目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

为TACACS+支持配置缓存引擎

验证

故障排除命令

相关信息

简介

本文档介绍如何配置终端访问控制器访问控制系统Plus(TACACS+)支持以访问思科缓存引擎。本文档中的说明允许您在telnet至缓存引擎时根据远程TACACS+服务器/数据库进行验证。如果服务器不包含您的用户ID的条目，它会在本地检查是否有效的访问信息。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 在实验室环境中的已清除配置的Cisco Cache Engine 505

- 思科缓存引擎软件版本2.3.1

- 适用于UNIX的CiscoSecure

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

关于文件规则的信息，请参见Cisco技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可获取有关本节中使用的命令的详细信息。

网络图

本文档使用以下网络设置：

为TACACS+支持配置缓存引擎

要为TACACS+支持配置缓存引擎，请完成以下步骤：

1. 为Web缓存通信协议(WCCP)的相应版本配置缓存引擎。

2. 对默认配置使用以下命令：

authentication login local enable

authentication configuration local enable

3. 配置TACACS+服务器IP地址。如果多台服务器指定哪个地址是主地址，则辅助服务器将留空选项。

4. 将TACACS+服务器的身份验证配置为主服务器。如果服务器不可用，则默认为本地指定的身份验证。

5. 根据需要配置对TACACS+密钥信息的身份验证。

注意：您必须在思科缓存引擎上启用TACACS+，因为思科缓存引擎使用PPP来向TACACS服务器进行身份验证，而不是不需要PPP的路由器。要在Cisco缓存引擎上启用TACACS+，请打开Cisco Secure ACS 2.6，单击Group Setup选项卡，然后选中TACACS+ Settings区域中的PPP IP 复选框。

您的命令行应类似于以下输出：

cepro(config)#tacacs server 172.18.124.114

cepro(config)#authentication login tacacs ena primary

cepro(config)#authen configuration tacacs enab

验证

使用本部分可确认配置能否正常运行。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

- show version — 显示在缓存引擎上运行的软件以及一些其他组件作为系统正常运行时间（例如之前引导代码的位置和编译代码的日期）。

cepro#show version

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 20 hours, 42 minutes, 59 seconds.

System booted from "flash"

- show hardware — 显示与show version命令以及缓存引擎的硬件组件相同的信息。

cepro#show hardware

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 21 hours, 15 minutes, 16 seconds.

System booted from "flash"

Cisco Cache Engine CE505 with CPU AMD-K6 (model 8) (rev. 12) AuthenticAMD

2 Ethernet/IEEE 802.3 interfaces

1 Console interface.

134213632 bytes of Physical Memory

131072 bytes of ROM memory.

8388608 bytes of flash memory.

List of disk drives:

/c0t0d0  (scsi bus 0, unit 0, lun 0)

- show running-config — 显示缓存引擎上的运行配置。

cepro#show running-config

Building configuration...

Current configuration:

!

!

!

user add admin uid 0  password 1 "eeSdy9dcy"  capability admin-access

user add chbanks uid 5001  password 1 "eeSdy9dcy"  capability admin-access

!

!

!

hostname cepro

!

interface ethernet 0

ip address 10.27.2.2 255.255.255.0

ip broadcast-address 10.27.2.255

exit

!

!

interface ethernet 1

exit

!

ip default-gateway 10.27.2.1

ip route 0.0.0.0 0.0.0.0 10.27.2.1

cron file /local/etc/crontab

!

wccp router-list 1 10.27.2.1

wccp web-cache router-list-num 1

!

authentication login tacacs enable primary

authentication login local enable !--- on by default ---!

authentication configuration tacacs enable

authentication configuration local enable  !---- on by default ---!

tacacs server 172.18.124.114 primary

rule no-cache url-regex .*cgi-bin.*

rule no-cache url-regex .*aw-cgi.*

!

!

end

cepro#

- show tacacs — 显示TACACS+服务器的设置。

cepro#show tacacs

Login Authentication for Console/Telnet Session: enabled (primary)

Configuration Authentication for Console/Telnet Session: enabled

TACACS Configuration:

---------------------

Key        =

Timeout    = 5 seconds

Retransmit = 2 times

Server                         Status

----------------------------   ------

172.18.124.114                 primary

- show statistics tacacs — 显示TACACS+统计信息。

cepro#show statistics tacacs

TACACS+ Statistics

-----------------

Number of access requests: 13

Number of access deny responses: 7

Number of access allow responses: 0

- show authentication — 显示当前TACACS+当前身份验证和授权配置。

cepro#show authentication

Login Authentication:         Console/Telnet Session

----------------------------- -----------------------

local                         enabled

tacacs                        enabled (primary)

Configuration Authentication: Console/Telnet Session

----------------------------- -----------------------

local                         enabled

tacacs                        enabled

cepro#

故障排除命令

本部分提供的信息可用于对配置进行故障排除。

命令输出解释程序（仅限注册用户）(OIT) 支持某些 show 命令。使用 OIT 可查看对 show 命令输出的分析。

注意：在使用debug命令之前，请参阅有关Debug命令的重要信息。

- show debug — 显示已启用的debug命令。

cepro#show debug

Authentication debugging is on

Tacacs debugging is on

- terminal monitor — 将调试输出显示到屏幕。此输出显示debug authentication和debug tacacs命令的结果。

cepro#terminal monitor

cepro#authenticateUser(): Begin

setRemoteIPAddress(): pRemoteAddress 172.18.124.193

bAuthentication(): Begin

bAuthenticationIntersection(): Begin

bAuthenticationIntersection(): telnet_access 1

setAuthenticatedService(): nServiceToAuthenticate 6

getAuthenticatedService(): Begin

getAuthenticatedService(): nServiceToAuthenticate = 6

bAuthenticationIntersection() getAuthenticatedService 6

setErrorDisplayed(): Begin bStatus 0

getLocalLoginAuthEnable(): Begin

getLocalLoginAuthEnable(): uiState = 1

getTacacsLoginAuthEnable(): Begin

getTacacsLoginAuthEnable(): uiState = 1

getTacacsLoginAuthPrimary(): Begin

getTacacsLoginAuthPrimary(): uiState = 1

IncrementTacacsStatRequest(): Begin

tacacs_plus_login() Begin

isConsole() Begin

getAuthenticatedService(): Begin

getAuthenticatedService(): nServiceToAuthenticate = 6

isConsole() nReturn 0 telnet

tacacs_plus_login() sWhatService() tty = telnet

getRemoteIPAddress(): Begin

getRemoteIPAddress(): pRemoteAddress = 172.18.124.193

tacacs_plus_login() getRemoteIPAddress sHostIp 172.18.124.193

tacacs_malloc() Begin 164

tacacs_malloc() PSkmalloc ptr

getUserStruct() malloc_named ustr

tacacs_plus_login() allocated memory for ustruct

aaa_update_user() Begin

debug_authen_svc() Begin

aaa_update_user(): user='admin' ruser='system' port='telnet'

rem_addr='172.18.124.193' authen_type=1

tacacs_plus_login() updated user

getNumTacacsLoginAttempts(): Begin

getNumTacacsLoginAttempts(): ulRetransmit = 2

####### tacacs_plus_login() num_tries 1

aaa_start_login() Begin

debug_start_login() Begin

debug_start_login()/AUTHEN/START (0): port='telnet' list='(null)'

action=LOGIN service=LOGIN

aaa_randomize_id() Begin

tacacs_plus_start_login() Begin

tacacs_parse_server() Begin user_str admin

getTacacsDirectRequestEnable(): Begin

getTacacsDirectRequestEnable(): cDirectRequestEnable = 0

printIpAddr() Begin

printIpAddr() 0.0.0.0

tacacs_plus_start_login() server.ip_addr 0.0.0.0          server.type

0 server.length 0

choose_version() Begin

create_authen_start() Begin

create_authen_start() len 45

tacacs_malloc() Begin 45

tacacs_malloc() PSkmalloc ptr

create_authen_start() malloc_named tac_pak

fill_tacacs_plus_hdr() Begin encrypt 1

fill_tacacs_plus_hdr() len 33, tac_pak->length 33

#### fill_tacacs_plus_hdr() tac_pak->encrypted 1

#### fill_tacacs_plus_hdr() TEST nTestLen 33

create_authen_start() len 33, tac_pak->length 33

create_authen_start() u->priv_lvl  15 start->priv_lvl 15

create_authen_start() start->action 1

create_authen_start() start->authen_type 1

create_authen_start() start->service 1

create_authen_start() user_len 5

create_authen_start() port_len 6

create_authen_start() addr_len 14

create_authen_start() out_len 33

tacacs_plus_start_login() TACACS+: send AUTHEN/START packet ver=192

id=1541646967

tacacs_plus_start_login() login to TACACS+ server:

printIpAddr() Begin

printIpAddr() 0.0.0.0

tacacs_plus_get_conn() Begin server(0)

printIpAddr() Begin

printIpAddr() 0.0.0.0

tacacs_plus_get_conn() **pSocketHandleIndex 89434348

tacacs_plus_get_conn() Look at server in the TACACS+ server list

tacacs_plus_get_conn() TACACS+: This is a loop through server list

tacacs_plus_openconn() Begin

printIpAddr() Begin

printIpAddr() 172.18.124.114

open_handle() Begin

tacacs_plus_socket() Begin

tacacs_plus_socket Socket: return nSocket 784 nSockFdTbl[28] = 784

printIpAddr() Begin

printIpAddr() 172.18.124.114

open_handle() TACACS+: Opening TCP/IP connection to 172.18.124.114

open_handle() nSockFdTbl[28]= 784

setCurrentServer() Begin SaveCurrentServer->ip_addr 172.18.124.114

IncrementTacacsStatPerServerRequest(): Begin

##### IncrementTacacsStatPerServerRequest  Server->ip_addr 1920733868

tacacs_root.ulTacacsServerAddr

open_handle() socket(28) 784

tacacs_plus_connect() Begin

tacacs_plus_connect() socket(28) 784

tacacs_plus_connect() End

open_handle() is connected

open_handle() *connection_handle 28

open_handle() **pSocketHandleIndex 28

tacacs_plus_openconn() **pSocketHandleIndex 28

get_server() Begin

tacacs_plus_openconn() server->opens++

tacacs_plus_get_conn() **pSocketHandleIndex 28

tacacs_plus_get_conn() oldServerCount: 0, count:0

tacacs_plus_start_login() **pHandleIndex 28

tacacs_plus_send_receive() Begin

tacacs_plus_proc_send_receive() Begin

tacacs_plus_proc_send_receive() length 33

copy_tac_plus_packet() Begin

tacacs_malloc() Begin 45

tacacs_malloc() PSkmalloc ptr

copy_tac_plus_packet() malloc_named copy

tacacs_plus_encrypt() Begin

getTacacsKey(): Begin

getTacacsKey(): sKey =

tacacs_plus_encrypt() key

tacacs_plus_encrypt() sizeof(tacacs_plus_pkt_hdr) 12

tacacs_plus_encrypt() sizeof(uchar) 1

tacacs_plus_encrypt() tac_pak->encrypted 1

tacacs_plus_encrypt() tac_pak->encrypted = TAC_PLUS_CLEAR && key is empty

tacacs_plus_proc_send_receive() out_pak->encrypted 1

tacacs_plus_proc_send_receive() out_pak->encrypted 1

tacacs_plus_proc_send_receive() PSkfree dump_pak

tacacs_plus_proc_send_receive() ntohl(out_pak->length) 33

dump_start_session() Begin ntohl(out_pak->length) 33

getTacacsKey(): Begin

getTacacsKey(): sKey =

0xc0 0x1 0x1 0x1 0x77 0xaa 0xe3 0x5b 0x0 0x0 0x0 0x21 0x1 0xf 0x1 0x1 0x5

0x6 0xe 0x0 0x61 0x64 0x6d

encrypt_md5_xor() Begin

encrypt_md5_xor() no key

dump_summarise_incoming_packet_type() Begin

Read AUTHEN/START size=45

dump_nas_pak() Begin

dump_header() Begin

PACKET: key=

version 192 (0xc0), type 1, seq no 1, encrypted 1

session_id 2007688027 (0x77aae35b), Data length 33 (0x21)

End header

type=AUTHEN/START, priv_lvl = 15action=login

authen_type=ascii

service=login

user_len=5 port_len=6 (0x6), rem_addr_len=14 (0xe)

data_len=0

User: port: rem_addr: data:

End packet

dump_start_session() PSkfree test

getTacacsTimeout(): Begin

getTacacsTimeout(): ulTimeout = 5

tacacs_plus_sockwrite() Begin

tacacs_plus_proc_send_receive() PSkfree out_pak

getTacacsTimeout(): Begin

getTacacsTimeout(): ulTimeout = 5

sockread() Begin

tacacs_plus_proc_send_receive() read

tacacs_malloc() Begin 18

tacacs_malloc() PSkmalloc ptr

tacacs_plus_proc_send_receive() malloc_named *in

tacacs_plus_proc_send_receive() allocated memory

getTacacsTimeout(): Begin

getTacacsTimeout(): ulTimeout = 5

sockread() Begin

tacacs_plus_proc_send_receive() OK

tacacs_plus_decrypt() Begin

getTacacsKey(): Begin

getTacacsKey(): sKey =

tacacs_plus_decrypt() key

tacacs_plus_decrypt() tac_pak->encrypted = TAC_PLUS_CLEAR && key is empty

authen_resp_sanity_check() Begin

tacacs_plus_hdr_sanity_check() Begin

authen_debug_response() Begin

authen_debug_response() TACACS+: ver=192 id=1541646967 received AUTHEN

status = FAIL

tacacs_plus_start_login() PSkfree out_tac_pak

unload_authen_resp() Begin

tacacs_plus_start_login() PSkfree in_tac_pak

debug_authen_status() Begin

TACACS+/AUTHEN (2007688027): status = FAIL

tacacs_plus_login() Authentication failed.

tacacs_plus_login() label1

aaa_cleanup_login() Begin

aaa_close_connection() Begin

tacacs_plus_closeconn() Begin

get_server() Begin

close_handle() Begin

close_handle() nHandleIndex 28 nSockFdTbl[**handle] 784

aaa_set_password() Begin

aaa_free_user() Begin

debug_authen_svc() Begin

aaa_close_connection() Begin

TACACS+/AUTHEN: free user admin system telnet 172.18.124.193

authen_type=ASCII service=LOGIN priv_lv

aaa_free_user() PSkfree ustr

####### tacacs_plus_login() num_tries 2

aaa_start_login() Begin

debug_start_login() Begin

debug_start_login()/AUTHEN/START (0): port='unknown' list='(null)'

action=LOGIN service=LOGIN

TACACS+/AUTHEN/START aaa_start_login() (0): ERROR (no ustruct)

tacacs_plus_login() TACACS+: aaa_start

aaa_free_user() Begin

tacacs_plus_login() try_local_login AUTHENTICATION_INTERNAL_ERROR

IncrementTacacsStatDenyAccess(): Begin

localAuthentication(): Begin

localAuthentication() usrName admin

localAuthentication() passwd system

localAuthentication() pUid 89435294

localAuthentication() telnet_access

localAuthentication() rc == TRUE

AuthenticationIntersection(): bTacacsLogin 0

IncrementLocalLoginStat(): Begin

getLocalConfigAuthEnable(): Begin

getLocalConfigAuthEnable(): uiState = 1

getTacacsConfigAuthEnable(): Begin

getTacacsConfigAuthEnable(): uiState = 1

getTacacsConfigAuthPrimary(): Begin

getTacacsConfigAuthPrimary(): uiState = 0

localAuthentication(): Begin

localAuthentication() usrName admin

localAuthentication() passwd system

localAuthentication() pUid 89435294

localAuthentication() telnet_access

localAuthentication() rc == TRUE

AuthenticationIntersection(): bTacacsConfig 0

AuthenticationIntersection():== Local Database Authentication ==

IncrementLocalConfigStat(): Begin

AuthenticationIntersection(): user has been found

AuthenticationIntersection(): bTacacsLogin pUid 89435294

AuthenticationIntersection(): GOT ACCESS capab 0 Admin 0 Ftp 0 Http 0

Telnet 0

authenticateUser() AUTHENTICATION IS OK

authenticateUser() AUTHENTICATION #2

相关信息

- 思科500系列缓存引擎产品和服务