目录

简介

先决条件

要求

使用的组件

规则

配置VP交换

网络图

配置

验证

配置常规或未整形的VP隧道

网络图

配置

验证

为单个服务类别配置VP隧道

网络图

配置

验证

配置整形VP隧道

网络图

配置

验证

对成形 VP 隧道的限制

为多个服务类别配置分层VP隧道

网络图

配置

验证

对分级 VP 隧道的限制

故障排除

简介

本文档提供虚拟路径(VP)隧道和VP交换的示例配置。

使用VP交换时，交换决策仅基于虚拟路径标识符(VPI)编号。这与用于虚拟信道(VC)交换的VPI和虚拟信道标识符(VCI)不同，它可减少管理并允许更快的信元交换。

使用VP隧道时，VP接口是ATM交换机上的多路复用/解复用点，在该点上，来自各种ATM接口的VC汇聚到接口上的VP。VP是ATM连接，是多个VC的集合，所有VPI编号都相同。VP最常用于WAN。

ATM 连接

ATM连接的两种主要类型是VC和VP。

VC在ATM交换机的端口上通过VPI和VCI编号唯一标识。

VP在ATM端口上由ATM端口上的VPI编号唯一标识。

在上图中，到达VC的ATM信元根据信元报头中的VPI和VCI号进行交换。另一方面，到达VP的ATM信元仅基于VPI编号进行交换。ATM交换机的配置确定交换机应分别是特定VPI/VCI对还是VP交换机。

在此图中，信元在VC或VP级别交换。通过VC交换，交换机接收带有已配置VPI和VCI的信元。然后，它会查找其连接表，以使用新的VPI/VCI值确定传出端口（或端口）。VCI/VPI 100/2和110/2连接到端口1，而与端口2关联的VCI/VPI是110/5。请注意，VCI仅具有本地意义，无需唯一。对于端口3，与其关联的VPI/VCI是1/50。VPI/VCI 7/100和7/110与端口4关联。

您可以将流量从交换机上即将到来的端口切换到传出端口。例如，您可以确定端口1 VPI/VCI 2/100上的所有流量都切换到端口4 VPI/VCI 7/110。同样，您可以配置ATM交换机以将流量从端口2 VPI/VCI 5/110传输到端口4 VCI/VCI/VCIpi 7/100。此表显示如何将数据包从一个VPI/VCI交换到另一个。这是VC交换，因为它使用VPI和VCI信息来交换流量。

交换ATM流量的另一种方法是仅使用VPI信息。在此表中，您可以看到端口1 VPI 2已切换到端口4 VPI 7，端口2 VPI 5已切换到端口3 VPI 1。

VP和VC交换都可在下图中看到:

思科企业ATM交换机上有三种不同类型的VP隧道：

- 常规或未整形的VP隧道

- 整形VP隧道

- 分层VP隧道

常规或未整形的VP隧道是VP隧道，其上没有任何ATM服务类别的流量整形。VP隧道可以属于任何服务类别，但无法形成。隧道中的VC必须与VP隧道属于同一服务类别。

整形VP隧道是流量整形的VP隧道。它们仅针对思科企业ATM交换机上的恒定比特率(CBR)服务类别进行定义。单个VP隧道内的所有VC必须是相同的服务类别。此VP隧道的总输出受硬件对隧道PCR的速率限制。

分层VP隧道是流量整形的VP隧道，支持多个服务类别的VC同时存在于隧道中。例如，如果您有多个服务类别，但只有一个VP隧道，则会使用它们。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本。

- LS1010支持任何服务类别的未整形VP隧道(具有功能卡每类队列(FC-PCQ)和功能卡每流队列(FC-PFQ)、Catalyst 8540-MSR、Catalyst 8510-MSR、Cisco 7带PA-A3的500系列路由器、带PA-A2或PA-A3的Cisco 7200系列路由器、带PA-A6的Cisco 7500系列路由器和带PA-A6的Cisco 7200系列路由器。Cisco IOS®软件版本11.2、11.3或12.0支持此功能。未成形隧道中的VC必须属于未成形VP隧道的相同服务类别。

- LS1010上支持CBR服务类别的整形VP隧道（带FC-PFQ、Catalyst 8510-MSR、Catalyst 8540-MSR、带PA-A3的Cisco 7500系列路由器和Cisco 7200系列路由器）PA-A2或PA-A3、带PA-A6的Cisco 7500系列路由器和带PA-A6的Cisco 7200系列路由器。CBR VP隧道内的所有VC必须属于相同的服务类别。

- Cisco IOS软件版本11.2(8.0.1)FWA4首先支持整形VP隧道。Cisco IOS软件版本11.1和WA3版本系列不支持整形VP隧道。

- 对于Cisco IOS软件版本11.3(0.8)TWA4之后的软件版本，在整形VP隧道内的VC服务类别支持CBR。

- 支持整形CBR隧道内整形VP隧道VC的早期软件版本必须属于CBR服务类别。

- LS1010支持CBR服务类别的分层VP隧道，带FC-PFQ、Catalyst 8510-MSR和Catalyst 8540-MSR。最低软件要求是Cisco IOS的W5系列。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置VP交换

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本节使用下图所示的网络设置。

配置

本部分使用以下配置。

- ATM5/1/0-R1

- ATM0/0/1-S1

- ATM0/0/1-S2

- ATM0/0/0-R2

ATM5/1/0-R1

interface ATM5/1/0

no ip address

no atm ilmi-keepalive

!

interface ATM5/1/0.1 point-to-point

ip address 1.1.1.1 255.255.255.0

pvc 10/20

encapsulation aal5snap

!

interface ATM5/1/0.2 point-to-point

ip address 2.1.1.1 255.255.255.0

pvc 10/30

encapsulation aal5snap

!

interface ATM5/1/0.3 point-to-point

ip address 3.1.1.1 255.255.255.0

pvc 11/40

ATM0/0/1-S1

interface ATM0/0/1

no ip address

atm pvp 10  interface  ATM0/0/0 10

atm pvp 11  interface  ATM0/0/0 11

ATM0/0/1-S2

interface ATM0/0/1

no ip address

atm pvp 10  interface  ATM0/0/0 10

atm pvp 12  interface  ATM0/0/0 11

ATM0/0/0-R2

interface ATM0/0/0

no ip address

no atm ilmi-keepalive

!

interface ATM0/0/0.1 point-to-point

ip address 1.1.1.2 255.255.255.0

pvc 10/20

encapsulation aal5snap

!

interface ATM0/0/0.2 point-to-point

ip address 2.1.1.2 255.255.255.0

pvc 10/30

encapsulation aal5snap

!

interface ATM0/0/0.3 point-to-point

ip address 3.1.1.2 255.255.255.0

pvc 12/40

encapsulation aal5snap

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show atm vp — 验证VP隧道是否已启用。

- show atm vp traffic interface atm0/0/0 — 验证有关虚拟路径的ATM层连接信息。

- show atm vp interface atm0/0/0 10 — 验证通过VP隧道的所有VP与VPI。

这是show atm vp命令的命令输出示例。

Switch#show atm vp

Interface         VPI  Type  X-Interface         X-VPI     Status

ATM0/0/0           10      PVP     ATM0/0/1        10        UP

ATM0/0/0           11      PVP     ATM0/0/1        12        UP

ATM0/0/1           10      PVP     ATM0/0/0        10        UP

ATM0/0/1           12      PVP     ATM0/0/0        11        UP

以下是show atm vp traffic interface atm0/0/0命令的命令输出示例。

Switch#show atm vp traffic interface atm0/0/0

Interface         VPI  Type       rx-cell-cnts    tx-cell-cnts

ATM0/0/0          10    PVP               70              60

ATM0/0/0          11    PVP               94              90

以下是show atm vp interface atm0/0/0 10命令的命令输出示例。

Switch#show atm vp interface atm0/0/0 10

Interface: ATM0/0/0, Type: oc3suni

VPI = 10

Status: UP

Time-since-last-status-change: 00:58:11

Connection-type: PVP

Cast-type: point-to-point

Cross-connect-interface: ATM0/0/1, Type: oc3suni

Cross-connect-VPI = 10

Rx connection-traffic-table-index: 1

Rx service-category: UBR (Unspecified Bit Rate)

Rx pcr-clp01: 7113539

Rx scr-clp01: none

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: none

Tx connection-traffic-table-index: 1

Tx service-category: UBR (Unspecified Bit Rate)

Tx pcr-clp01: 7113539

Tx scr-clp01: none

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

配置常规或未整形的VP隧道

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本节使用下图所示的网络设置。

配置

本节介绍常规或未整形VP隧道的配置。此示例显示为通过WAN云创建的永久虚拟路径(PVP)。

本部分使用以下配置。

- 路由器 1

- 交换机 1

- 交换机 2

- 路由器 2

路由器 1

interface ATM5/1/0.1 point-to-point

ip address 1.1.1.1 255.255.255.0

pvc 100/32

encapsulation aal5snap

!

interface ATM5/1/0.2 point-to-point

ip address 2.1.1.1 255.255.255.0

pvc 100/33

encapsulation aal5snap

交换机 1

interface ATM0/0/0

no ip address

atm pvp 100

!

interface ATM0/0/0.100 point-to-point

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM0/0/1

no ip address

no ip directed-broadcast

logging event subif-link-status

atm ilmi-keepalive

atm svcc vci min 100

atm pvc 100 32  interface  ATM0/0/0.100 100 32

atm pvc 100 33  interface  ATM0/0/0.100 100 33

交换机 2

interface ATM0/0/0

no ip address

atm pvp 100

!

interface ATM0/0/0.100 point-to-point

!

interface ATM0/0/1

no ip address

atm pvc 100 32  interface  ATM0/0/0.100 100 32

atm pvc 100 40  interface  ATM0/0/0.100 100 33

!

路由器 2

interface ATM0/0/0.1 point-to-point

ip address 1.1.1.2 255.255.255.0

pvc 100/32

encapsulation aal5snap

!

interface ATM0/0/0.2 point-to-point

ip address 2.1.1.2 255.255.255.0

pvc 100/40

encapsulation aal5snap

!

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show atm vp — 验证VP隧道是否已启用。

- show atm vp traffic interface atm0/0/0 — 验证有关虚拟路径的ATM层连接信息。

- show atm vp interface atm0/0/0 100 — 通过VPI验证通过VP隧道的所有VP。

以下是show atm vp interface atm 0/0/0 100命令的命令输出示例示例。

Switch#show atm vp interface atm 0/0/0 100

Interface: ATM0/0/0, Type: oc3suni

VPI = 100

Status: TUNNEL

Time-since-last-status-change: 17:21:32

Connection-type: PVP

Cast-type: point-to-point

Rx cells: 49968, Tx cells: 50371

Rx connection-traffic-table-index: 1

Rx service-category: UBR (Unspecified Bit Rate)

Rx pcr-clp01: 7113539

Rx scr-clp01: none

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: none

Tx connection-traffic-table-index: 1

Tx service-category: UBR (Unspecified Bit Rate)

Tx pcr-clp01: 7113539

Tx scr-clp01: none

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

这是show atm vp命令的命令输出示例。

Switch#show atm vp

Interface         VPI  Type  X-Interface         X-VPI     Status

ATM0/0/0          100   PVP     TUNNEL

以下是show atm vp traffic interface atm0/0/0命令的命令输出示例。

Switch#show atm vp traffic interface atm0/0/0

Interface         VPI  Type       rx-cell-cnts    tx-cell-cnts

ATM0/0/0          100   PVP            49865           50271

为单个服务类别配置VP隧道

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

本节使用此图中所示的网络设置。

配置

此示例显示如何为单个服务类别配置VP隧道。请注意，使用可变比特率非实时(vbr-nrt)的路由器ATM接口上启用了流量整形。

本部分使用以下配置。

- 路由器 1

- 交换机 1

- 交换机 2

- 路由器 2

路由器 1

interface ATM5/1/0.1 point-to-point

ip address 1.1.1.1 255.255.255.0

pvc 100/32

vbr-nrt 50000 40000 100

encapsulation aal5snap

!

!

interface ATM5/1/0.2 point-to-point

ip address 2.1.1.1 255.255.255.0

pvc 100/33

vbr-nrt 10000 8000 100

encapsulation aal5snap

!

交换机 1

interface ATM0/0/0

no ip address

atm pvp 100 rx-cttr 7 tx-cttr 7

!

interface ATM0/0/0.100 point-to-point

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM0/0/1

no ip address

atm pvc 100 32 rx-cttr 8 tx-cttr 8  interface  ATM0/0/0.100 100 32

atm pvc 100 33 rx-cttr 9 tx-cttr 9  interface  ATM0/0/0.100 100 33

交换机 2

interface ATM0/0/0

no ip address

atm pvp 100 rx-cttr 7 tx-cttr 7

!

interface ATM0/0/0.100 point-to-point

!

interface ATM0/0/1

no ip address

atm pvc 100 32 rx-cttr 8 tx-cttr 8  interface  ATM0/0/0.100 100 32

atm pvc 100 40 rx-cttr 9 tx-cttr 9  interface  ATM0/0/0.100 100 33

路由器 2

interface ATM0/0/0.1 point-to-point

ip address 1.1.1.2 255.255.255.0

pvc 100/32

vbr-nrt 50000 40000 100

encapsulation aal5snap

!

interface ATM0/0/0.2 point-to-point

ip address 2.1.1.2 255.255.255.0

pvc 100/40

vbr-nrt 10000 8000 100

encapsulation aal5snap

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show atm vp interface atm0/0/0 100 — 通过VPI验证通过VP隧道的所有VP。

c8510m-r2#show atm vp int atm 0/0/0 100

Interface: ATM0/0/0, Type: oc3suni

VPI = 100

Status: TUNNEL

Time-since-last-status-change: 00:43:49

Connection-type: PVP

Cast-type: point-to-point

Rx connection-traffic-table-index: 7

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 100000

Rx scr-clp0 : 80000

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: 100

Tx connection-traffic-table-index: 7

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 100000

Tx scr-clp0 : 80000

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 100

配置整形VP隧道

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

如果VP服务提供商策略，则连接最有可能在服务提供商网络中出现信元丢弃。克服这一点的最佳方法是配置整形VP隧道。

整形VP隧道是流量整形的VP隧道。它们仅针对思科企业ATM交换机上的CBR服务类别进行定义。单个VP隧道内的所有VC必须是相同的服务类别。此VP隧道的总输出受硬件对隧道PCR的速率限制。

网络图

本节使用此图中所示的网络设置。

配置

本节介绍整形VP隧道的配置并使用这些配置。

- 交换机 1

- 交换机 2

- 路由器 1

- 路由器 2

交换机 1

atm connection-traffic-table-row index 10 cbr pcr 8000

atm connection-traffic-table-row index 20 vbr-nrt pcr 7000 scr0 4000  mbs 100

atm connection-traffic-table-row index 30 ubr pcr 8000

atm connection-traffic-table-row index 40 abr pcr 8000  mcr 0

!

interface ATM0/0/0

no ip address

atm pvp 100 shaped rx-cttr 10 tx-cttr 10

atm pvp 110 shaped rx-cttr 10 tx-cttr 10

atm pvp 120 shaped rx-cttr 10 tx-cttr 10

!

interface ATM0/0/0.100 point-to-point

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

!

interface ATM0/0/0.110 point-to-point

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM0/0/0.120 point-to-point

atm cac service-category cbr deny

atm cac service-category abr permit

!

interface ATM0/0/1

no ip address

atm pvc 100 32 rx-cttr 20 tx-cttr 20  interface  ATM0/0/0.100 100 32

atm pvc 110 40 rx-cttr 30 tx-cttr 30  interface  ATM0/0/0.110 110 40

atm pvc 120 50 rx-cttr 40 tx-cttr 40  interface  ATM0/0/0.120 120 50

交换机 2

atm connection-traffic-table-row index 10 cbr pcr 8000

atm connection-traffic-table-row index 20 vbr-nrt pcr 7000 scr0 4000  mbs 100

atm connection-traffic-table-row index 30 ubr pcr 8000

atm connection-traffic-table-row index 40 abr pcr 8000  mcr 0

!

interface ATM0/0/0

no ip address

atm pvp 100 shaped rx-cttr 10 tx-cttr 10

atm pvp 110 shaped rx-cttr 10 tx-cttr 10

atm pvp 120 shaped rx-cttr 10 tx-cttr 10

!

interface ATM0/0/0.100 point-to-point

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

!

interface ATM0/0/0.110 point-to-point

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM0/0/0.120 point-to-point

no atm ilmi-keepalive

atm cac service-category cbr deny

atm cac service-category abr permit

!

interface ATM0/0/1

no ip address

atm pvc 100 32 rx-cttr 20 tx-cttr 20  interface  ATM0/0/0.100 100 32

atm pvc 110 40 rx-cttr 30 tx-cttr 30  interface  ATM0/0/0.110 110 40

atm pvc 120 50 rx-cttr 40 tx-cttr 40  interface  ATM0/0/0.120 120 50

路由器 1

interface ATM5/1/0.1 point-to-point

ip address 1.1.1.1 255.255.255.0

pvc 100/32

vbr-nrt 7000 4000 100

encapsulation aal5snap

!

interface ATM5/1/0.2 point-to-point

ip address 2.1.1.1 255.255.255.0

pvc 110/40

ubr 8000

!

interface ATM5/1/0.3 point-to-point

ip address 3.1.1.1 255.255.255.0

pvc 120/50

abr 8000 5000

路由器 2

interface ATM0/0/0.1 point-to-point

ip address 1.1.1.2 255.255.255.0

pvc 100/32

vbr-nrt 7000 4000 100

encapsulation aal5snap

!

interface ATM0/0/0.2 point-to-point

ip address 2.1.1.2 255.255.255.0

pvc 110/40

ubr 8000

!

interface ATM0/0/0.3 point-to-point

ip address 3.1.1.2 255.255.255.0

pvc 120/50

abr 8000 5000

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show atm vp interface atm0/0/0 — 使用VPI验证通过VP隧道的所有VP。

- show atm vp traffic interface atm0/0/0 — 验证有关虚拟路径的ATM层连接信息。

- show atm interface atm0/0/0.110 — 显示有关ATM接口的信息。

以下是show atm vp interface atm 0/0/0命令的命令输出示例。

Switch#show atm vp interface atm0/0/0

Interface         VPI  Type  X-Interface         X-VPI     Status

ATM0/0/0           100     PVP     SHAPED TUNNEL

ATM0/0/0           110     PVP     SHAPED TUNNEL

ATM0/0/0           120     PVP     SHAPED TUNNEL

以下是show atm vp traffic interface atm0/0/0命令的命令输出示例。

Switch#show atm vp traffic interface atm0/0/0

Interface         VPI  Type       rx-cell-cnts    tx-cell-cnts

ATM0/0/0          100   PVP             1438            1446

ATM0/0/0          110   PVP             1374            1384

ATM0/0/0          120   PVP              755             772

以下是show atm interface atm0/0/0.110命令的命令输出示例。

Switch#show atm interface atm0/0/0.110

Interface:      ATM0/0/0.110    Port-type:      vp tunnel

IF Status:      UP              Admin Status:   up

对成形 VP 隧道的限制

此列表描述与整形VP隧道相关的限制。

- 带FC-PFQ和Catalyst 8510-MSR的LS1010最多支持2x64=128个VP隧道。在x/0/y编号端口上支持64个形状的VP隧道，在x/1/y编号端口上支持64个。

- Catalyst 8540-MSR最多支持8x64=512形VP隧道。每个接口组最多可定义64个整形VP隧道：

- (0/0/x、1/0/x)

- (0/1/x、1/1/x)

- (2/0/x、3/0/x)

- (2/1/x、3/1/x)

- (9/0/x、10/0/x)

- (9/1/x、10/1/x)

- (11/0/x、12/0/x)

- (11/1/x、12/1/x)

- 整形VP隧道的带宽由隧道内的活动VC以严格轮询(RR)方式共享。

- 整形VP隧道不支持合并的VC进行标记交换。

- 在整形VP隧道接口上，不允许使用未指定比特率(UBR)+和可用比特率(ABR)VC，这些VC具有非零最小信元速率(MCR)。

- 最多128条VC可以通过s形VP隧道接口。

为多个服务类别配置分层VP隧道

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

如果您有多个服务类别且不能购买多个VP隧道，则使用分层VP隧道配置。分层VP隧道是流量整形的VP隧道，支持多个服务类别的VC在隧道中同时共存。

网络图

本节使用下图所示的网络设置。

配置

本节介绍用于多个服务类别的分层VP隧道的配置，并使用这些配置。

- 交换机 1

- 交换机 2

- 路由器 1

- 路由器 2

交换机 1

atm hierarchical-tunnel

atm connection-traffic-table-row index 20 vbr-nrt pcr 7000 scr0 4000  mbs 100

atm connection-traffic-table-row index 30 ubr pcr 8000

atm connection-traffic-table-row index 40 abr pcr 8000  mcr 0

atm connection-traffic-table-row index 50 cbr pcr 50000

!

interface ATM0/0/0

no ip address

no ip directed-broadcast

logging event subif-link-status

atm pvp 100 hierarchical rx-cttr 50 tx-cttr 50

!

interface ATM0/0/0.100 point-to-point

no ip directed-broadcast

no atm ilmi-keepalive

!

interface ATM0/0/1

no ip address

no ip directed-broadcast

logging event subif-link-status

atm pvc 100 32 rx-cttr 20 tx-cttr 20  interface  ATM0/0/0.100 100 32

atm pvc 100 40 rx-cttr 30 tx-cttr 30  interface  ATM0/0/0.100 100 40

atm pvc 100 50 rx-cttr 40 tx-cttr 40  interface  ATM0/0/0.100 100 50

交换机 2

atm hierarchical-tunnel

atm connection-traffic-table-row index 20 vbr-nrt pcr 7000 scr0 4000  mbs 100

atm connection-traffic-table-row index 30 ubr pcr 8000

atm connection-traffic-table-row index 40 abr pcr 8000  mcr 0

atm connection-traffic-table-row index 50 cbr pcr 50000

!

interface ATM2/1/0

no ip address

atm pvp 100 hierarchical rx-cttr 50 tx-cttr 50

!

interface ATM2/1/0.100 point-to-point

!

interface ATM2/1/1

no ip address

atm pvc 100 32 rx-cttr 20 tx-cttr 20  interface  ATM2/1/0.100 100 32

atm pvc 100 40 rx-cttr 30 tx-cttr 30  interface  ATM2/1/0.100 100 40

atm pvc 100 50 rx-cttr 40 tx-cttr 40  interface  ATM2/1/0.100 100 50

路由器 1

interface ATM5/1/0.1 point-to-point

ip address 1.1.1.1 255.255.255.0

pvc 100/32

vbr-nrt 7000 4000 100

encapsulation aal5snap

!

interface ATM5/1/0.2 point-to-point

ip address 2.1.1.1 255.255.255.0

pvc 100/40

ubr 8000

encapsulation aal5snap

!

interface ATM5/1/0.3 point-to-point

ip address 3.1.1.1 255.255.255.0

pvc 100/50

abr 8000 5000

encapsulation aal5snap

路由器 2

interface ATM0/0/0.1 point-to-point

ip address 1.1.1.2 255.255.255.0

pvc 100/32

vbr-nrt 7000 4000 100

encapsulation aal5snap

!

interface ATM0/0/0.2 point-to-point

ip address 2.1.1.2 255.255.255.0

pvc 100/40

ubr 8000

encapsulation aal5snap

!

interface ATM0/0/0.3 point-to-point

ip address 3.1.1.2 255.255.255.0

pvc 100/50

abr 8000 5000

encapsulation aal5snap

验证

本部分所提供的信息可用于确认您的配置是否正常工作。

命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

- show atm vp — 验证VP隧道是否已启用。

- show atm resource — 显示全局资源管理器配置和状态。

- show atm vp traffic interface atm2/1/0 100 — 验证有关虚拟路径的ATM层连接信息。

- show atm vp interface atm2/1/0 100 — 通过VPI验证通过VP隧道的所有VP。

这是show atm vp命令的命令输出示例。

Switch#show atm vp

Interface         VPI  Type  X-Interface         X-VPI     Status

ATM2/1/0           100     PVP     HIE. TUNNEL

这是show atm resource命令的命令输出示例。

Switch#show atm resource

Resource configuration:

Sustained-cell-rate-margin-factor 1%

Abr-mode:   EFCI

Hierarchical Scheduling Mode : enabled

!--- Truncated.

以下是show atm vp traffic interface atm2/1/0 100命令的命令输出示例。

Switch#show atm vp traffic interface atm 2/1/0 100

Interface         VPI  Type       rx-cell-cnts    tx-cell-cnts

ATM2/1/0          100   PVP             2451            2470

以下是show atm vp interface atm2/1/0 100命令的命令输出示例。

Switch#show atm vp interface atm2/1/0 100

Interface: ATM2/1/0, Type: oc3suni

VPI = 100

Status: HIE. TUNNEL

Time-since-last-status-change: 00:49:16

Connection-type: PVP

Cast-type: point-to-point

Rx cells: 2214, Tx cells: 2234

Rx connection-traffic-table-index: 50

Rx service-category: CBR (Constant Bit Rate)

Tx connection-traffic-table-index: 50

Tx service-category: CBR (Constant Bit Rate)

Tx pcr-clp01: 50000

Tx scr-clp01: none

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: none

对分级 VP 隧道的限制

此列表描述与分层VP隧道相关的限制。

- 带FC-PFQ的LS1010、带ATM交换处理器(ASP)和FC-PFQ的Catalyst 5500和Catalyst 8510-MSR最多支持62个分层VP隧道。

- 分层VP隧道只能在LS1010和Catalyst 8510-MSR上插槽0和3中的端口上定义。分层VP隧道可在Catalyst 5500上的插槽9和11中定义，其中带有ASP和FC-PFQ。

- 配备FC-PFQ和ASP-B的LS1010在端口0/0/z和3/0/z组合上最多支持30个分层VP隧道，在端口0/1/z和3/1/z组合上最多支持32个隧道。使用show hardware命令查找ASP和功能卡的类型。

- 配备FC-PFQ和ASP-C以及Catalyst 8510-MSR的LS1010在端口0/y/z上最多支持30个分层VP隧道，在端口3/y/z上最多支持32个隧道。

- 在具有ASP和FC-PFQ且最多30的Catalyst 5500上，可在端口9/0/z和11/0/7组合上定义分层VP隧道。端口9/1/z和11/1/z组合上最多可定义32个分层VP隧道。

- 在Catalyst 8540-MSR上，可在插槽0、2、9和11上定义分层VP隧道。

- 分层VP隧道的最大数量在120到240之间，具体取决于使用的端口适配器模块(PAM)类型。如果所有端口都是超级PAM（带模块的完全），则支持的VP隧道最大数量为240。如果安装的所有端口都是具有LS1010的超级CAM，则PAM的最大分层VP隧道数量为120。

- 分层VP隧道不能与同一物理接口上任何其他类型的连接（VC、VP、标记VC、常规或整形VP隧道等）共存。因此，唯一可以与同一物理接口上的分层VP隧道共存的连接类型是附加的分层VP隧道和公认VC（信令0/5、PNNI、0/18、ILMI 0/16等）。

- 分层VP隧道只能支持ATM论坛VC或标记VC，但不能同时支持两者。

- 当您执行为其端口配置了分层VP隧道的PAM的在线插入和删除(OIR)时，将保留分层隧道的配置。如果同一PAM重新插入，则分层VP隧道会自动激活。但是，如果要插入不同类型的PAM，强烈建议在物理删除PAM之前删除任何已配置的分层VP隧道（即将删除的端口上）。

故障排除

本文档当前没有可用的故障排除信息。