目录

简介

Cisco uBR7200 系列电缆接口的基本配置示例是什么样的？

Cisco uBR7100 系列电缆接口的基本配置示例是什么样的？

如何将CMTS配置为一体运行时间(ToD)、简单文件传输协议(TFTP)和动态主机配置协议(DHCP)?

能否将Cisco CMTS配置为网桥？

Cisco CMTS 是否支持 PPPoE？

如何在DOCSIS 1.0中配置基线隐私？

如何在Cisco CMTS上配置捆绑？

相关信息

简介

本文档回答了有关电缆调制解调器端接系统(CMTS)的一些常见问题。

问：Cisco uBR7200系列电缆接口的基本配置示例是什么？

答：以下是配置示例：

interface Cable4/0

ip address 10.1.1.1 255.255.0.0

!--- For the cm to talk to the CMTS. Usually this address is private.

!

ip address 200.1.1.1 255.255.0.0 secondary

!--- For the PCs to talk to the CMTS. Usually this address is public so !--- that the PCs can go to the Internet.

!

load-interval 30

no ip directed-broadcast

cable helper-address 200.1.162.170

!--- Specify the IP address of the DHCP server.

no keepalive

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- This is cosmetic on uBR7200 but must match the upconverter for the !--- uBR7200 platforms so that you know the exact value on the upconverter.

Cable upstream 0 power-level 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port Upstream 0. Enter this command to turn the port on.

Cable upstream 0 frequency 37008000

!--- Upstream frequency. Make sure that this frequency is set to a clean !--- part of the spectrum and is set after careful analysis of your cable !--- plant.

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

问：Cisco uBR7100系列电缆接口的基本配置示例是什么？

答：以下是配置示例：

interface Cable1/0

ip address 111.111.111.111 255.255.255.0 secondary

!--- For the PCs to communicate with the CMTS. Usually this address !--- is public so that the PCs can go to the Internet.

ip address 10.4.1.1 255.255.255.0

!--- For the cm to talk to the CMTS. Usually this address is private.

cable downstream annex B

!--- Default.

cable downstream modulation 64qam

!--- Default.

cable downstream interleave-depth 32

!--- Default.

cable downstream frequency 525000000

!--- Needs to be set to the center frequency of the downstream channel.

no cable downstream rf-shutdown

!--- Enables the integrated upconverter.

cable downstream rf-power 51

!--- Sets the RF power output level on the integrated upconverter !--- (default=50dBmV).

cable upstream 0 frequency 32000000

!--- Upstream frequency, you need to make sure that this frequency is set !--- to a clean part of the spectrum and is set after careful analysis !--- of your cable plant.

cable upstream 0 power-level 0

!--- Default.

cable upstream 0 timing-adjust threshold 0

!--- Default.

cable upstream 0 timing-adjust continue 0

!--- Default.

no cable upstream 0 shutdown

!--- Enables port upstream 0. Must enter this command to turn the port on.

Cable upstream 1 timing-adjust threshold 0

cable upstream 1 timing-adjust continue 0

cable upstream 1 shutdown

cable upstream 2 timing-adjust threshold 0

cable upstream 2 timing-adjust continue 0

cable upstream 2 shutdown

cable upstream 3 timing-adjust threshold 0

cable upstream 3 timing-adjust continue 0

cable upstream 3 shutdown

cable dhcp-giaddr policy

!--- Enable cable DHCP giaddr functionality so that primary addresses !--- are assigned to cable modems and secondary addresses are assigned !--- to remote hosts.

!

问：如何将CMTS配置为一体运行时间(ToD)、简单文件传输协议(TFTP)和动态主机配置协议(DHCP)?

答：首先，在使用本节中的配置时，请确保您拥有最新的12.x EC版本。

您无需在配置中使用cable helper address语句，因为DISCOVER数据包不需要“帮助”到另一台计算机。DISCOVER数据包驻留在CMTS上。

以下是在uBR7200配置内创建的两个配置文件。一个配置文件称为platinum.cm，另一个文件称为disable.cm。如果在CMTS中创建DOCSIS配置文件，则无需将文件复制到闪存或使用TFTP。使用此配置时，您无需拥有外部docsis配置文件。

cable config-file disable.cm

access-denied

service-class 1 max-upstream 1

service-class 1 max-downstream 1600

cpe max 1

timestamp

!

cable config-file platinum.cm

service-class 1 max-upstream 128

service-class 1 guaranteed-upstream 10

service-class 1 max-downstream 10000

service-class 1 max-burst 1600

cpe max 10

timestamp

注意：如果接口下的IP帮助地址命令指向您配置的外部DHCP服务器，则电缆调制解调器从外部DHCP服务器获取配置。

以下是动态提取platinum.cm配置文件的电缆调制解调器的策略：

ip dhcp pool cm-platinum

network 10.1.4.0 255.255.255.0

bootfile platinum.cm

next-server 10.1.4.1

default-router 10.1.4.1

option 7 ip 10.1.4.1

option 4 ip 10.1.4.1

option 2 hex ffff.8f80

lease 7 0 10

以下是PC获取地址的策略：

ip dhcp pool pcs-c4

network 172.16.29.0 255.255.255.224

next-server 172.16.29.1

default-router 172.16.29.1

dns-server 172.16.30.2

domain-name cisco.com

lease 7 0 10

以下是映射到disable.cm的特定电缆调制解调器的MAC地址的静态绑定:

ip dhcp pool cm-0010.7bed.9b45

host 10.1.4.65 255.255.255.0

client-identifier 0100.107b.ed9b.45

bootfile disable.cm

以下是映射到闪存中的silver.cm配置文件的特定电缆调制解调器的MAC地址的静态绑定：

ip dhcp pool cm-0010.7bed.9b23

host 10.1.4.66 255.255.255.0

client-identifier 0100.107b.ed9b.23

bootfile silver.cm

当.cm文件位于闪存中而不在TFTP服务器上时，请使用tftp server slot0:silver.cm alias silver.cm语句。

要将DOCSIS配置文件放入uBR72xx的闪存中，请完成以下步骤：

1. 在uBR7200上，键入copy tftp slot:0:命令并按ENTER。解析器会提示您输入远程主机的名称。

2. 指定.cm文件所在的TFTP服务器的地址。解析器会提示您输入源文件名。

3. 键入.cm文件名，然后按ENTER键。

4. 键入show slot0:命令，以验证DOCSIS配置文件是否存在，并检查大小是否与TFTP服务器中的大小匹配。

问：能否将Cisco CMTS配置为网桥？

答：您不能将uBR72xx系列配置为网桥。但是，专为酒店业设计的uBR7100系列支持桥接，因此，如果您想在笔记本电脑上使用静态IP地址，您可以在出差时连接到互联网。有关详细信息，请参阅在网桥模式下配置UBR 7100。

问：Cisco CMTS是否支持PPPoE?

答：Cisco uBR7200系列路由器支持以太网点对点协议(PPPoE)终止，但不支持PPPoE转发。PPPoE终端目前在Cisco IOS®软件版本12.1(5)T中可用。

PPPoE允许直接连接到电缆接口。PPPoE提供服务提供商数字用户线路(DSL)支持。在Cisco uBR7200系列路由器的电缆接口上支持PPPoE，使电缆调制解调器后面的客户端设备(CPE)能够使用PPP作为获取IP地址的机制，并将其用于所有后续数据流量，就像拨号PPP客户端一样。在PPP拨号会话中，PPPoE会话经过身份验证，PPPoE客户端和服务器之间协商IP地址。服务器可以是Cisco uBR7200系列路由器或家庭网关。有关详细信息，请参阅在uBR7100 CMTS上使用L2TP隧道配置PPPoE终端。

问：如何在DOCSIS 1.0中配置基线隐私？

A.以下是此类配置的前提条件：

- CM和CMTS上必须有K1映像。

- 您必须具有配置文件编辑器。

完成以下步骤以在配置文件编辑器上启用基线隐私：

1. 打开CPE DOCSIS配置器。

2. 如果使用版本V2.0.4或版本3.0.a，请编辑DOCSIS配置文件，以在“基线隐私启用”(Baseline Privacy Enable)字段中将值从0更改为1。0是默认值，表示未启用基线隐私。

记住以下要点：

- DOCSIS配置文件必须驻留在tftpboot目录中。

- tftpboot目录驻留在TFTP服务器上。

- TFTP服务器连接到CMTS的FE端口或CMTS的LAN。

CM重新启动后，CM将加载新创建的DOCSIS配置文件参数。CM与CMTS协商基线隐私接口(BPI)。如果发出show cable modem命令，CM将显示为：在线(PT),而不是像在线一样。如果您没有看到(PT)，则需要仔细检查，以查看CM和CMTS上是否确实有K1映像，并且启用了服务类别隐私= 1。有关如何构建DOCSIS 1.0配置文件的详细信息，请参阅使用Cisco DOCSIS配置器(仅注册客户)使用CPE配置器V3.2工具。

问：如何在Cisco CMTS上配置捆绑？

A.以下是基本捆绑配置：

hostname 7246VXR

!

interface Ethernet2/0

ip address 172.16.135.11 255.255.255.128

no ip mroute-cache

half-duplex

!

interface Cable4/0

ip address 172.16.30.1 255.255.255.0

!--- IP address configured.

ip helper-address 172.16.135.20

!--- IP address of DHCP server.

no ip route-cache cef

no keepalive

cable bundle 1 master

!--- Master interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 555000000

cable upstream 0 frequency 40000000

cable upstream 0 power-level 0

no cable upstream 0 shutdown

cable upstream 1 shutdown

cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

!

interface Cable5/0

no ip address

load-interval 30

no keepalive

cable bundle 1

!--- Slave interface in bundle 1.

cable downstream rate-limit token-bucket shaping

cable downstream annex B

cable downstream modulation 64qam

cable downstream interleave-depth 32

cable downstream frequency 620000000

cable upstream 0 frequency 25008000

cable upstream 0 power-level 0

cable upstream 0 channel-width 1600000 3200000

no cable upstream 0 shutdown

no cable upstream 1 shutdown

no cable upstream 2 shutdown

cable upstream 3 shutdown

cable upstream 4 shutdown

cable upstream 5 shutdown

cable dhcp-giaddr policy

有关如何验证和排除此配置故障的详细信息，请参阅捆绑电缆接口示例配置和验证。

相关信息

- 技术支持和文档 - Cisco Systems