目录

简介

开始使用前

规则

先决条件

使用的组件

配置

FRF.8 PVC 管理过程

使用 Catalyst 8540 MSR 作为 IWF 交换机的示例

使用 Cisco 7200 路由器作为 IWF 的示例

故障排除

相关信息

简介

在FRF.8实施协议中，宽带论坛 （以前称为帧中继论坛）定义了帧中继终端和ATM终端之间通过路由器或交换机进行交互或连接两个第2层协议的通信。本文档介绍通过FRF.8服务互通(IWF)连接实现的永久虚电路(PVC)管理过程，并提供使用路由器和交换机的示例配置。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备创建的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您是在真实网络上操作，请确保您在使用任何命令前已经了解其潜在影响。

配置

本部分提供有关如何配置本文档所述功能的信息。

注：要查找有关本文档中使用的命令的其他信息，请使用命令查找工具(仅注册客户)。

FRF.8 PVC 管理过程

FRF.8的5.2节介绍ATM和帧中继PVC管理过程。在ATM端，这些过程使用F5操作、管理和维护(OAM)信元和临时本地管理接口(ILMI)管理信息库(MIB)变量。然后，ATM状态信息由互通设备映射到相应的帧中继状态指示符。

帧中继端使用本地管理接口(LMI)协议来传达状态信息。标准2字节帧中继报头不包含任何指示终端虚电路(VC)状态的字段。因此，LMI协议使用一种机制来增强帧中继，该机制在永久虚电路(PVC)添加、删除或更改状态时通知终端。它还提供了一种轮询机制，用于验证链路是否保持运行。它在数据链路连接标识符(DLCI)上发送LMI帧，该标识符与用于数据流量的DLCI不同。

LMI帧中的消息类型字段为8位，由状态查询和状态消息组成。帧中继终端（用户）每隔几秒向网络发送一条状态查询消息；此消息验证链路完整性。网络以包含所请求信息的状态消息作出响应。在定义数量的状态查询后，帧中继终端请求所谓的完全状态响应。网络以状态消息作出响应，该消息包含该链路上配置的每条PVC的信息元素(IE)。

PVC状态IE为5个字节。除了报告的PVC的DLCI外，IE还包含两个重要状态位：

- 新位 — 在交换机上添加PVC时由网络设置。网络继续将新位设置为完整状态消息中的1位，直到它收到来自帧中继终端（用户）的状态查询消息，该消息包含与网络当前发送序列号相等的接收序列号。

- 活动位 — 当网络确信到达目的地的完整路径存在且PVC端到端完全建立时设置。

帧中继状态机制的一个注意事项是它不是实时进程，必须等待计划状态消息发送。在某些情况下，当PVC在网络中可用后，两个帧中继终端收到完整状态消息，活动位在不同时间设置为1时，可能会出现计时问题。一个终端将在另一个终端（目标）收到活动状态消息之前通过PVC发送数据帧。

LMI协议通过异步状态报告类型IE克服了这一缺点。异步消息包括在PVC状态发生更改后立即发送的状态和状态查询消息，而不等待消息计时器过期。执行交互工作的思科路由器不支持异步状态消息的过程。

根据状态位，在帧中继端为PVC分配四个状态值之一。执行IWF的交换机或思科路由器使用一组标准来确定要分配给VC的状态。

状态

指示和匹配条件

已添加

帧中继网络将新位设置为IWF的完整状态报告。

已删除

IWF以完整状态报告的形式向帧中继网络报告此状态。

非活动

IWF使用以下条件确定非活动状态：

- 警报指示信号(AIS)或远程缺陷指示器(RDI)OAM F5信元明确表示ATM PVC在端到端路径的某处关闭。

- ILMI MIB在变量atmfVccOperStatus中报告localDown或end2EndDown。

IWF发送完整状态报告，活动位设置为零。

主用

IWF使用以下条件确定活动状态：

- 在OAM规范ITU-I.610中定义的时间间隔内，AIS OAM信元和ATM网络中的RDI OAM信元不存在

- ILMI MIB不在变量atmfVccOperStatus中报告localDown或end2EndDown。

IWF将VC置于帧中继端的活动状态，当两个条件均满足（如果同时使用）且ATM端的IWF未检测到物理警报时。IWF将活动位设置为1的完整状态报告发送到帧中继网络。

使用 Catalyst 8540 MSR 作为 IWF 交换机的示例

以下示例显示Catalyst 8540 MSR作为IWF交换机。

网络图

拓扑如下所示：

注意：ATM路由器是7500路由器，在VIP2-50中使用PA-A3-OC3MM并运行12.1(13)E。FR路由器是运行12.1(17)的7200路由器。 ATM/FR-IWF-switch是运行12.1(12c)EY的Catalyst 8540MSR。

配置

帧中继路由器

controller E1 4/0

channel-group 0 timeslots 1-31

!

interface Serial4/0:0

ip address 12.12.12.2 255.255.255.0

encapsulation frame-relay IETF

no fair-queue

frame-relay map ip 12.12.12.1 123 broadcast

ATM-FR/IWF-switch

controller E1 10/0/0

channel-group 1  timeslots 1-31

!

interface Serial10/0/0:1

no ip address

encapsulation frame-relay IETF

no arp frame-relay

frame-relay intf-type dce

frame-relay pvc 123 service translation  interface  ATM9/1/2 0 123

atm oam interface  ATM9/1/2 0 123

ATM路由器

interface ATM2/1/0.1 point-to-point

ip address 12.12.12.1 255.255.255.0

pvc 0/123

oam-pvc manage

encapsulation aal5snap

显示命令

ATM-router#show atm pvc 0/123

ATM2/1/0.1: VCD: 2, VPI: 0, VCI: 123

UBR, PeakRate: 149760

AAL5-LLC/SNAP, etype:0x0, Flags: 0xC20, VCmode: 0x0

OAM frequency: 10 second(s), OAM retry frequency: 1 second(s), OAM retry frequen

cy: 1 second(s)

OAM up retry count: 3, OAM down retry count: 5

OAM Loopback status: OAM Received

OAM VC state: Verified

ILMI VC state: Not Managed

VC is managed by OAM.

InARP frequency: 15 minutes(s)

Transmit priority 4

InPkts: 5, OutPkts: 8, InBytes: 540, OutBytes: 624

InPRoc: 5, OutPRoc: 5

InFast: 0, OutFast: 0, InAS: 0, OutAS: 3

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0

OAM cells received: 124713

F5 InEndloop: 74872, F5 InSegloop: 49841, F5 InAIS: 0, F5 InRDI: 0

F4 InEndloop: 0, F4 InSegloop: 0, F4 InAIS: 0, F4 InRDI: 0

OAM cells sent: 124756

F5 OutEndloop: 74915, F5 OutSegloop: 49841, F5 OutRDI: 0

F4 OutEndloop: 0, F4 OutSegloop: 0, F4 OutRDI: 0

OAM cell drops: 0

Status: UP

FR-router#show frame-relay pvc

PVC Statistics for interface Serial4/0:0 (Frame Relay DTE)

Active     Inactive      Deleted       Static

Local          1            0            0            0

Switched       0            0            0            0

Unused         0            0            0            0

DLCI = 123, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = Serial4/0:0

input pkts 8             output pkts 5            in bytes 1633

out bytes 520            dropped pkts 0           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 0          out bcast bytes 0

pvc create time 00:02:44, last time pvc status changed 00:02:44

ATM-FR/IWF-switch#show frame-relay pvc

PVC Statistics for interface Serial10/0/0:1 (Frame Relay DCE)

Active     Inactive      Deleted       Static

Local          0            0            0            0

Switched       1            0            0            0

Unused         0            0            0            0

DLCI = 123, DLCI USAGE = SWITCHED, PVC STATUS = ACTIVE, INTERFACE = Serial10/0/0:1

input pkts 5             output pkts 6            in bytes 520

out bytes 550            dropped pkts 0           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 4151       out bcast bytes 1494481      Num Pkts Switched 0

pvc create time 2d21h, last time pvc status changed 2d21h

ATM-FR/IWF-switch#show atm vc interface atm 9/1/2 0 123

Interface: ATM9/1/2, Type: oc3suni

VPI = 0  VCI = 123

Status: UP

Time-since-last-status-change: 2d21h

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Wrr weight: 2

Number of OAM-configured connections: 32

OAM-configuration: Seg-loopback-on End-to-end-loopback-on Ais-on Rdi-on

OAM-states:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Cross-connect-interface: ATM-P10/0/0, Type: ATM-PSEUDO

Cross-connect-VPI = 1

Cross-connect-VCI = 155

Cross-connect-UPC: pass

Cross-connect OAM-configuration: Ais-on

Cross-connect OAM-state:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Threshold Group: 3, Cells queued: 0

Rx cells: 16, Tx cells: 15

Tx Clp0:15,  Tx Clp1: 0

Rx Clp0:16,  Rx Clp1: 0

Rx Upc Violations:9, Rx cell drops:0

Rx Clp0 q full drops:0, Rx Clp1 qthresh drops:0

Rx connection-traffic-table-index: 100

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 81

Rx scr-clp0 : 81

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: 50

Tx connection-traffic-table-index: 100

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 81

Tx scr-clp0 : 81

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 50

场景1

使用上述配置，让我们了解两台路由器对网络中的故障有何反应。在第一个场景中，我们将关闭ATM路由器ATM接口，并查看此故障对FR路由器PVC的影响。

1. 关闭ATM路由器上的ATM子接口：

ATM-router#config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ATM-router(config)#interface atm 2/1/0.1

ATM-router(config-subif)#shut

2. 检查ATM-FR/IWF-switch上PVC的状态：

ATM-FR/IWF-switch#show atm vc interface atm 9/1/2 0 123

Interface: ATM9/1/2, Type: oc3suni

VPI = 0  VCI = 123

Status: UP

Time-since-last-status-change: 00:00:44

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Wrr weight: 2

Number of OAM-configured connections: 32

OAM-configuration: Seg-loopback-on End-to-end-loopback-on Ais-on Rdi-on

OAM-states:  OAM-Up Segment-loopback-failed End-to-end-loopback-failed

OAM-Loopback-Tx-Interval: 5

Cross-connect-interface: ATM-P10/0/0, Type: ATM-PSEUDO

Cross-connect-VPI = 1

Cross-connect-VCI = 155

Cross-connect-UPC: pass

Cross-connect OAM-configuration: Ais-on

Cross-connect OAM-state:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Threshold Group: 3, Cells queued: 0

Rx cells: 1, Tx cells: 0

Tx Clp0:0,  Tx Clp1: 0

Rx Clp0:1,  Rx Clp1: 0

Rx Upc Violations:0, Rx cell drops:0

Rx Clp0 q full drops:0, Rx Clp1 qthresh drops:0

Rx connection-traffic-table-index: 100

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 81

Rx scr-clp0 : 81

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: 50

Tx connection-traffic-table-index: 100

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 81

Tx scr-clp0 : 81

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 50

3. 检查FR-router上的PVC状态：

FR-router#show frame-relay pvc

PVC Statistics for interface Serial4/0:0 (Frame Relay DTE)

Active     Inactive      Deleted       Static

Local          0            1            0            0

Switched       0            0            0            0

Unused         0            0            0            0

DLCI = 123, DLCI USAGE = LOCAL, PVC STATUS = INACTIVE, INTERFACE = Serial4/0:0

input pkts 18            output pkts 5            in bytes 4320

out bytes 520            dropped pkts 5           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0          out BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 0          out bcast bytes 0

pvc create time 00:15:21, last time pvc status changed 00:03:50

如上面的输出所示，ATM端故障反映在FR端。实际上，FR PVC进入非活动状态。

场景2

现在，让我们看看当FR云中发生故障时，ATM端会发生什么情况。要模拟这种故障类型，让我们关闭FR路由器上的串行接口，并了解ATM路由器的反应。

1. 关闭FR-router上的串行接口，并查看ATM-router如何反应：

FR-router#config terminal

Enter configuration commands, one per line.  End with CNTL/Z.

FR-router(config)#int serial 4/0:0

FR-router(config-if)#shut

2. debug atm oam在ATM路由器上启用。我们可以看到，在检测到故障后，ATM-FR/IWF-switch正在向ATM路由器发送AIS信号：

3d12h: atm_oam_ais(ATM2/1/0): AIS signal, failure=0x6A, VC 0/123

3d12h: atm_oam_setstate - VCD#3, VC 0/123: newstate = AIS/RDI

3d12h: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM2/1/0.1, changed state    to down

3d12h: atm_oam_ais_inline(ATM2/1/0): AIS signal, failure=0x6A, VC 0/123

如果检查ATM路由器上的PVC状态，我们可以看到PVC关闭：

ATM-router#show atm pvc 0/123

ATM2/1/0.1: VCD: 3, VPI: 0, VCI: 123

UBR, PeakRate: 149760

AAL5-LLC/SNAP, etype:0x0, Flags: 0xC20, VCmode: 0x0

OAM frequency: 10 second(s), OAM retry frequency: 1 second(s), OAM retry frequency: 1 second(s)

OAM up retry count: 3, OAM down retry count: 5

OAM Loopback status: OAM Received

OAM VC state: AIS/RDI

ILMI VC state: Not Managed

VC is managed by OAM.

InARP frequency: 15 minutes(s)

Transmit priority 4

InPkts: 0, OutPkts: 4, InBytes: 0, OutBytes: 112

InPRoc: 0, OutPRoc: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 4

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0

OAM cells received: 304

F5 InEndloop: 114, F5 InSegloop: 69, F5 InAIS: 121, F5 InRDI: 0

F4 InEndloop: 0, F4 InSegloop: 0, F4 InAIS: 0, F4 InRDI: 0

OAM cells sent: 310

F5 OutEndloop: 120, F5 OutSegloop: 69, F5 OutRDI: 121

F4 OutEndloop: 0, F4 OutSegloop: 0, F4 OutRDI: 0

OAM cell drops: 0

Status: DOWN, State: NOT_VERIFIED

3. 检查ATM-FR/IWF-switch的状态：

ATM-FR/IWF-switch#show atm vc interface atm 9/1/2 0 123

Interface: ATM9/1/2, Type: oc3suni

VPI = 0  VCI = 123

Status: DOWN

Time-since-last-status-change: 00:03:04

Connection-type: PVC

Cast-type: point-to-point

Packet-discard-option: disabled

Usage-Parameter-Control (UPC): pass

Wrr weight: 2

Number of OAM-configured connections: 32

OAM-configuration: Seg-loopback-on End-to-end-loopback-on Ais-on Rdi-on

OAM-states:  OAM-Up

OAM-Loopback-Tx-Interval: 5

Cross-connect-interface: ATM-P10/0/0, Type: ATM-PSEUDO

Cross-connect-VPI = 1

Cross-connect-VCI = 155

Cross-connect-UPC: pass

Cross-connect OAM-configuration: Ais-on

Cross-connect OAM-state:  OAM-Down

OAM-Loopback-Tx-Interval: 5

Threshold Group: 3, Cells queued: 0

Rx cells: 3, Tx cells: 0

Tx Clp0:0,  Tx Clp1: 0

Rx Clp0:3,  Rx Clp1: 0

Rx Upc Violations:0, Rx cell drops:0

Rx Clp0 q full drops:0, Rx Clp1 qthresh drops:0

Rx connection-traffic-table-index: 100

Rx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Rx pcr-clp01: 81

Rx scr-clp0 : 81

Rx mcr-clp01: none

Rx      cdvt: 1024 (from default for interface)

Rx       mbs: 50

Tx connection-traffic-table-index: 100

Tx service-category: VBR-NRT (Non-Realtime Variable Bit Rate)

Tx pcr-clp01: 81

Tx scr-clp0 : 81

Tx mcr-clp01: none

Tx      cdvt: none

Tx       mbs: 50

因此，我们可以看到，由于OAM，ATM路由器将通过关闭相应的ATM PVC对FR云中的故障做出响应。

已知问题说明

- CSCdu78168(CSCdt04356的副本):OAM管理在MSR上不适用，FR到ATM IWF

使用 Cisco 7200 路由器作为 IWF 的示例

网络图

配置

3620

interface Serial1/0

ip address 10.10.10.1 255.255.255.0

encapsulation frame-relay IETF

frame-relay interface-dlci 50

frame-relay lmi-type ansi

7206

frame-relay switching

!

interface Serial4/3

no ip address

encapsulation frame-relay IETF

frame-relay interface-dlci 50 switched

frame-relay lmi-type ansi

frame-relay intf-type dce

clockrate 115200

!

interface ATM5/0

no ip address

atm clock INTERNAL

no atm ilmi-keepalive

pvc 5/50

vbr-nrt 100 75

oam-pvc manage

encapsulation aal5mux fr-atm-srv

!

connect SIVA Serial4/3 50 ATM5/0 5/50 service-interworking

7500

interface atm 4/0/0.50 multi

ip address 10.10.10.2 255.255.255.0

pvc 5/50

vbr-nrt 100 75 30

protocol ip 10.10.10.1

场景1

以下场景假设我们已使用oam-pvc manage命令在IWF上配置了ATM终端和ATM接口。我们将从ATM终端删除PVC配置语句。当ATM PVC关闭时，帧中继PVC将变为非活动状态。

1. 启用debug atm oam并清除计数器

1d09h: ATM OAM(ATM4/0/0.50): Timer: VCD#5 VC 5/50 Status:2 CTag:8586 Tries:0

1d09h: ATM OAM LOOP(ATM4/0/0.50) O: VCD#5 VC 5/50 CTag:218B

1d09h: ATM OAM LOOP(ATM4/0/0) I: VCD#5 VC 5/50 LoopInd:0 CTag:218B

1d09h: ATM OAM LOOP(ATM4/0/0) I: VCD#5 VC 5/50 LoopInd:1 CTag:4850

1d09h: ATM OAM LOOP(ATM4/0/0.50) O: VCD#5 VC 5/50 CTag:4850

2. 使用new-style pvc命令的“no”形式从ATM终端删除PVC。

7500#configure terminal

Enter configuration commands, one per line. End with CNTL/Z.

7500(config)#interface atm 4/0/0.50

7500(config-subif)#no pvc 5/50

3. 执行show atm vc命令并确认IWF 7200上VC的状态为DOWN。

7200#show atm vc

VCD /                                Peak Avg/Min Burst

Interface  Name  VPI   VCI   Type  Encaps   SC  Kbps Kbps    Cells   Sts

5/0.200    test   2    20    PVC   SNAP     UBR 149760                UP

5/0.100     2     3    300   PVC   SNAP     UBR 149760                UP

5/0         1     5    50    PVC   FRATMSRV VBR 100     75     95    DOWN

4. 执行show atm pvc {vpi/vci}命令并确认OAM VC状态：未验证.

7200#show atm pvc 5/50

ATM5/0: VCD: 1, VPI: 5, VCI: 50

VBR-NRT, PeakRate: 100, Average Rate: 75, Burst Cells: 95

AAL5-FRATMSRV, etype:0x15, Flags: 0x23, VCmode: 0x0

OAM frequency: 10 second(s), OAM retry frequency: 1 second(s),    OAM retry frequency: 1 second(s)

OAM up retry count: 3, OAM down retry count: 5

OAM Loopback status: OAM Sent

OAM VC state: Not Verified

ILMI VC state: Not Managed

VC is managed by OAM.

InARP DISABLED

Transmit priority 2

InPkts: 0, OutPkts: 0, InBytes: 0, OutBytes: 0

InPRoc: 0, OutPRoc: 0, Broadcasts: 0

InFast: 0, OutFast: 0, InAS: 0, OutAS: 0

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0, LengthViolation: 0, CPIErrors: 0

Out CLP=1 Pkts: 0

OAM cells received: 19

F5 InEndloop: 19, F5 InSegloop: 0, F5 InAIS: 0, F5 InRDI: 0

F4 InEndloop: 0, F4 InSegloop: 0, F4 InAIS: 0, F4 InRDI: 0

OAM cells sent: 82

F5 OutEndloop: 82, F5 OutSegloop: 0, F5 OutRDI: 0

F4 OutEndloop: 0, F4 OutSegloop: 0, F4 OutRDI: 0

OAM cell drops: 0

Status: DOWN, State: NOT_VERIFIED

5. 在帧中继终端上启用调试帧中继数据包。观察帧中继连接的用户和网络端之间交换的状态和状态查询(StEnq)消息的顺序。确认VC的状态从0x2（活动）更改为0x0（非活动）。

*Apr 7 01:53:18.407: Serial1/0(in): Status, myseq 69

*Apr 7 01:53:18.407: RT IE 1, length 1, type 0

*Apr 7 01:53:18.407: KA IE 3, length 2, yourseq 67, myseq 69

*Apr 7 01:53:18.407: PVC IE 0x7 , length 0x3 , dlci 50, status 0x2

! -- A value of 0x2 indicates active status.

*Apr 7 01:53:28.403: Serial1/0(out): StEnq, myseq 70, yourseen 67, DTE up

*Apr 7 01:53:28.403: datagramstart = 0x3D53954, datagramsize = 14

*Apr 7 01:53:28.403: FR encap = 0x00010308

*Apr 7 01:53:28.403: 00 75 95 01 01 01 03 02 46 43

*Apr 7 01:53:28.403:

*Apr 7 01:53:28.407: Serial1/0(in): Status, myseq 70

*Apr 7 01:53:28.407: RT IE 1, length 1, type 1

*Apr 7 01:53:28.407: KA IE 3, length 2, yourseq 68, myseq 70

*Apr 7 01:53:38.403: Serial1/0(out): StEnq, myseq 71, yourseen 68, DTE up

*Apr 7 01:53:38.403: datagramstart = 0x3D53954, datagramsize = 14

*Apr 7 01:53:38.403: FR encap = 0x00010308

*Apr 7 01:53:38.403: 00 75 95 01 01 01 03 02 47 44

*Apr 7 01:53:38.403:

*Apr 7 01:53:38.407: Serial1/0(in): Status, myseq 71

*Apr 7 01:53:38.407: RT IE 1, length 1, type 0

*Apr 7 01:53:38.407: KA IE 3, length 2, yourseq 69, myseq 71

*Apr 7 01:53:38.407: PVC IE 0x7 , length 0x3 , dlci 50, status 0x0

! -- A value of 0x0 indicates inactive status.

状态字段的可能值说明如下：

- 0x0 — 已添加且不活动。DLCI已在交换机中编程，但不可用。一个潜在原因是PVC的另一端关闭。

- 0x2 — 已添加并处于活动状态。DLCI在交换机中编程，PVC工作正常。

- 0x3 — 组合活动状态(0x2)和设置(0x1)的接收方未就绪(RNR)（或r位）。值0x03表示交换机或交换机上此PVC的特定队列已备份，因此帧中继接口停止传输以避免丢失帧。

- 0x4 — 已删除。DLCI未在交换机中编程，而是先前编程的。或者，删除状态可能是由路由器上的DLCI颠倒或由帧中继网云中的电信公司删除的PVC引起的。在帧中继终端上配置一个DLCI，而交换机上没有匹配值，则VC的状态值为0x4。

6. 如果无法在生产路由器上运行debug frame-relay packet，只需执行show frame pvc，并确认帧中继终端至少列出一个非活动的本地PVC。

3620#show frame pvc

PVC Statistics for interface Serial1/0 (Frame Relay DTE)

Active     Inactive     Deleted     Static

Local         0           1            0           0

Switched      0           0            0           0

Unused        0           0            0           0

DLCI = 50, DLCI USAGE = LOCAL, PVC STATUS = INACTIVE, INTERFACE = Serial1/0

input pkts 0             output pkts 0            in bytes 0

out bytes 0              dropped pkts 0           in FECN pkts 0

in BECN pkts 0           out FECN pkts 0 out      BECN pkts 0

in DE pkts 0             out DE pkts 0

out bcast pkts 0         out bcast bytes 0

pvc create time 3d04h, last time pvc status changed 00:05:04

场景2

以下场景假设我们只需从IWF 7200中删除oam-pvc manage命令即可。ATM VC保持为UP状态，然后在帧中继端保持活动状态。

1. 在IWF 7200的ATM接口上删除oam-pvc manage命令。

7200(config)#int atm 5/0

7200(config-if)#pvc 5/50

7200(config-if-atm-vc)#no oam-pvc manage

7200(config-if-atm-vc)#end

7200#show atm vc

*May 31 01:20:01.499: %LINEPROTO-5-UPDOWN: Line protocol on Interface ATM5/0,    changed state to up

VCD /                                    Peak   Avg/Min Burst

Interface Name   VPI   VCI   Type   Encaps   SC    Kbps   Kbps    Cells   Sts

5/0.100     2     3     300  PVC    SNAP      UBR  149760                  UP

5/0         1     5     50   PVC    FRATMSRV  VBR  100     75       95     UP

2. 使用pvc命令的“no”形式删除ATM终端上的PVC。

7500(config)#int atm 4/0/0.50

7500(config-subif)#no pvc 5/50

7500(config-subif)#end

3. show atm pvc vpi/vci命令可确认ATM端的状态保持为UP状态。

7200-2.4#show atm pvc 5/50

ATM5/0: VCD: 1, VPI: 5, VCI: 50

VBR-NRT, PeakRate: 100, Average Rate: 75, Burst Cells: 95

AAL5-FRATMSRV, etype:0x15, Flags: 0x23, VCmode: 0x0

OAM frequency: 0 second(s), OAM retry frequency: 1 second(s),    OAM retry frequency: 1 second(s)

OAM up retry count: 3, OAM down retry count: 5

OAM Loopback status: OAM Disabled

OAM VC state: Not Managed

ILMI VC state: Not Managed

InARP DISABLED

Transmit priority 2

InPkts: 15, OutPkts: 19, InBytes: 1680, OutBytes: 1332

InPRoc: 0, OutPRoc: 0, Broadcasts: 0

InFast: 15, OutFast: 19, InAS: 0, OutAS: 0

InPktDrops: 0, OutPktDrops: 0

CrcErrors: 0, SarTimeOuts: 0, OverSizedSDUs: 0, LengthViolation: 0, CPIErrors: 0

Out CLP=1 Pkts: 0

OAM cells received: 157

F5 InEndloop: 157, F5 InSegloop: 0, F5 InAIS: 0, F5 InRDI: 0

F4 InEndloop: 0, F4 InSegloop: 0, F4 InAIS: 0, F4 InRDI: 0

OAM cells sent: 214

F5 OutEndloop: 214, F5 OutSegloop: 0, F5 OutRDI: 0

F4 OutEndloop: 0, F4 OutSegloop: 0, F4 OutRDI: 0

OAM cell drops: 0

Status: UP

4. 帧中继端的PVC状态也保持活动状态。

*Apr 7 02:25:08.407: Serial1/0(in): Status, myseq 5

*Apr 7 02:25:08.407: RT IE 1, length 1, type 0

*Apr 7 02:25:08.407: KA IE 3, length 2, yourseq 3 , myseq 5

*Apr 7 02:25:08.407: PVC IE 0x7 , length 0x3 , dlci 50, status 0x2

! -- The Frame Relay PVC retains an active status (0x2).

*Apr 7 02:25:18.403: Serial1/0(out): StEnq, myseq 6, yourseen 3, DTE up

*Apr 7 02:25:18.403: datagramstart = 0x3D53094, datagramsize = 14

*Apr 7 02:25:18.403: FR encap = 0x00010308

*Apr 7 02:25:18.403: 00 75 95 01 01 00 03 02 06 03

5. show frame pvc命令可确认帧中继终端上PVC的活动状态。

3620#show frame pvc

PVC Statistics for interface Serial1/0 (Frame Relay DTE)

Active Inactive Deleted Static

Local      1      0       0        0

Switched   0      0       0        0

Unused     0      0       0        0

DLCI = 50, DLCI USAGE = LOCAL, PVC STATUS = ACTIVE, INTERFACE = Serial1/0

input pkts 0        output pkts 0         in bytes 0

out bytes 0         dropped pkts 0        in FECN pkts 0

in BECN pkts 0      out FECN pkts 0 out   BECN pkts 0

in DE pkts 0        out DE pkts 0

out bcast pkts 0    out bcast bytes 0

pvc create time 3d04h, last time pvc status changed 00:02:45

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- ATM到帧中继互通技术支持

- 宽带论坛

- ATM技术支持页

- 技术支持和文档 - Cisco Systems