目录

简介

先决条件

要求

使用的组件

规则

简要理论总结

ITCM 向 CMTS 注册会什么发生事情？

当您想要进行语音呼叫时会发生什么事情？

配置:要遵循的不同步骤

CMTS 中的配置文件

电缆调制解调器中的配置文件

排除故障和提示

相关信息

简介

本文档介绍如何配置和排除Cisco uBR7200通用宽带路由器上的服务质量(QoS)增强功能，以支持语音和传真流量。要实施此功能，您需要Cisco IOS®软件版本12.0.7XR2，或分支机构12.1.1T、12.1(1a)T1或更高版本。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- 有线电缆数据服务接口规范 (DOCSIS)

- Cisco IOS 软件

- IP 语音 (VoIP)

使用的组件

本文档中的信息基于以下软件和硬件版本：

- Cisco IOS软件版本12.0.7XR2，或分支机构12.1.1T、12.1(1a)T1或更高版本。

- Cisco uBR7200

- 符合DOCSIS的集成电话电缆调制解调器(ITCM)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

简要理论总结

DOCSIS 1.0+实施是DOCSIS 1.0，带QoS扩展，支持LAN上的实时语音、传真和视频。

DOCSIS 1.0+不是电缆实验室的新规范或中间规范。整个DOCSIS 1.0+架构是思科和某些电缆调制解调器(CM)供应商提供的上市时间解决方案，直到DOCSIS 1.1规范和开发广泛提供。

DOCSIS 1.0+为来自ITCM的实时语音、传真和数据包提供额外的QoS功能。以下是DOCSIS 1.0+中添加到DOCSIS 1.0的专用扩展：

- 两条新的CM启动的动态MAC消息：动态服务添加(DSA)和动态服务删除(DSD)。 这些消息允许在运行时按呼叫创建和删除动态服务ID(SID)。

- 上游上的未经请求的授权服务（恒定比特率[CBR]-scheduling）。此服务为来自ITCM的上游CBR语音和传真数据包提供高质量QoS信道。

对于任何给定的ITCM，提供单独下行速率的能力取决于数据包中的IP优先级值。这有助于分离流向同一ITCM的语音、信令和数据流量，以便进行速率整形。

ITCM 向 CMTS 注册会什么发生事情？

当电缆调制解调器终端系统(CMTS)收到注册请求时，它会为ITCM创建本地数据库条目。静态SID会立即分配给数据服务的ITCM。对于电话线路服务，CMTS在ITCM的数据库条目中创建一些延迟的服务流（用于后续激活）。注册期间，没有为电话线路服务分配SID。

注意：CMTS在注册时为ITCM创建的延迟流数取决于为电缆调制解调器调配的“电话线路数”参数的值。值可以是从0开始的任意数字(例如：0、1、2、3等)。

当您想要进行语音呼叫时会发生什么事情？

1. ITCM获取新的语音或传真呼叫，并使用从更高层语音呼叫信令协议接收的编解码器类型G.711或G.729确定该呼叫的QoS参数。

2. ITCM向uBR发送DSA请求(DSA-REQ)，请求新的动态SID。

3. CMTS访问ITCM的数据库信息（使用DSA-REQ消息中的MAC地址），并检查此ITCM是否有任何非活动或未允许（延迟）的服务流。如果ITCM有未使用的延迟流，并且上游(US)信道（ITCM连接到的）具有足够的容量，可以按照DSA-REQ中的请求允许新的定期CBR插槽，则CMTS会创建新的动态SID。

4. CMTS使用DSA响应(DSA-RSP)响应ITCM请求。

5. ITCM确认DSA-RSP。（CMTS每次发送DSA响应时，都希望ITCM发出DSA确认[DSA-ACK]。）

6. 当语音或传真呼叫被清除时，ITCM会向CMTS发送DSD-REQ MAC消息，指定要删除的动态SID。

7. CMTS删除动态SID并向ITCM发送DSD-RSP。有关DOCSIS 1.0+的详细说明，请参阅DOCSIS 1.0+的常见问题。

配置:要遵循的不同步骤

本文档中的示例配置使用以下网络设置：

Cisco IOS软件版本12.1(1a)T1在电缆调制解调器和Cisco uBR7246上运行。

CMTS 中的配置文件

QoS配置文件

在CMTS上，动态配置两个特殊（语音和传真相关）QoS配置文件，并可在任何给定时间供CMTS QoS代码使用。这些QoS配置文件（G711和G729）配置了用于G.711或G.729类型编码解码器（编解码器）的特殊调度参数。 CMTS可以从请求此特殊调度处理的DSA-REQ消息的内容获取特定参数（如grant-size和grant-interval）。您必须在CMTS上为每个唯一的编解码器参数组合配置QoS配置文件模板。

注意：在电缆调制解调器的配置文件中配置电话线路后，即会动态创建编解码器G.711和G.729的QoS配置文件。它们收到默认授予间隔20毫秒，授予大小31.22 kbps（对于G.729）和87.2 kbps（对于G.711）。

以下是在电缆调制解调器的配置文件中配置了至少一条电话线时show cable qos profile命令的输出：

# show cable qos profile

ID  Prio Max       Guar      Max        Max      TOS  TOS   Created Privacy IP prec.

upstream  upstream  downstream transmit mask value by      B       rate

bandwidth bandwidth bandwidth  burst                       enabled enabled

3   7    31200     31200     0          0        0x0  0x0   cmts    yes     no

4   7    87200     87200     0          0        0x0  0x0   cmts    yes     no

如果ITCM供应商使用与本示例中使用的版本不同的G.711或G.729编解码器版本，则必须在CMTS上为每个唯一编解码器参数组合（未经请求的授权大小和授权间隔）静态配置QoS配置文件模板。

下表显示如何计算未经请求的授权大小和授权间隔（对于编解码器G.711和G.729）：

G.711编解码器的QoS配置文件

以下是G.711 QoS配置文件的相应数字：

未经请求的授权大小

229 bytes

未经请求的授权间隔

20 毫秒

保留/峰值速率

87.2 kbps

G.729编解码器的QoS配置文件

以下是计算DOCSIS电缆MAC帧总大小的方法：

每间隔G.729编解码器输出

20 bytes

路由表协议(RTP)报头

12 bytes

用户数据报协议(UDP)报头

8 个字节

IP 报头

20 bytes

以太网帧报头和循环冗余校验(CRC)

18 bytes

DOCSIS电缆MAC报头

11字节（假设5字节隐私扩展报头是强制的）

DOCSIS电缆MAC帧总大小

89 bytes

授予间隔20毫秒直接从G.729编解码器的成帧或分组延迟开始。上游预留速率只考虑每个G.729编解码器输出的以太网级带宽使用情况而得。这相当于每20毫秒使用78字节的以太网帧，等于31.2 kbps。

在“故障排除和提示”部分中，提供了一个示例，用于显示如果为使用的编解码器正确指定了grant-size或grant-interval，则在debug输出中会发生什么情况。

您可以使用show cable qos profile x verbose命令检查调制配置文件。

调制配置文件

您可以更改调制配置文件，以最大化每个上游信道可以接收的语音呼叫数。这是可使用的调制配置文件：

cable modulation-profile 5

!--- This configuration line is entered on one line:

cable modulation-profile 5 short 2 52 35 8

qpsk scrambler 152 diff 72 shortened uw8

interface Cable3/0

cable upstream 5 minislot-size 4

cable upstream 5 modulation-profile 5

CMTS配置

cable modulation-profile 5 request 0 16 1 8 qpsk scrambler 152 no-diff 64 fixed uw16

cable modulation-profile 5 initial 5 34 0 48 qpsk scrambler 152 no-diff 128 fixed uw16

cable modulation-profile 5 station 5 34 0 48 qpsk scrambler 152 no-diff 128 fixed uw16

cable modulation-profile 5 short 6 75 6 8 16qam scrambler 152 no-diff 144 fixed uw8

cable modulation-profile 5 long 8 220 0 8 16qam scrambler 152 no-diff 160 fixed uw8

cable qos profile 5 ip-precedence 5 max-downstream 128

no cable qos permission update

!--- This command was created automatically during CM registration; !--- no cable qos permission creates 2 phone lines with IP precedence 5 and !--- with 128K for max downstream, as specified in CM configuration file.

cable qos permission modems

cable time-server

!

interface Ethernet2/0

ip address 10.200.68.3 255.255.255.0

!

interface Cable3/0

ip address 10.200.70.17 255.255.255.240

secondary ip address 10.200.69.1 255.255.255.240

no keepalive

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 frequency 30000000

cable upstream 5 power-level 0

cable upstream 5 minislot-size 4

cable upstream 5 modulation-profile 5

no cable upstream 5 shutdown

cable dhcp-giaddr policy

cable helper-address 10.200.68.11

!

ip classless

电缆调制解调器中的配置文件

DOCSIS电缆调制解调器配置文件

使用DOCSIS客户端设备(CPE)配置器为电缆调制解调器准备配置文件。指定所需的电话线路数。对于Cisco uBR924电缆调制解调器，此值可以是0、1或2，其中0表示无语音端口的仅数据，1和2表示电话数。指定用于将语音和信令与数据分离的IP优先级设置和速率限制。

在本例中，语音传输优先级值(4)设置为128 kbps的下行速率限制：

Value = 4; Rate Limit (kps) = 128000

使用静态配置时在电缆调制解调器中配置拨号对等体

配置拨号对等体并指定要用于语音和传真流量的IP优先级。

电缆调制解调器1的配置

voice-port 0

input gain -2

cptone xx

!

voice-port 1

input gain -2

cptone xx

!

!

dial-peer voice 1 pots

destination-pattern 444

port 0

!

dial-peer voice 2 voip

destination-pattern 555

session-target ipv4:10.200.69.3

!--- IP address of CM2’s cable interface.

ip precedence 5

电缆调制解调器2的配置

voice-port 0

input gain -2

cptone xx

!

voice-port 1

input gain -2

cptone xx

!

!

dial-peer voice 1 pots

destination-pattern 555

port 0

!

dial-peer voice 2 voip

destination-pattern 444

session target ipv4:10.200.69.10

!--- IP address of CM1’s cable interface.

ip precedence 5

排除故障和提示

本部分提供了有用的debug和show命令，用于排除配置故障。

注意：在发出debug命令之前，请参阅有关Debug命令的重要信息。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

以下是一些有用的debug命令：

- debug cable dynsrv — 在CMTS处调试所有动态MAC消息（如DSA-REQ、DSA-RSP、DSA-ACK、DSD-REQ、DSD-RSP）处理。

- debug cable scheduler unriquested-grants — 调试收到的未请求的grants上的平均延迟和最大延迟抖动。

- debug cable scheduler admission-control — 查看MAC scheduler尝试允许和取消允许CBR插槽的情况。

注意：新的debug命令只能按接口或SID启用。这使调试更易于管理。不要忘记启用调试电缆接口电缆x/y或调试电缆接口电缆x/y SID，以及您需要的每个调试。

以下是一些有用的show命令：

- show interfaces cable x/y SID

- show interfaces cable x/y upstream n

- show cable qos profile

- show cable qos profile z verbose

从CM1拨打CM2，并分析发生的情况：

big-cmts# debug cable dynsrv

CMTS dynsrv debugging is on

big-cmts# debug cable interface cable 3/0

!--- Each of these timestamped lines of output appear on one line:

*May 5 05:15:36.531: DSA-REQ-RECD: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSx-STATE-CREATED: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSA-REQ TLV Information:

*May 5 05:15:36.531: Type Subtype Subtype Length Value

*May 5 05:15:36.531: 24 10

*May 5 05:15:36.531: 19 2 89

*May 5 05:15:36.531: 20 4 20000

*May 5 05:15:36.531: 80 69

*May 5 05:15:36.531: DSA-REQ: Requested QoS Parameter Information:

*May 5 05:15:36.531: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 5 05:15:36.531: Requested QoS parameters match QoS Profile:3 (G729)

*May 5 05:15:36.531: DSA-REQ-SID-ASSIGNED: CM 0050.734e.b5b1 SID 11

*May 5 05:15:36.531: DSA-RSP-SEND: OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:36.531: DSA-RSP msg TLVs

*May 5 05:15:36.531: Type:Length:Value

*May 5 05:15:36.531: US QoS Encodings 24:8

*May 5 05:15:36.531: SID 3:2:11

*May 5 05:15:36.531: Service Flow Reference 1:2:0

*May 5 05:15:36.531: DSA-RSP hex dump:

*May 5 05:15:36.531: 0x0000: C2 00 00 26 00 00 00 50 73 4E B5 B1 00 10 0B AF

*May 5 05:15:36.531: 0x0010: BC 54 00 14 00 00 03 01 10 00 00 34 00 18 08 03

*May 5 05:15:36.531: 0x0020: 02 00 0B 01 02 00 00 00

*May 5 05:15:36.535: DSA-RSP-SENT: CM->0050.734e.b5b1 TranscId->52

*May 5 05:15:36.539: DSA-ACK-RECD:

OrgMac->0050.734e.b5b1 OrgId->52 ConfCode->0

*May 5 05:15:36.539: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.734e.b5b1 OrgId->52

*May 5 05:15:42.779: DSA-REQ-RECD: OrgMac->0050.7366.1bdb OrgId->51

*May 5 05:15:42.779: DSx-STATE-CREATED: OrgMac->0050.7366.1bdb OrgId->51

*May 5 05:15:42.779: DSA-REQ TLV Information:

*May 5 05:15:42.779: Type Subtype Subtype Length Value

*May 5 05:15:42.779: 24 10

*May 5 05:15:42.779: 19 2 89

*May 5 05:15:42.779: 20 4 20000

*May 5 05:15:42.779: 80 69

*May 5 05:15:42.779: DSA-REQ: Requested QoS Parameter Information:

*May 5 05:15:42.779: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 5 05:15:42.779: Requested QoS parameters match QoS Profile:3 (G729)

!--- If the configured Unsolicited Grant size or Unsolicited Grant interval !--- are not correct.

*May 5 05:15:42.779: DSA-REQ-SID-ASSIGNED: CM 0050.7366.1bdb SID 12

!--- You see “Requested QoS doesn't match any profile” here.

*May 5 05:15:42.779: DSA-RSP-SEND: OrgMac->0050.7366.1bdb OrgId->51

!--- TIP: check the configured QoS Profile with the !--- show qos profile x verbose command.

*May 5 05:15:42.779: DSA-RSP MSG TLVs

*May 5 05:15:42.779: Type:Length:Value

!--- Also, if you forgot to specify the number of phone lines you want !--- in CM config file.

*May 5 05:15:42.779: US QoS Encodings 24:8

!--- You see “QoS profile matched but DSA-REQ is rejected” here.

*May 5 05:15:42.779: SID 3:2:12

*May 5 05:15:42.779: Service Flow Reference 1:2:0

*May 5 05:15:42.779: DSA-RSP hex dump:

*May 5 05:15:42.779: 0x0000: C2 00 00 26 00 00 00 50 73 66 1B DB 00 10 0B AF

*May 5 05:15:42.779: 0x0010: BC 54 00 14 00 00 03 01 10 00 00 33 00 18 08 03

*May 5 05:15:42.779: 0x0020: 02 00 0C 01 02 00 00 00

*May 5 05:15:42.779: DSA-RSP-SENT: CM->0050.7366.1bdb TranscId->51

*May 5 05:15:42.787: DSA-ACK-RECD:

OrgMac->0050.7366.1bdb OrgId->51 ConfCode->0

*May 5 05:15:42.787: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.7366.1bdb OrgId->51

cmts# show interfaces cable 3/0 SID

SID  Prim  Type Online  Admin   QoS  Create    IP Address    MAC Address

SID      State     Status        Time

1          stat online  enable  5    04:26:35  10.200.69.3   0050.734e.b5b1

2          stat online  enable  5    04:26:47  10.200.69.10  0050.7366.1bdb

13   1     dyn          enable  3    05:22:20

14   2     dyn          enable  3    05:22:20

已为语音呼叫创建了两个动态SID。它们使用QoS ID 3，即G729配置文件。

cmts# show cable qos profile

ID  Prio Max       Guar      Max        Max      TOS  TOS   Created Privacy IP prec.

upstream  upstream  downstream transmit mask value by      B       rate

bandwidth bandwidth bandwidth  burst                       enabled enabled

1   0    0         0         0          0        0x0  0x0   cmts(r) no      no

2   0    64000     0         1000000    0        0x0  0x0   cmts(r) no      no

3*  7    32000     320000    0          0        0x0  0x0   cmts    yes     no

4** 7    87200     87200     0          0        0x0  0x0   cmts    yes     no

5   1    1000000   0         2000000    1600     0x0  0x0   cm      no      yes

!--- * Profile for the G.729 codec. !--- ** Profile for the G.711 codec.

对于下游流量，您仍使用主SID（数据配置文件）和相应的QoS配置文件。(IP优先级速率限制提供了语音和数据之间的区别形式。它对下游QoS配置文件5启用。)

在DOCSIS 1.0+中，IP优先级设置用于将语音和信令与数据分离。如果呼叫中某个终端位于有线网络之外，则“外部”网络有责任确保所有语音数据包在转发到CMTS之前都正确着色。如果呼叫中两个终端都在有线网络中，则发起流量的终端（客户）有责任在语音数据包发送到网络之前对其进行颜色设置。

注：您可以使用IP ToS overwrite命令（自早期的uBR7200版本起可用）在属于CBR配置文件的SID上接收的上游数据包中设置非默认服务类型(ToS)值。这样，运营商可以确保在动态CBR SID上接收的数据包在通过uBR7200转发到WAN链路之前具有正确的模式（这可防止ITCM执行任何错误着色）。

请考虑以下示例：

cmts(config)# cable qos profile 3 tos-overwrite 0xE0 0xA0

value : 0xA0

!--- First 3 bits of ToS field: 101, which is an IP precedence of 5.

mask : 0xE0

!--- Remember that IP precedence uses the first 3 bits of the ToS field !--- from the IPv4 header.

big-cmts# show interfaces cable 3/0 upstream 5

Cable3/0: Upstream 5 is up

Received 254 broadcasts, 0 multicasts, 20229 unicasts

0 discards, 66907 errors, 0 unknown protocol

20483 packets input, 1 uncorrectable

101 noise, 0 microreflections

Total Modems On This Upstream Channel : 2 (2 active)

Default MAC scheduler

Queue[Rng Polls] 0/20, fifo queueing, 0 drops

Queue[Cont Mslots] 0/104, FIFO queueing, 1 drop

Queue[CIR Grants] 0/20, fair queueing, 0 drops

Queue[BE Grants] 0/30, fair queueing, 0 drops

Queue[Grant Shpr] 0/30, calendar queueing, 0 drops

Reserved slot table currently has 2 CBR entries

Req IEs 3645087, Req/Data IEs 0

Init Mtn IEs 56729, Stn Mtn IEs 3196

Long Grant IEs 80084, Short Grant IEs 202

Avg upstream channel utilization : 4%

Avg percent contention slots : 92%

Avg percent initial ranging slots : 4%

Avg percent minislots lost on late MAPs : 0%

Total channel bw reserved 64000 bps

CIR admission control not enforced

Current minislot count : 3101850 Flag: 0

Scheduled minislot count : 3102029 Flag: 0

cmts# debug cable scheduler

CMTS scheduler debugging is on

big-cmts# show debug

*May 5 05:24:41.991: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:24:51.995: SID:14 max-jitter:2 msecs, avg-jitter:1 msecs

*May 5 05:25:02.015: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:12.035: SID:13 max-jitter:2 msecs, avg-jitter:1 msecs

*May 5 05:25:22.055: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:32.075: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:42.091: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

*May 5 05:25:52.095: SID:13 max-jitter:2 msecs, avg-jitter:0 msecs

cmts# show cable qos profile 3 verbose

Profile Index 3

Name G729

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 32000

Upstream Guaranteed Rate (BPS) 32000

Unsolicited Grant Size (bytes) 89

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

big-cmts# show cable qos profile 4 verbose

Profile Index 4

Name G711

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 87200

Upstream Guaranteed Rate (BPS) 87200

Unsolicited Grant Size (bytes) 229

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

Line is released:

The phone line is released: a user hangs up.

big-cmts# show debug

CMTS:

CMTS dynsrv debugging is on

CMTS specific:

Debugging is on for Cable3/0

big-cmts# show debug

!--- Each of these timestamped lines of output appear on one line:

*May 5 05:29:45.659: DSD-REQ-RECD: I/F Cable3/0/U5: OrgMac->0050.734e.b5b1

*May 5 05:29:45.659: OrgId->54 sfid 13

*May 5 05:29:45.659: DYN-SID-DELETED:

SID:13 Inpkts:5047 InOctets:393749 Bwreqs:12 Grants:22270

*May 5 05:29:45.659: DSD-RSP Message Hex Dump:

*May 5 05:29:45.659: 0x0000: C2 00 00 20 00 00 00 50 73 4E B5 B1 00 10 0B AF

*May 5 05:29:45.659: 0x0010: BC 54 00 0E 00 00 03 01 16 00 00 36 00 00 00 00

*May 5 05:29:45.659: 0x0020: 00 0D

*May 5 05:29:45.659: DSD-RSP-SENT: To CM->0050.734e.b5b1 TranscId->54

*May 5 05:29:48.023: DSD-REQ-RECD: I/F Cable3/0/U5: OrgMac->0050.7366.1bdb

*May 5 05:29:48.023: OrgId->53 sfid 14

*May 5 05:29:48.023: DYN-SID-DELETED:

SID:14 Inpkts:6512 InOctets:508085 Bwreqs:2 Grants:22378

!--- The dynamic SIDs are deleted.

*May 5 05:29:48.023: DSD-RSP Message Hex Dump:

*May 5 05:29:48.023: 0x0000: C2 00 00 20 00 00 00 50 73 66 1B dB 00 10 0B AF

*May 5 05:29:48.023: 0x0010: BC 54 00 0E 00 00 03 01 16 00 00 35 00 00 00 00

*May 5 05:29:48.023: 0x0020: 00 0E

*May 5 05:29:48.023: DSD-RSP-SENT: To CM->0050.7366.1bdb TranscId->53

下一输出显示了如果其中一个参数（要使用的编解码器的grant-size或grant-interval）配置错误时会发生什么情况。在本例中，我们将配置文件G729的授权大小从89更改为80:

cmts(config)# cable qos profile 3 grant-size 80

cmts# show cable qos profile 3 verbose

Profile Index 3

Name G729

Upstream Traffic Priority 7

Upstream Maximum Rate (BPS) 31200

Upstream Guaranteed Rate (BPS) 31200

Unsolicited Grant Size (bytes) 80

Unsolicited Grant Interval (usecs) 20000

Upstream Maximum Transmit Burst (bytes) 0

IP Type of Service Overwrite Mask 0x0

IP Type of Service Overwrite Value 0x0

Downstream Maximum Rate (BPS) 0

Created By cmts

Baseline Privacy Enabled yes

big-cmts# show debug

!--- Each of these timestamped lines of output appear on one line:

*May 10 04:20:57.885: DSA-REQ-RECD: OrgMac->0050.734e.b5b1 OrgId->59

*May 10 04:20:57.885: DSx-STATE-CREATED: OrgMac->0050.734e.b5b1 OrgId->59

*May 10 04:20:57.885: DSA-REQ TLV Information:

*May 10 04:20:57.885: Type Subtype Subtype Length Value

*May 10 04:20:57.885: 24 10

*May 10 04:20:57.885: 19 2 89

*May 10 04:20:57.885: 20 4 20000

*May 10 04:20:57.885: 80 69

*May 10 04:20:57.885: DSA-REQ: Requested QoS Parameter Information:

*May 10 04:20:57.885: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 10 04:20:57.885: DSA-REQ-REJECT OrgMac->0050.734e.b5b1 OrgId->59:

*May 10 04:20:57.885: No CMTS QoS profile matching requested parameters

!--- Request is rejected, because there is no QoS profile.

*May 10 04:20:57.885: DSA-RSP-SENT: CM->0050.734e.b5b1 TranscId->59

*May 10 04:20:57.889: DSA-ACK-RECD:

OrgMac->0050.734e.b5b1 OrgId->59 ConfCode->0

*May 10 04:20:57.889: DYN-SRV-STATE-DESTROYED :

OrgMac->0050.734e.b5b1 OrgId->59

!--- The state is destroyed.

*May 10 04:20:57.905: DSA-REQ-RECD: OrgMac->0050.7366.1bdb OrgId->58

*May 10 04:20:57.905: DSx-STATE-CREATED: OrgMac->0050.7366.1bdb OrgId->58

*May 10 04:20:57.905: DSA-REQ TLV Information:

*May 10 04:20:57.905: Type Subtype Subtype Length Value

*May 10 04:20:57.905: 24 10

*May 10 04:20:57.905: 19 2 89

*May 10 04:20:57.905: 20 4 20000

*May 10 04:20:57.905: 80 69

*May 10 04:20:57.905: DSA-REQ: Requested QoS Parameter Information:

*May 10 04:20:57.905: Srv Flow Ref: 0 Grant Size: 89 Grant Intvl: 20000

*May 10 04:20:57.905: DSA-REQ-REJECT OrgMac->0050.7366.1bdb OrgId->58:

*May 10 04:20:57.905: No CMTS QoS profile matching requested parameters

*May 10 04:20:57.909: DSA-RSP-SENT: CM->0050.7366.1bdb TranscId->58

*May 10 04:20:57.913: DSA-ACK-RECD:

OrgMac->0050.7366.1bdb OrgId->58 ConfCode->0

*May 10 04:20:57.913: DYN-SRV-STATE-DESTROYED : OrgMac->0050.7366.1bdb Org

big-cmts# show interfaces cable 3/0 upstream 5

Cable3/0: Upstream 5 is up

!--- Output suppressed.

Reserved slot table currently has 0 CBR entries

!--- Output suppressed.

相关信息

- DOCSIS 1.0+ 的常见问题

- 技术支持 - Cisco Systems