Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Configurar (Prime Infrastructure 2.2 e anterior)

Configuração do SNMP v2 em um switch

GUI

CLI

Configuração SNMP v3 em um switch

CLI

Prime Infrastructure

SNMP v2

SNMP v3

Configurar (Prime Infrastructure 3.x e posterior)

Configuração SNMP em um switch (Denali 16.x)

GUI

Configuração de SNMP v2 GUI em um switch (Denali 16.x)

CLI SNMP v2 Configuration on a Switch (Denali 16.x)

Configuração de SNMP v3 GUI em um switch (Denali 16.x)

CLI SNMP v3 Configuration on a Switch (Denali 16.x)

Prime Infrastructure

SNMP v2

SNMP v3

Verificar

Configuração SNMP v2 em um switch (Cisco IOS-XE)

Configuração SNMP v3 em um switch (Cisco IOS-XE)

Prime Infrastructure (2.2 e anterior)

Configuração SNMP v2 em um switch (Denali 16.x)

Configuração SNMP v3 em um switch (Denali 16.x)

Prime Infrastructure

Troubleshoot

Do acesso convergido

Da Prime Infrastructure

Introduction

Este documento descreve como adicionar o acesso convergido (5760/3850/3650) à infraestrutura Prime com SNMP (Simple Network Management Protocol) v2 e v3.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Acesso convergido (5760/3850/3650) Cisco IOS® versão 3.3.x ou posterior ou Denali 16.x

- Prime Infrastructure versão 2.0 ou posterior

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar (Prime Infrastructure 2.2 e anterior)

Configuração do SNMP v2 em um switch

GUI

Escolha Configuration > Controller > Management > SNMP > Communities > New.

CLI

Insira os seguintes comandos:

conf t

snmp-server community V2Community RW

Configuração SNMP v3 em um switch

CLI

Insira os seguintes comandos:

conf t

snmp-server group V3Group v3 auth read V3Read write V3Write

snmp-server user V3User V3Group v3 auth sha Password1 priv aes 128 Password1

snmp-server view V3Read iso included

snmp-server view V3Write iso included

snmp-server host 10.201.234.170 version 3 auth V3User

snmp-server enable traps

Prime Infrastructure

Note: Use a visualização do ciclo de vida.

Escolha Operate > Device Work Center > Add Device.

SNMP v2

SNMP v3

Note: Se os parâmetros Telnet/Secure Shell não forem inseridos, o Prime Infrastructure não coletará inventário do switch.

Configurar (Prime Infrastructure 3.x e posterior)

Configuração SNMP em um switch (Denali 16.x)

GUI

Escolha General Settings > Management > SNMP.

Habilite o SNMP.

Configuração de SNMP v2 GUI em um switch (Denali 16.x)

CLI SNMP v2 Configuration on a Switch (Denali 16.x)

Insira os seguintes comandos:

conf t

snmp-server community V2Community RW

Configuração de SNMP v3 GUI em um switch (Denali 16.x)

CLI SNMP v3 Configuration on a Switch (Denali 16.x)

Insira os seguintes comandos:

conf t

snmp-server user V3user V3Group v3 auth sha Password1 priv aes 128 Password1

snmp-server view V3Read iso included

snmp-server view V3Write iso included

snmp-server host 10.201.236.107 version 3 auth V3user

snmp-server enable traps

Prime Infrastructure

SNMP v2

SNMP v3

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

O Cisco CLI Analyzer (somente clientes registrados) aceita alguns comandos show. Use o Cisco CLI Analyzer para visualizar uma análise da saída do comando show.

Configuração SNMP v2 em um switch (Cisco IOS-XE)

Digite este comando:

5760-79b#show snmp community

Community name: V2Community

Community Index: V2Community

Community SecurityName: V2Community

storage-type: nonvolatile        active

Configuração SNMP v3 em um switch (Cisco IOS-XE)

Insira os seguintes comandos:

5760-79b#show snmp user

User name: V3User

Engine ID: 80000009030068BC0C5A8F80

storage-type: nonvolatile        active

Authentication Protocol: SHA

Privacy Protocol: AES128

Group-name: V3Group

5760-79b#show snmp group

groupname: V3Group                          security model:v3 auth

contextname: <no context specified>         storage-type: nonvolatile

readview : V3Read                           writeview: V3Write

notifyview: <no notifyview specified>

row status: active

Note: A CLI é preferida à GUI para a configuração SNMP v3 no acesso convergido para alguns problemas conhecidos que são abordados na ID de bug da Cisco CSCuo52406.

Prime Infrastructure (2.2 e anterior)

Configuração SNMP v2 em um switch (Denali 16.x)

Digite este comando:

polaris-3850#show snmp community

Community name: v2community

Community Index: v2community

Community SecurityName: v2community

storage-type: nonvolatile     active

Configuração SNMP v3 em um switch (Denali 16.x)

Insira os seguintes comandos:

polaris-3850#show snmp user

User name: v3user

Engine ID: 80000009030068BC0C5A8F80

storage-type: nonvolatile        active

Authentication Protocol: SHA

Privacy Protocol: AES128

Group-name: V3Group

polaris-3850#show snmp group

groupname: V3Group                          security model:v3 auth

contextname: <no context specified>         storage-type: nonvolatile

readview : V3Read                           writeview: V3Write

notifyview: <no notifyview specified>

row status: active

Prime Infrastructure

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Do acesso convergido

O comando show logging mostra os pacotes ativos enviados para o endereço IP do Prime Infrastructure a partir do WLC.

Insira os seguintes comandos:

polaris-3850#debug snmp packets

Polaris-3850#show logging

entPhysicalEntry.7.2042 = Gi2/0/1

*Jun 10 15:58:51.817: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.819: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.825: SNMP: Get-bulk request, reqid 945449769, nonrptr 0, maxreps 10

Jun 10 15:58:51.904: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.927: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.928: SNMP: Get-bulk request, reqid 945449775, nonrptr 0, maxreps 10

entPhysicalEntry.7.2062 = NULL TYPE/VALUE

*Jun 10 15:58:51.931: SNMP: Response, reqid 945449775, errstat 0, erridx 0

entPhysicalEntry.7.2063 = Gi2/0/22

entPhysicalEntry.7.2064 = Gi2/0/23

entPhysicalEntry.7.2065 = Gi2/0/24

entPhysicalEntry.7.2066 = Switch 2 FRU Uplink Module 1

--More--          entPhysicalEntry.7.2067 = Gi2/1/1 Container

entPhysicalEntry.7.2068 = Gi2/1/2 Container

entPhysicalEntry.7.2069 = Te2/1/3 Container

entPhysicalEntry.7.2070 = Te2/1/4 Container

entPhysicalEntry.8.1 = V01

*Jun 10 15:58:51.951: SNMP: Packet sent via UDP to 10.201.236.107

*Jun 10 15:58:51.974: SNMP: Packet received via UDP from 10.201.236.107 on Vlan1105

*Jun 10 15:58:51.975: SNMP: Get-bulk request, reqid 945449777, nonrptr 0, maxreps 10

ciscoEnvMonTemperatureStatusEntry.3 = NULL TYPE/VALUE

*Jun 10 15:58:51.978: SNMP: Response, reqid 945449777, errstat 0, erridx 0

ciscoEnvMonTemperatureStatusEntry.3.2008 = 28

ciscoEnvMonTemperatureStatusEntry.3.2009 = 40

ciscoEnvMonTemperatureStatusEntry.3.2010 = 44

ciscoEnvMonTemperatureStatusEntry.6.2008 = 1

--More--         *Jun 10 15:58:52.001: SNMP: Packet sent via UDP to 10.201.236.107

Da Prime Infrastructure

SNMPWALK entre dispositivos.

Insira os seguintes comandos:

PrimeInfrastructurejoker/admin# shell

Enter shell access password :

Starting bash shell ...

ade # snmpwalk -v2c -c v2community 10.201.234.36 sysUpTime

DISMAN-EVENT-MIB::sysUpTimeInstance = Timeticks: (238833753) 27 days, 15:25:37.53

v2community = comunidade snmp

10.201.234.36 = WLC IP

Esse é o resultado se a acessibilidade estiver lá:

DISMAN-EVENT-MIB::sysUpTimeInstance = Timeticks: xx.xxx