目录

简介

开始使用前

规则

先决条件

使用的组件

BPDU 格式

相关信息

简介

本文描述DEC和IEEE 802.1d网桥协议数据单元(BPDU)格式。

开始使用前

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

先决条件

本文档没有任何特定的前提条件。

使用的组件

本文档不限于特定的软件和硬件版本。

BPDU 格式

DEC Bpdu有以下格式：

DEC code:     E1

bpdu type:    19 hello, 02 topology change notice

version:      01

bit field:    1 byte

1 : topology change notice

2 : topology change notice ack

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : use short timers

root priority:   2 bytes

root id:         6 bytes

root path cost:  2 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         1 byte

message age:     1 byte

hello time:      1 byte

max age:         1 byte

forward delay:   1 byte

IEEE 802.1d Bpdu有以下格式：

protocol id:   0000 IEEE 802.1d

version id:    00

bpdu type:     00 config bpdu, 80 tcn bpdu

bit field:     1 byte

1 : topology change flag

2 : unused    0

3 : unused    0

4 : unused    0

5 : unused    0

6 : unused    0

7 : unused    0

8 : topology change ack

root priority    2 bytes

root id:         6 bytes

root path cost:  4 bytes

bridge priority: 2 bytes

bridge id:       6 bytes

port id:         2 bytes

message age:     2 bytes in 1/256 secs

max age:         2 bytes in 1/256 secs

hello time:      2 bytes in 1/256 secs

forward delay:   2 bytes in 1/256 secs

相关信息

- 技术支持 - Cisco Systems