Contents

Overview

Explicação

Saída de exemplo

ASR 5000

ASR 5500

Overview

A implementação do LAG (Link Aggregation) altera o comportamento dos comandos "show port npu counters" e "show port usage table". Os comandos de porta são importantes para solucionar problemas relacionados à porta e ao throughput e, portanto, é importante poder interpretar corretamente sua saída, especialmente porque ela é inintuitiva quando comparada às portas não LAG. A conclusão é que os contadores de npu de porta para LAG em uma base de porta individual não estão disponíveis e são relatados para todo o grupo LAG apenas até, pelo menos, StarOS v18, que é a hora dessa gravação. Isso pode mudar em versões futuras.

Explicação

Devido às limitações de projeto/ arquitetura, a comunicação de contadores de npu de porta é limitada ao conglomerado de todas as portas em um grupo LAG e não no nível de porta individual. Isso não se aplica aos contadores de enlace de dados de porta que continuam a gerar relatórios conforme esperado.

Como a implementação do LAG exige que todas as portas do LAG estejam ativas, o "show port usage table" relata a utilização de todas as portas do LAG, estejam elas distribuindo (ativas) ou acordadas (em espera) para ambos ASR 5000/5500. Sidenote: As portas geralmente acordadas não mostram nenhum tráfego, mas houve casos em que a direção Rx e/ou Tx das portas acordadas também estão transportando tráfego (não o assunto deste artigo, mas apenas apontando para ele).

Enquanto isso, para portas não LAG, há uma diferença entre o que é relatado para ASR 5000 vs. ASR 5500. O ASR 5000 não relata a utilização de portas em standby, enquanto o ASR 5500 relata a utilização de portas em standby (mesmo que essas portas estejam operacionalmente inoperantes)

Consistente com o que acabou de ser mencionado, o "show port table" do LAG relata que todas as portas estão operacionalmente ativas, em comparação com o não LAG, onde apenas a porta ativa de um par de portas está operacionalmente ativa.

Para "show port npu counters", TODAS as portas LAG são listadas, mas o seguinte é verdadeiro:

- ASR 5000:

- os contadores na porta primária (configurada) são uma contagem TOTAL em todas as portas ATIVAS atuais

- os contadores para TODAS as outras portas (incluindo o par da porta primária) não são relevantes e não devem ser usados

- ASR 5500:

- os contadores sob a porta primária e seu standby são uma contagem TOTAL em todas as portas ATIVAS atuais (ambos relatarão um valor semelhante, mas ligeiramente diferente - use um dos dois)

- os contadores para TODAS as outras portas são 0s

Para portas NÃO LAG, somente os contadores para portas ativas são relatados. As portas de standby nem estão listadas na saída no nível da NPU (e nunca foram).

Saída de exemplo

A saída aqui é para suportar as explicações anteriores. Ele é baseado nas configurações de hardware da seguinte maneira:

ASR 5000: Portas LAG 19/20, 23/26, 27/28 e portas não LAG 21/37

ASR 5500: Portas LAG 5/ 10, 11, 15, 16; Portas 10, 11, 15, 16 e não LAG 5/28 e 6/28, 29/5 e 6/29

Lembrete: O foco deste artigo são os contadores das portas LAG.

ASR 5000

******** show port utilization *******

Wednesday May 28 12:28:04 UTC 2014

------ Average Port Utilization (in mbps) ------

Port   Type                       Current           5min             15min

Rx      Tx      Rx       Tx       Rx     Tx

----- ------------------------  ------- -------  ------- -------  ------- -------

19/1  10G Ethernet              514     572      503     534      490     517

20/1  10G Ethernet              0       0        0       0        0       0

21/1  1000 Ethernet             0       0        0       0        0       0

23/1  10G Ethernet              460     529      448     516      431     510

26/1  10G Ethernet              0       0        0       0        0       0

27/1  10G Ethernet              674     532      634     519      619     499

28/1  10G Ethernet              0       0        0       0        0       0

******** show port table all *******

Wednesday May 28 12:28:03 UTC 2014

Port  Role Type                      Admin    Oper Link State    Pair  Redundant

----- ---- ------------------------  -------- ---- ---- -------  ----- ---------

19/1  Srvc 10G Ethernet              Enabled  -    Up   -        None  LA+ 19/1

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2423         Enabled  Up   -    Active   -     -

Tagged VLAN  2424         Enabled  Up   -    Active   -     -

Tagged VLAN  2401         Enabled  Up   -    Active   -     -

Tagged VLAN  2009         Enabled  Up   -    Active   -     -

Tagged VLAN  2010         Enabled  Up   -    Active   -     -

Tagged VLAN  2007         Enabled  Up   -    Active   -     -

Tagged VLAN  2498         Enabled  Up   -    Active   -     -

Tagged VLAN  2499         Enabled  Up   -    Active   -     -

20/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

21/1  Srvc 1000 Ethernet             Enabled  -    Up   -        37/1  L2 Link

Untagged                  Enabled  Down -    Active   -     -

Tagged VLAN    30         Enabled  Up   -    Active   -     -

23/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA+ 19/1

26/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

27/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA+ 19/1

28/1  Srvc 10G Ethernet              Enabled  Up   Up   Active   None  LA~ 19/1

37/1  Srvc 1000 Ethernet             Enabled  -    Up   -        21/1  L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN    30         Enabled  Down -    Standby  -     -

******** show port npu counters *******

Counters for port 19/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast              74783944546254086740066587874 69151428800023783215178712378

Counters for port 20/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 23/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 26/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 27/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 28/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

enquanto para NON-LAG, somente as portas ativas são listadas e esses valores são relevantes:

Counters for port 21/1

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

ASR 5500

[local]PGW> show port utilization table

Sunday June 01 03:57:59 UTC 2014

------ Average Port Utilization (in mbps) ------

Port   Type                       Current           5min             15min

Rx      Tx      Rx       Tx       Rx     Tx

----- ------------------------  ------- -------  ------- -------  ------- -------

5/10 10G Ethernet              1919    1973     1982    2066     2025    2094

5/11 10G Ethernet              1911    1751     1976    1828     2023    1883

5/15 10G Ethernet              1910    2064     1975    2064     2004    2130

5/16 10G Ethernet              1933    1943     1987    2012     2014    2019

5/28 10G Ethernet              9       69       9       70       9       71

5/29 10G Ethernet              0       0        0       0        0       0

6/10 10G Ethernet              0       0        0       0        0       0

6/11 10G Ethernet              0       0        0       0        0       0

6/15 10G Ethernet              0       0        0       0        0       0

6/16 10G Ethernet              0       0        0       0        0       0

6/28 10G Ethernet              0       0        0       0        0       0

6/29 10G Ethernet              1       0        1       10       1       11

[local]PGW> show port table all

Sunday June 01 03:58:48 UTC 2014

Port  Role Type                      Admin    Oper Link State    Pair  Redundant

----- ---- ------------------------  -------- ---- ---- -------  ----- ---------

5/10 Srvc 10G Ethernet              Enabled  -    Up   -         6/10 LA+  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2011         Enabled  Up   -    Active   -     -

Tagged VLAN  2405         Enabled  Up   -    Active   -     -

Tagged VLAN  2015         Enabled  Up   -    Active   -     -

Tagged VLAN  2427         Enabled  Up   -    Active   -     -

Tagged VLAN  2407         Enabled  Up   -    Active   -     -

Tagged VLAN  2455         Enabled  Up   -    Active   -     -

5/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/11 LA+  5/10

5/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/15 LA+  5/10

5/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    6/16 LA+  5/10

5/28 Srvc 10G Ethernet              Enabled  -    Up   -         6/28 L2 Link

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2400         Enabled  Up   -    Active   -     -

5/29 Srvc 10G Ethernet              Enabled  -    Up   -         6/29 L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN    31         Enabled  Down -    Standby  -     -

6/10 Srvc 10G Ethernet              Enabled  -    Up   -         5/10 LA~  5/10

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN  2011         Enabled  Up   -    Active   -     -

Tagged VLAN  2405         Enabled  Up   -    Active   -     -

Tagged VLAN  2015         Enabled  Up   -    Active   -     -

Tagged VLAN  2427         Enabled  Up   -    Active   -     -

Tagged VLAN  2407         Enabled  Up   -    Active   -     -

Tagged VLAN  2455         Enabled  Up   -    Active   -     -

6/11 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/11 LA~  5/10

6/15 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/15 LA~  5/10

6/16 Srvc 10G Ethernet              Enabled  Up   Up   Active    5/16 LA~  5/10

6/28 Srvc 10G Ethernet              Enabled  -    Up   -         5/28 L2 Link

Untagged                  Enabled  Down -    Standby  -     -

Tagged VLAN  2400         Enabled  Down -    Standby  -     -

6/29 Srvc 10G Ethernet              Enabled  -    Up   -         5/29 L2 Link

Untagged                  Enabled  Up   -    Active   -     -

Tagged VLAN    31         Enabled  Up   -    Active   -     -

[local]PGW> show port npu counters

Counters for port 5/10

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast               936150697918 636869996072149  9369282682521055230987905964

Counters for port 5/11

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast                          0               0             0               0

Counters for port 5/15

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 5/16

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/10

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

-------------------- ------------- --------------- ------------- ---------------

Unicast               936156167721 636873912574349  9369336716261055237102737046

Counters for port 6/11

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/15

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/16

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Novamente, somente portas ativas são listadas por este comando:

Counters for port 5/28

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes

Counters for port 6/29

Counter                  Rx Frames       Rx Bytes      Tx Frames        Tx Bytes