目录

简介

开始使用前

规则

先决条件

使用的组件

配置

网络图

配置

确认

相关信息

简介

一般来说，网桥在开放式系统互联(OSI)参考模型的数据链路层（第2层）运行。网桥将根据该帧的介质访问控制(MAC)地址过滤、转发或泛洪传入帧。

桥接是电缆调制解调器在线时获得的默认配置。

在桥接应用中，当运行Cisco IOS®软件版本12.0.5T1及更高版本时，Cisco uBR900系列电缆接入路由器充当以太网端口上最多254台设备的透明网桥。早期版本的Cisco IOS软件在Cisco uBR900系列路由器的以太网端口上最多支持三台设备。

此配置已使用运行Cisco IOS软件版本12.0(7)T的uBR904和运行Cisco IOS软件版本12.1(2)T的Cisco uBR7223进行测试。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- 运行思科IOS软件版本12.0(7)T的uBR904

- 运行Cisco IOS软件版本12.1(2)T的Cisco uBR7223

配置

网络图

配置

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

uBR900

Current configuration:

!

! No configuration change since last restart

!version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Router

!

!

!

!

!

!

clock timezone - 0

ip subnet-zero

no ip routing

!--- Router is operating in bridging mode.

!

!

!

!

!

interface Ethernet0

ip address 10.1.1.26 255.255.255.0

no ip directed-broadcast

no ip route-cache

bridge-group 59

bridge-group 59 spanning-disabled

!

interface cable-modem0

ip address negotiated

no ip directed-broadcast

no ip route-cache

cable-modem downstream saved channel 453000000 28 1

cable-modem mac-timer t2 60000

bridge-group 59

bridge-group 59 spanning-disabled

!

ip default-gateway 10.1.1.10

ip classless

no ip http server

!

!

line con 0

transport input none

line vty 0 4

!

end

Router#

注意：上述配置是在接通电缆调制解调器电源并达到在线状态后获得的。自出厂默认设置以来，没有配置更改。另请注意，在较旧的Cisco IOS版本中，电缆接口将显示实际IP地址，而不是“协商的IP地址”。

uBR7200

Current configuration:

!

! Last configuration change at 16:55:41 UTC Mon Nov 20 2000

! NVRAM config last updated at 16:55:12 UTC Mon Nov 20 2000

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname sniper

!

boot system flash ubr7200-ik1s-mz_121-2_T.bin

no logging buffered

enable password cisco

!

no cable qos permission create

no cable qos permission update

cable qos permission modems

!

!

!

ip subnet-zero

no ip domain-lookup

!

no lane client flush

!

!

!

!

interface FastEthernet0/0

no ip address

shutdown

half-duplex

!

interface Ethernet1/0

ip address 172.17.110.139 255.255.255.224

!

interface Ethernet1/1

no ip address

shutdown

!

interface Ethernet1/2

no ip address

shutdown

!

interface Ethernet1/3

no ip address

shutdown

!

interface Ethernet1/4

no ip address

shutdown

!

interface Ethernet1/5

no ip address

shutdown

!

interface Ethernet1/6

no ip address

shutdown

!

interface Ethernet1/7

no ip address

shutdown

!

interface Cable2/0

ip address 10.10.1.1 255.255.255.0 secondary

ip address 10.1.1.10 255.255.255.0

no keepalive

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 451250000

cable upstream 0 frequency 28000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 172.17.110.136

!

interface Cable3/0

no ip address

no keepalive

shutdown

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.17.110.129

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

line vty 0

exec-timeout 0 0

password cisco

login

line vty 1 4

password cisco

login

!

end

确认

注意：某些show命令受Output Interpreter Tool（仅注册客户）支持（仅限注册客户），它允许您查看对show命令输出的分析。

为确保一切正常，请在Cisco uBR7200上输入show cable modem命令。这将列出连接到此Cisco uBR7200的电缆调制解调器的状态。下面是从上面的uBR7200路由器获取的输出显示：

sniper#sh cable modem

Interface   Prim Online     Timing Rec    QoS CPE IP address      MAC address

Sid  State      Offset Power

Cable2/0/U0 11   online     2287    0.25  5   0   10.1.1.25       0050.7366.2223

Cable2/0/U0 12   online     2812    0.25  5   0   10.1.1.28       0001.9659.4415

Cable2/0/U0 13   online     2810   -0.50  5   0   10.1.1.20       0030.96f9.65d9

Cable2/0/U0 14   online     2290    0.50  5   0   10.1.1.26       0050.7366.2221

Cable2/0/U0 15   online     2292    0.25  5   0   10.1.1.30       0050.7366.1fb9

Cable2/0/U0 16   online     2815    0.00  5   0   10.1.1.27       0001.9659.4461

如果状态不显示“在线”，则需要对此进行故障排除。在Cisco uBR900中，可以输入debug cable-modem mac log verbose。有关故障排除的详细信息，请参阅排除uBR电缆调制解调器未联机故障。

相关信息

- 电缆支持页

- Cisco UBR904电缆调制解调器的桥接和路由功能

- 故障排除 UBR 电缆调制解调器不上线的问题

- 技术支持 - Cisco Systems