目录

简介

先决条件

要求

使用的组件

规则

假设

配置

网络图

配置

故障排除

相关信息

简介

本文档显示了整形虚拟路径(VP)隧道中LAN仿真(LANE)、电路仿真服务(CES)和可变比特率(VBR)永久虚拟连接(PVC)的配置示例。在本文档所示的配置中，LANE、CES和可变比特率非实时(VBR-nrt)PVC通过WAN传输。这些示例使用整形VP隧道来确保符合流量合同。当使用与服务提供商相同的流量参数的整形VP隧道时，服务提供商的ATM网络不应丢弃任何信元。

VP隧道必须属于恒定比特率(CBR)服务类别，才能整形：它是思科目前支持的唯一一条形状隧道。您必须有三个VP隧道，因为LANE使用未指定的比特率(UBR)交换虚拟连接(SVC),CES使用CBR PVC，您有一个VBR PVC，并且您使用整形的VP隧道。每个服务类别都有一个：CBR虚拟通道(VC)和UBR虚拟通道您可以使用分层VP隧道来使用一个隧道。

先决条件

要求

本文档的读者应掌握以下这些主题的相关知识：

- LANE

- LANE 设计推荐

- 配置LANE

- CES

- 电路仿真服务 介绍

- 配置电路仿真服务

- VBR

- 了解 ATM VC 的可变比特率实时 (VBR-rt) 服务类别

- 了解 ATM VC 的 VBR-nrt 服务类别和流量整形

- VP 隧道

- 配置 VP 隧道与 VP 交换

使用的组件

本文档中的信息基于以下软件和硬件版本：

- LightStream 1010(LS1010)的Cisco IOS®软件版本11.3(0.8)TWA4 ASP或更高版本

- Cisco 8540-MSR的任何版本

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

假设

本文档中显示的示例假设以下事实：

- 整形隧道必须属于CBR服务类别，因此本示例具有一个CBR VP隧道，该隧道只能包含CBR VC。它用于CES CBR PVC(网络图中标记为VPI1)。 请注意，虚拟路径标识符(VPI)编号对交换机端口具有本地意义，因此您可以在同一台交换机上具有相同的VPI编号，但有两个不同的交换机端口。

- 由于整形VP隧道不能同时传输多个服务类别的VC，因此CBR VC使用的第一个VP隧道不能用于LANE UBR VC或VBR-nrt PVC。您必须为LANE（使用UBR服务类别VC）创建另一个VP隧道。 因此，第二个VP隧道(在网络图中标记为VPI2)是CBR形VP隧道，仅允许UBR VC通过该隧道。

- 第三形VP隧道传输VBR-nrt PVC(在网络图中标有VPI3)。

- 您需要从服务提供商处购买三个CBR副总裁。

- 假设三个CBR VP的峰值信元速率(PCR)为10 Mbps，信元延迟变异容限(CDVT)为500信元。请注意，在同一物理接口上定义的所有VP隧道的PCR总和必须小于物理接口线速的95%（假设物理接口上仅配置了VP隧道）。

- 对于VBR PVC，PVC的持续细胞率(SCR)必须小于CBR型VP隧道的PCR的95%。换句话说，VBR-nrt的PVC SCR必须小于9.5 Mbps。如果有多个VBR PVC通过CBR隧道，则所有VBR PVC的SCR总和必须小于成形VP隧道的PCR的95%。剩余的5%保留用于信令和其他强制协议。

- 设备5500-asp-f用于VP交换。服务提供商通常执行此功能。

- LANE服务在8540-MSR上定义；LAN仿真客户端(LEC)在8540-MSR和5500-asp-e上定义。

注意：在本示例中，为简单起见，LANE服务放置在ATM交换机上。但是，这并不是LANE服务的最佳位置。LAN仿真服务器(LES)或广播和未知服务器(BUS)的最佳位置在Catalyst 5500的LANE模块上。LEC的理想位置在Cisco 7500系列路由器上。

- 两个专用分支交换(PBX)在本图中使用CES CBR电路。有关如何配置电路仿真的详细信息，请参阅配置电路仿真服务。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

网络图

单击此图中的交换机查看配置示例：

配置

本文档使用以下配置：

- 5500-asp-e

- 5500-asp-f

- 8540-MSR

5500-asp-e示例配置

5500-asp-e

5500-asp-e# show running-config

Building configuration...

Current configuration:

!

version 11.3

no service pad

service timestamps debug datetime msec

service timestamps log uptime

no service password-encryption

!

hostname 5500-asp-e

!

boot system flash slot0:LS1010-wp-mz.120-3c.W5.9.bin

!

ip host-routing

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 64000 cbr pcr 10240  cdvt 500

atm lecs-address-default 47.0091.8100.0000.0090.2144.8401.0090.2144.8405.00 1

atm address 47.0091.8100.0000.0050.537e.1401.0050.537e.1401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

!

interface CBR10/0/0

no ip address

ces circuit 0 circuit-name test

ces pvc 0 interface ATM11/0/1.6 vpi 6 vci 100

!

interface ATM11/0/1

no atm signaling enable

no ip address

atm pvp 5 shaped rx-cttr 64000 tx-cttr 64000

atm pvp 6 shaped rx-cttr 64000 tx-cttr 64000

atm pvp 7 shaped rx-cttr 64000 tx-cttr 64000

!

interface ATM11/0/1.5 point-to-point

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM11/0/1.6 point-to-point

!

interface ATM11/0/1.7 point-to-point

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

atm pvc 7 100 rx-cttr 63997 tx-cttr 63997  interface  ATM10/1/0 0 100

!

interface ATM11/0/2

no ip address

!

interface ATM11/0/3

no ip address

!

interface ATM11/1/0

no ip address

!

interface ATM11/1/1

no ip address

!

interface ATM11/1/2

no ip address

!

interface ATM11/1/3

no ip address

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface ATM13/0/0.1 multipoint

ip address 100.100.100.2 255.255.255.0

lane client ethernet test

!

interface Ethernet13/0/0

no ip address

!

no ip classless

logging buffered 16000 debugging

!

line con 0

line aux 0

line vty 0 4

login

!

end

功能显示

您可以使用本节中的show命令来验证设备上的配置功能。命令输出解释程序工具（仅限注册用户）支持某些 show 命令，使用此工具可以查看对 show 命令输出的分析。

注意：您可以使用其他show命令验证配置；并非所有内容都包含在本文档中。

为确保所有LANE VC都通过正确的VP隧道（换句话说，为防止信令通过主接口发起），在接口atm11/0/1上使用no atm signaling enable命令禁用信令。对8540-MSR执行了相同的操作。

要查看VPI为7的VC通过VP隧道的VC，请发出show atm vc interface interface-number命令：

5500-asp-e# show atm vc interface atm11/0/1.7

Interface    VPI   VCI   Type    X-Interface  X-VPI X-VCI  Encap Status

ATM11/0/1.7  7     3      PVC     ATM13/0/0    0     181   SNAP   UP

ATM11/0/1.7  7     4      PVC     ATM13/0/0    0     182   SNAP   UP

ATM11/0/1.7  7     5      PVC     ATM13/0/0    0     180   QSAAL  UP

ATM11/0/1.7  7     16     PVC     ATM13/0/0    0     179   ILMI   UP

ATM11/0/1.7  7     18     PVC     ATM13/0/0    0     183   PNNI   UP

ATM11/0/1.7  7     100    PVC     ATM10/1/0    0     100          UP

5500-asp-e# show atm interface resource atm11/0/1.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

5500-asp-e# show atm interface resource atm11/0/1

Resource Management configuration:

Service Classes:

Service Category map: c1 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr, c5 ubr

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 8 c2, 1 c3, 1 c4, 1 c5

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

117023 cbr RX, 117023 cbr TX, 117023 vbr RX, 117023 vbr TX,

117023 abr RX, 117023 abr TX, 117023 ubr RX, 117023 ubr TX

Allocated bit rates:

30720 cbr RX, 30720 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Best effort connections: 0 pvcs,  4 svcs

5500-asp-f示例配置

交换机配置为VP交换。

5500-asp-f

5500-asp-f# show running-config

Building configuration...

Current configuration:

!

version 11.3

no service padservice timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 5500-asp-f

!

!

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 64000 cbr pcr 10240  cdvt 500

atm address 47.0091.8100.0000.0050.5308.2401.0050.5308.2401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

!

interface ATM11/0/0

no ip address

!

interface ATM11/0/1

no ip address

atm pvp 5  interface  ATM11/0/0 10

atm pvp 6 rx-cttr 64000 tx-cttr 64000 interface ATM11/0/0 6 rx-cttr 64000 tx-cttr 64000

atm pvp 7 rx-cttr 63997 tx-cttr 63997 interface ATM11/0/0 7 rx-cttr 63997 tx-cttr 63997

!

interface ATM13/0/0

no ip address

atm maxvp-number 0

!

interface Ethernet13/0/0

no ip address

!

ip classless

!

!

line con 0

line aux 0

line vty 0 4

login

!

end

功能显示

要验证VP是否运行正常，请发出show atm vp 命令：

5500-asp-f# show atm vp

Interface    VPI    Type  X-Interface     X-VPI     Status

ATM11/0/0    6       PVP     ATM11/0/1    6         UP

ATM11/0/0    7       PVP     ATM11/0/1    7         UP

ATM11/0/0    10      PVP     ATM11/0/1    5         UP

ATM11/0/1    5       PVP     ATM11/0/0    10        UP

ATM11/0/1    6       PVP     ATM11/0/0    6         UP

ATM11/0/1    7       PVP     ATM11/0/0    7         UP

8540-MSR示例配置

8540-MSR

8540-MSR# show running-config

Building configuration...

Current configuration:

!

version 12.0

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname 8540-MSR

!

logging buffered 4096 debugging

!

redundancy

main-cpu

sync config startup

sync config running

facility-alarm core-temperature major 53

facility-alarm core-temperature minor 45

ip subnet-zero

!

atm connection-traffic-table-row index 63997 vbr-nrt pcr 20480 scr10 9000  mbs 100

atm connection-traffic-table-row index 63998 cbr pcr 10000

atm connection-traffic-table-row index 63999 cbr pcr 10240  cdvt 500

atm lecs-address-default 47.0091.8100.0000.0090.2144.8401.0090.2144.8405.00 1

atm address 47.0091.8100.0000.0090.2144.8401.0090.2144.8401.00

atm router pnni

no aesa embedded-number left-justified

node 1 level 56 lowest

redistribute atm-static

!

!

lane database PVP

name test server-atm-address 47.009181000000009021448401.009021448403.01

!

!

interface CBR1/0/0

no ip address

no ip directed-broadcast

shutdown

ces circuit 0 circuit-name test

ces pvc 0 interface ATM2/1/0.6 vpi 6 vci 100

!

interface ATM2/1/0

no atm signaling enable

no ip address

no ip directed-broadcast

atm pvp 6 shaped rx-cttr 63999 tx-cttr 63999

atm pvp 7 shaped rx-cttr 63999 tx-cttr 63999

atm pvp 10 shaped rx-cttr 63999 tx-cttr 63999

!

interface ATM2/1/0.6 point-to-point

no ip directed-broadcast

!

interface ATM2/1/0.7 point-to-point

no ip directed-broadcast

atm cac service-category cbr deny

atm cac service-category vbr-nrt permit

atm pvc 7 100 rx-cttr 63997 tx-cttr 63997  interface  ATM1/1/0 0 100

!

interface ATM2/1/0.10 point-to-point

no ip directed-broadcast

atm cac service-category cbr deny

atm cac service-category ubr permit

!

interface ATM2/1/1

no ip address

no ip directed-broadcast

!

interface ATM2/1/2

no ip address

no ip directed-broadcast

!

interface ATM2/1/3

no ip address

no ip directed-broadcast

!

interface ATM0

no ip address

no ip directed-broadcast

atm maxvp-number 0

lane config auto-config-atm-address

lane config database PVP

!

interface ATM0.1 multipoint

ip address 100.100.100.1 255.255.255.0

no ip directed-broadcast

lane server-bus ethernet test

lane client ethernet test

!

interface Ethernet0

no ip address

no ip directed-broadcast

!

ip classless

!

!

line con 0

transport input none

line aux 0

line vty 0 4

!

end

功能显示

您可以使用本节中的show命令来验证设备上的配置功能。

8540-MSR# show atm interface resource atm2/1/0.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0

Resource Management configuration:

Service Classes:

Service Category map: c2 cbr, c2 vbr-rt, c3 vbr-nrt, c4 abr, c5 ubr

Scheduling: RS c1 WRR c2, WRR c3, WRR c4, WRR c5

WRR Weight: 8 c2, 1 c3, 1 c4, 1 c5

Pacing: disabled   0 Kbps rate configured, 0 Kbps rate installed

Service Categories supported: cbr,vbr-rt,vbr-nrt,abr,ubr

Link Distance: 0 kilometers

Controlled Link sharing:

Max aggregate guaranteed services: none RX,  none TX

Max bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Min bandwidth: none cbr RX, none cbr TX, none vbr RX, none vbr TX,

none abr RX, none abr TX, none ubr RX, none ubr TX

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr, none vbr, none abr, none ubr

Peak-cell-rate TX: none cbr, none vbr, none abr, none ubr

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX: none abr, none ubr

Minimum-cell-rate TX: none abr, none ubr

CDVT RX: none cbr, none vbr, none abr, none ubr

CDVT TX: none cbr, none vbr, none abr, none ubr

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

117023 cbr RX, 117023 cbr TX, 117023 vbr RX, 117023 vbr TX,

117023 abr RX, 117023 abr TX, 117023 ubr RX, 117023 ubr TX

Allocated bit rates:

30720 cbr RX, 30720 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Best effort connections: 0 pvcs,  0 svcs

8540-MSR# show atm interface resource atm2/1/0.6

Resource Management configuration:

Service Categories supported: cbr

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none cbr,

Peak-cell-rate TX: none cbr,

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none cbr,

CDVT TX: none cbr,

Resource Management state:

Available bit rates (in Kbps):

9727 cbr RX, 9727 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

1741 cbr RX, 1741 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0.7

Resource Management configuration:

Service Categories supported: vbr-nrt

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none vbr,

Peak-cell-rate TX: none vbr,

Sustained-cell-rate: none vbr RX, none vbr TX

Minimum-cell-rate RX:

Minimum-cell-rate TX:

CDVT RX: none vbr,

CDVT TX: none vbr,

MBS: none vbr RX, none vbr TX

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 613 vbr RX, 613 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 9114 vbr RX, 9114 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

8540-MSR# show atm interface resource atm2/1/0.10

Resource Management configuration:

Service Categories supported: ubr

Link Distance: 0 kilometers

Best effort connection limit: disabled  0 max connections

Max traffic parameters by service (rate in Kbps, tolerance in cell-times):

Peak-cell-rate RX: none ubr

Peak-cell-rate TX: none ubr

Minimum-cell-rate RX: none ubr

Minimum-cell-rate TX: none ubr

CDVT RX: none ubr

CDVT TX: none ubr

Resource Management state:

Available bit rates (in Kbps):

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

Allocated bit rates:

0 cbr RX, 0 cbr TX, 0 vbr RX, 0 vbr TX,

0 abr RX, 0 abr TX, 0 ubr RX, 0 ubr TX

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- VP（虚拟路径）交换和隧道技术支持

- LANE（LAN仿真）技术支持

- CES（电路仿真服务）技术支持

- 技术支持和文档 - Cisco Systems