Contents

Introduction

Prerequisites

Requirements

Components Used

安装

Introduction

本文描述CVVB的instalation步骤。

贡献用Kabeer Noorudeen， Cisco TAC工程师。

Prerequisites

Requirements

There are no specific requirements for this document.

Components Used

本文的信息根据CVVB 11.0主机的环境。

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

安装

这些是安装CVVB的步骤：

步骤1.从CVVB的可启动的CD引导。 选择产品安装。

步骤2. CVVB的安装的确认。

步骤3.选择为平台安装向导进行。

步骤4.选择补丁程序安装的正确的选项，在本例中您没有补丁程序安装的。

步骤5.点击Continue继续安装。

步骤6.选择安装的时间区域。

步骤7.继续自动协商配置的安装。

步骤8.保持默认MTU大小。

步骤9.输入服务器详细资料。

步骤10.输入服务器的DNS详细资料。

步骤11.输入用户凭证。

步骤12。 输入组织详细资料。

第13步。 选择它作为第一个节点。

步骤14。 捕获正确的NTP地址。

第15步。 提供将使用集群的安全密码。

第16步。 如果不需要SMTP主机，请选择没有。

第17步。 输入应用程序用户凭证。

第18步。 完成安装步骤。

第19步。 一旦安装完成，请打开CVVB APP Admin页https:// <CVVB>/appadmin

第20步。 访问必须配置的许可证。一旦许可证成功部署，您看到验证全部的消息。

第21步。 组件在CVVB获得激活。

第22步。 选择用于解决方案的适当的编码。

第23步。 根据解决方案定义语言配置。

第24步。 一旦配置成功地完成， CVVB重新启动。

第25步。 CVVB为配置是可用的。