链路，以验证您有生成触发数据流的数据流源。在本示例中，OSPF hello 数据包将触发拨号。如果您没有使用路由协议，您可以使用ICMP Ping来拨打备份链路。根据需要来调节相关流量。

maui-nas-05 (3640)

maui-nas-05#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname maui-nas-05

!

aaa new-model

aaa authentication login default local

aaa authentication login NO_AUTHEN none

aaa authentication ppp default local

!--- Basic AAA configuration for ppp calls.

enable secret 5 <deleted>

!

username maui-soho-01 password 0 cisco

!--- Username for remote router (maui-soho-01) and shared secret !---(used for CHAP authentication). !--- Shared secret must be the same on both sides.

ip subnet-zero

!

isdn switch-type basic-ni

!

interface Loopback0

ip address 172.22.1.1 255.255.255.0

!--- The loopback address will be used by OSPF for the router ID.

!

interface Ethernet0/0

ip address 172.22.53.105 255.255.255.0

!

interface Ethernet0/1

no ip address

shutdown

!

interface BRI1/0

ip unnumbered Loopback0

!--- Unnumbered to the Loopback 0 address.

encapsulation ppp

dialer pool-member 20

!--- Assign BRI0 as member of dialer pool 20. !--- Dialer pool 20 is specified in interface Dialer 1.

isdn switch-type basic-ni

isdn spid1 51255522220101 5552222

isdn spid2 51255522230101 5552223

ppp authentication chap

!--- Use ppp chap authentication.

ppp multilink

!

! <<-- Unused interface configurations have been removed.

!

interface Serial2/0

!--- Primary interface.

ip address 192.168.10.1 255.255.255.252

encapsulation ppp

no fair-queue

ppp authentication chap

!

! <<--Unused interface configurations have been removed.

!

interface Dialer1

!--- Dialer 1 provides backup for the serial link. !--- Notice that there is no dialer string on this router. This prevents the NAS !--- from attempting to dialout using the backup circuit when the primary is up.

ip address 172.20.10.1 255.255.255.0

!--- Address for the dialer interface. !--- The remote side dialer interface is in the same subnet.

encapsulation ppp

dialer remote-name maui-soho-01

!--- Specifies remote router name. !--- This name must match that used by the remote router to authenticate itself.

dialer pool 20

!--- Defines dialer pool 20.

dialer idle-timeout 900

!--- Idle timeout is set to 900 seconds (15 minutes). !--- This is equal to the idle timeout set on maui-soho-01.

dialer max-call 4096

dialer-group 1

!--- Apply interesting traffic definition from dialer-list 1.

ppp authentication chap

!--- Use ppp chap authentication.

ppp multilink

!

router ospf 5

network 172.20.10.0 0.0.0.255 area 0

network 172.22.1.0 0.0.0.255 area 0

network 172.22.53.0 0.0.0.255 area 0

network 192.168.10.0 0.0.0.3 area 0

default-information originate

!--- Transmit ospf default information. !--- This may be required for remote router to use the BRI DDR link.

!

ip classless

ip route 0.0.0.0 0.0.0.0 Ethernet0/0

no ip http server

!

dialer-list 1 protocol ip permit

!--- All IP traffic is designated as interesting. !--- This is applied to Interface Dialer 1 using dialer-group 1.

!

line con 0

login authentication NO_AUTHEN

transport input none

line 97 102

line aux 0

line vty 0 4

!

end

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

在服务器 maui-nas-05 (3640) 的配置中，验证以下几点：

- 该配置与任何拨入配置都类似。就 NAS 而言，备份链路只是另一个传入呼叫。

- 拨号程序接口没有拨号程序字符串，因此无法拨出。

- 所有流量都是相关流量。由于备份链路无法以任何方式拨出（请参阅上一个项目符号列表项），因此这是可接受的。如果您增加触发数据流的限制(例如，路由协议不是触发协议)，如果没有触发数据流通过链路，NAS则有可能断开呼叫。在备份情况下，最好是让某一终端(拨出或拨入端)控制备份链路，避免链路不稳定性。

测试备份链路

备份接口要求，甚至在将备份接口考虑为备用模式之前，就应该关闭主接口协议。因此，要在不物理上切断主链路的情况下测试备份链路是不可能的。选项有：

- 使用 shutdown 命令关闭主接口。但不要对配置了 backup interface 命令的路由器使用 shutdown 命令。这不会使 Cisco IOS 软件对备份链路拨号。通过关闭不带有backup interface命令的路由器上的主要接口，您可以激活备份。在这种方案中，在 maui-soho-01 (1600) 上配置了 backup interface 命令。 因此在 maui-nas-05 (3640) 的主要接口执行 shutdown 命令，可以激活备份链路。

- 物理上通过拔去电缆或某些等效的方法切断主要连接，从而打开备份接口。

显示命令

输出解释器工具支持某些 show 命令（只限于注册用户），通过它可以查看 show 命令输出的分析。

- show isdn status - 确保路由器与 ISDN 交换机正常通信。在输出中，验证第1层状态是否为活跃状态，是否第2层状态=MULTIPLE_FRAME_ESTABLISHED出现。此指令也显示活动的呼叫的数量。

- show ip interface brief - 这将在备用模式下显示拨号程序 1（在 maui-soho-01 上）。将拨号1用作备份接口意味着物理接口(BRI0)并不专用于备份。因此，在主链路接通时，不能将 BRI 0 用于普通 DDR。

show 输出示例

下面的输出显示了客户端的路由表。下面的输出显示了主链路处于活动状态时的路由表。

maui-soho-01#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 192.168.10.1 to network 0.0.0.0

192.168.10.0/24 is variably subnetted, 2 subnets, 2 masks

C       192.168.10.0/30 is directly connected, Serial0

C       192.168.10.1/32 is directly connected, Serial0

172.17.0.0/24 is subnetted, 1 subnets

C       172.17.1.0 is directly connected, Loopback0

172.16.0.0/24 is subnetted, 1 subnets

C       172.16.1.0 is directly connected, Ethernet0

172.20.0.0/24 is subnetted, 1 subnets

O       172.20.10.0 [110/1849] via 192.168.10.1, 00:00:10, Serial0

172.22.0.0/16 is variably subnetted, 2 subnets, 2 masks

O       172.22.53.0/24 [110/74] via 192.168.10.1, 00:00:11, Serial0

O       172.22.1.1/32 [110/65] via 192.168.10.1, 00:00:11, Serial0

O*E2 0.0.0.0/0 [110/1] via 192.168.10.1, 00:00:11, Serial0

show ip route的输出(显示如上)显示使用主链路(serial0)从对等体获取的OSPF路由。 现在，让我们关闭主链路并激活备份链路。

备份链路被激活之后，OSPF表将被交换，使用备份链路的新路由将被安装。此时，流量将流过备份链路。

maui-soho-01#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 172.20.10.1 to network 0.0.0.0

172.17.0.0/24 is subnetted, 1 subnets

C       172.17.1.0 is directly connected, Loopback0

172.16.0.0/24 is subnetted, 1 subnets

C       172.16.1.0 is directly connected, Ethernet0

172.20.0.0/16 is variably subnetted, 2 subnets, 2 masks

C       172.20.10.0/24 is directly connected, Dialer1

C       172.20.10.1/32 is directly connected, Dialer1

172.22.0.0/16 is variably subnetted, 2 subnets, 2 masks

O       172.22.53.0/24 [110/1572] via 172.20.10.1, 00:00:01, Dialer1

O       172.22.1.1/32 [110/1563] via 172.20.10.1, 00:00:02, Dialer1

O*E2 0.0.0.0/0 [110/1] via 172.20.10.1, 00:00:02, Dialer1

故障排除

本部分提供的信息可用于对配置进行故障排除。

调试命令

在发出 debug 命令之前，请参阅有关 Debug 命令的重要信息。

- debug dialer -这用于显示关于在拨号程序接口上收到的信息包的 DDR 信息。

- debug isdn events - 用于查看发生在ISDN接口用户端上的ISDN活动。

- debug isdn q931 - 显示(第3层)路由器和ISDN交换机之间的ISDN网络连接的呼叫建立和拆卸。

- debug ppp negotiation - 在协商 PPP 组件（包括链路控制协议 (LCP)、认证和 NCP）时显示有关 PPP 流量和交换的信息。成功的PPP协商将首先开放LCP状态，然后进行验证，最后进行NCP协商。

- debug ppp authentication -显示PPP认证协议消息，包括质询验证协议(CHAP)信息包交换和密码认证协议(PAP)交换。如果您发现故障，则请验证是否正确配置了 CHAP 用户名和口令。

- debug ppp error - 用来显示与PPP连接协商和操作相关的协议错误和错误统计数据。

排除 DDR 备份故障

在您配置备份接口和备份延迟命令之前，配置和检验DDR连接(拨号程序1和BRI0)适当运行。这允许您在配置备份之前，验证拨号程序配置文件、ISDN、PPP和鉴权是否正常运行。若要对 DDR 链路进行故障排除，请参阅拨号技术：故障排除技术。

即然您已经验证了DDR连接正在适当运行，您便可以执行以下所述的备用故障排除步骤：

- 关闭主链路。请勿对配置了 backup interface 命令的路由器使用 shutdown 命令。这不会使 Cisco IOS 软件对备份链路进行拨号。通过关闭不带有backup interface命令的路由器上的主要接口，您可以激活备份。在这种方案中，在 maui-soho-01 (1600) 上配置了 backup interface 命令。 因此，对 maui-nas-05 (3640) 的主接口执行 shutdown 命令会激活备份链路。并且，您可以通过拔去电缆或使用等效方法从物理上切断主要连接，从而打开备份接口。

- 您应该看到一条控制台消息，指明备份接口（接口拨号程序 1）已接通。只有在 backup delay 命令所指定的时间间隔过后，才会出现此消息。在此配置中，备份激活延迟为 10 秒。如果未看到此控制台消息，请检查 backup delay 计时器。

*Mar  1 03:37:31.788: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0, changed state to down

*Mar  1 03:37:42.719: %LINK-3-UPDOWN: Interface Dialer1, changed state to up

- 使用 show ip route 命令来查看主链路关闭时的路由表。您应该观察到拨号程序 1 的直接连接路由。对远程路由器的拨号程序接口（与接口拨号程序 1 位于同一子网中）的 IP 地址执行 ping 操作。 您应看到链路拨号和连接。

- 如果链路未拨号，请验证相关流量定义是否允许 ICMP (ping)。

- 如果链路启用，我们可以推断问题发生是由于没有指定到该子网的数据流。然而，依据到特定主机的ping，强制执行到拨号的备份链路并不现实。若要避免出现此问题，可以为默认流量配置浮动静态路由。

maui-soho-01(config)#ip route 0.0.0.0 0.0.0.0 172.20.10.1 200

上述默认路由具有远程路由器拨号器接口的下一跳地址和管理距离200。如果不存在更好的默认路由（即具有较低的管理距离），则此浮动路由允许路由器将数据包路由到拨号器接口。记住我们以前验证路由到拨号程序接口的信息包导致链路拨号。

- 如果路由器拨打链路，但不能接通，便不再是DDR备份问题，您应该考虑拨号技术：故障排除技术以获取进一步的帮助。

欲知故障排除的更多信息，参见“配置和故障排除DDR备份”文件中的“排除备份接口故障”部分。

调试输出示例

以下debug输出(从客户端)显示主链路发生故障，备份链路激活：

注：为了打印目的，某些调试输出行被分成多行。

maui-soho-01#show debug

maui-soho-01#debug dialer

Dial on demand events debugging is on

maui-soho-01#debug isdn q931

ISDN Q931 packets debugging is on

maui-soho-01#debug ppp negotiation

PPP protocol negotiation debugging is on

maui-soho-01#debug ppp authentication

PPP authentication debugging is on

maui-soho-01#

*Mar  1 01:09:24.872: %LINK-3-UPDOWN: Interface Serial0, changed state to down

!--- Primary link is unplugged. !--- Refer to the section Testing the Backup Link for the appropriate procedure.

*Mar  1 01:09:24.880: Se0 IPCP: State is Closed

*Mar  1 01:09:24.884: Se0 CDPCP: State is Closed

*Mar  1 01:09:24.888: Se0 PPP: Phase is TERMINATING [0 sess, 0 load]

*Mar  1 01:09:24.892: Se0 LCP: State is Closed

*Mar  1 01:09:24.892: Se0 PPP: Phase is DOWN [0 sess, 0 load]

*Mar  1 01:09:24.908: Se0 IPCP: Remove route to 192.168.10.1

*Mar  1 01:09:24.916: %OSPF-5-ADJCHG: Process 5, Nbr 172.22.1.1 on Serial0

from FULL to DOWN, Neighbor Down: Interface down or detached

*Mar  1 01:09:25.864: %LINEPROTO-5-UPDOWN: Line protocol on Interface Serial0,

changed state to down

!--- Primary interface line protocol is down. This must happen before the backup !--- interface is brought out of standby.

*Mar  1 01:09:34.824: Di1 DDR is shutdown, could not clear interface.

*Mar  1 01:09:34.840: BR0 DDR: rotor dialout [priority]

!--- Note: The backup interface was activated 10 seconds after the primary !--- link went down. This interval was defined with the backup delay command !--- in maui-soho-01 (1600).

*Mar  1 01:09:34.848: BR0 DDR: Dialing cause ip (s=172.20.10.2, d=224.0.0.5)

!--- OSPF hellos cause the router to dial.

*Mar  1 01:09:34.852: BR0 DDR: Attempting to dial 5552222

!--- Phone number of the remote router that is dialed.

*Mar  1 01:09:34.876: ISDN BR0: TX ->  SETUP pd = 8  callref = 0x0A

*Mar  1 01:09:34.888:         Bearer Capability i = 0x8890

*Mar  1 01:09:34.895:         Channel ID i = 0x83

*Mar  1 01:09:34.903:         Keypad Facility i = '5552222'

*Mar  1 01:09:35.169: ISDN BR0: RX <-  CALL_PROC pd = 8  callref = 0x8A

*Mar  1 01:09:35.177:         Channel ID i = 0x89

*Mar  1 01:09:35.415: ISDN BR0: RX <-  CONNECT pd = 8  callref = 0x8A

!--- Call is connected.

*Mar  1 01:09:35.439: %LINK-3-UPDOWN: Interface BRI0:1, changed state to up

*Mar  1 01:09:35.447: %DIALER-6-BIND: Interface BR0:1 bound to profile Di1

*Mar  1 01:09:35.463: BR0:1 PPP: Treating connection as a callout

!--- PPP negotiation begins.

*Mar  1 01:09:35.467: BR0:1 PPP: Phase is ESTABLISHING, Active Open

[0 sess, 0 load]

*Mar  1 01:09:35.479: BR0:1 LCP: O CONFREQ [Closed] id 14 len 34

*Mar  1 01:09:35.483: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 01:09:35.487: BR0:1 LCP:    MagicNumber 0x10BC0680 (0x050610BC0680)

*Mar  1 01:09:35.491: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 01:09:35.495: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 01:09:35.511: ISDN BR0: TX ->  CONNECT_ACK pd = 8  callref = 0x0A

*Mar  1 01:09:35.566: BR0:1 LCP: I CONFREQ [REQsent] id 6 Len 33

*Mar  1 01:09:35.570: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 01:09:35.574: BR0:1 LCP:    MagicNumber 0x30D37ABB (0x050630D37ABB)

*Mar  1 01:09:35.578: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 01:09:35.582: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 01:09:35.590: BR0:1 LCP: O CONFACK [REQsent] id 6 Len 33

*Mar  1 01:09:35.598: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 01:09:35.602: BR0:1 LCP:    MagicNumber 0x30D37ABB (0x050630D37ABB)

*Mar  1 01:09:35.606: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 01:09:35.610: BR0:1 LCP:    EndpointDisc 1 Local

(0x130E016D6175692D6E61732D3035)

*Mar  1 01:09:35.618: BR0:1 LCP: I CONFACK [ACKsent] id 14 Len 34

*Mar  1 01:09:35.622: BR0:1 LCP:    AuthProto CHAP (0x0305C22305)

*Mar  1 01:09:35.626: BR0:1 LCP:    MagicNumber 0x10BC0680 (0x050610BC0680)

*Mar  1 01:09:35.630: BR0:1 LCP:    MRRU 1524 (0x110405F4)

*Mar  1 01:09:35.637: BR0:1 LCP:    EndpointDisc 1 Local

(0x130F016D6175692D736F686F2D3031)

*Mar  1 01:09:35.641: BR0:1 LCP: State is Open

*Mar  1 01:09:35.645: BR0:1 PPP: Phase is AUTHENTICATING, by both

[0 sess, 1 load]

!--- PPP authentication begins.

*Mar  1 01:09:35.649: BR0:1 CHAP: O CHALLENGE id 6 Len 33 from "maui-soho-01"

!--- This is the username used for outgoing CHAP challenge. The remote router !--- must have this username configured along with shared secret.

*Mar  1 01:09:35.657: BR0:1 CHAP: I CHALLENGE id 6 Len 32 from "maui-nas-05"

!--- This is the username for incoming CHAP challenge. !--- This username must be locally configured.

*Mar  1 01:09:35.760: BR0:1 CHAP: O RESPONSE id 6 Len 33 from "maui-soho-01"

*Mar  1 01:09:35.804: BR0:1 CHAP: I SUCCESS id 6 Len 4

*Mar  1 01:09:35.808: BR0:1 CHAP: I RESPONSE id 6 Len 32 from "maui-nas-05"

*Mar  1 01:09:35.820: BR0:1 CHAP: O SUCCESS id 6 Len 4

!--- CHAP authentication is successful.

*Mar  1 01:09:35.828: BR0:1 PPP: Phase is VIRTUALIZED [0 sess, 1 load]

*Mar  1 01:09:35.844: Di1 DDR: Authenticated host maui-nas-05 with no matching

dialer map

*Mar  1 01:09:35.848: Di1 PPP: Phase is UP [0 sess, 1 load]

*Mar  1 01:09:35.856: Di1 IPCP: O CONFREQ [Closed] id 6 Len 10

*Mar  1 01:09:35.860: Di1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 01:09:35.872: Di1 CDPCP: O CONFREQ [Closed] id 6 Len 4

*Mar  1 01:09:35.876: BR0:1 MLP: maui-nas-05, multilink up, first link

*Mar  1 01:09:35.884: BR0:1 IPCP: MLP bundle interface is built,

process packets now

*Mar  1 01:09:35.887: BR0:1 IPCP: Redirect packet to Di1

*Mar  1 01:09:35.891: Di1 IPCP: I CONFREQ [REQsent] id 6 Len 10

*Mar  1 01:09:35.895: Di1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 01:09:35.903: Di1 IPCP: O CONFACK [REQsent] id 6 Len 10

*Mar  1 01:09:35.907: Di1 IPCP:    Address 172.20.10.1 (0x0306AC140A01)

*Mar  1 01:09:35.911: BR0:1 CDPCP: MLP bundle interface is built,

process packets now

*Mar  1 01:09:35.915: BR0:1 CDPCP: Redirect packet to Di1

*Mar  1 01:09:35.919: Di1 CDPCP: I CONFREQ [REQsent] id 6 Len 4

*Mar  1 01:09:35.927: Di1 CDPCP: O CONFACK [REQsent] id 6 Len 4

*Mar  1 01:09:35.931: Di1 IPCP: I CONFACK [ACKsent] id 6 Len 10

*Mar  1 01:09:35.935: Di1 IPCP:    Address 172.20.10.2 (0x0306AC140A02)

*Mar  1 01:09:35.939: Di1 IPCP: State is Open

!--- IPCP state is open and route will be installed.

*Mar  1 01:09:35.951: Di1 CDPCP: I CONFACK [ACKsent] id 6 Len 4

*Mar  1 01:09:35.955: Di1 CDPCP: State is Open

*Mar  1 01:09:35.959: Di1 DDR: dialer protocol up

*Mar  1 01:09:35.971: Di1 IPCP: Install route to 172.20.10.1

!--- Route to remote side is installed.

*Mar  1 01:09:36.840: %LINK-3-UPDOWN: Interface Dialer1, changed state to up

*Mar  1 01:09:36.844: Di1 LCP: Not allowed on a Dialer Profile

*Mar  1 01:09:36.848: %LINEPROTO-5-UPDOWN: Line protocol on Interface BRI0:1,

changed state to up

*Mar  1 01:09:41.411: %ISDN-6-CONNECT: Interface BRI0:1 is now connected to 5552222

maui-nas-05

!--- Connection is up.

*Mar  1 01:09:44.931: %OSPF-5-ADJCHG: Process 5, Nbr 172.22.1.1 on

Dialer1 from LOADING to FULL, Loading Done

!--- OSPF database exchange is complete.

相关信息

- 接入技术支持页面

- 工具 和 实用程序－思科系统

- 使用 show isdn status 命令用于 BRI 故障排除

- 使用 BRI 和 Backup Interface 命令实现 DDR 备份

- Backup Interface、浮动静态路由和拨号程序监视DDR备份。

- DDR 备份的配置与故障排除

- 技术支持和文档 - Cisco Systems