Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de Rede

Verificar

Troubleshoot

Informações Relacionadas

Introduction

Este documento descreve como configurar o servidor PPPoE (Point-to-Point Protocol over Ethernet) com BDI (Bridge Domain Interface) e intervalo de vlan.

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- A conectividade de ponta a ponta da camada 1 é excelente

- Conceitos básicos de PPP e PPPoE são bem compreendidos

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- HOST-1 - CISCO887G

- HOST-2 - CISCO887

- SWITCH - WS-C3560-24TS-S

- SERVIDOR PPPoE - ASR1001-X

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Note: Use a Command Lookup Tool ( somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

HOST-1

!

interface FastEthernet0

switchport access vlan 100

no ip address

end

!

interface Vlan100

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

HOST-2

!

interface FastEthernet0

switchport access vlan 200

no ip address

end

!

!

interface Vlan200

no ip address

pppoe enable group global

pppoe-client dial-pool-number 1

end

!

!

interface Dialer1

ip address negotiated

encapsulation ppp

dialer pool 1

ppp chap hostname dsl

ppp chap password 0 dsl

end

!

SWITCH

SWITCH#sh cdp neighbors

Capability Codes: R - Router, T - Trans Bridge, B - Source Route Bridge

S - Switch, H - Host, I - IGMP, r - Repeater, P - Phone,

D - Remote, C - CVTA, M - Two-port Mac Relay

Device ID        Local Intrfce     Holdtme    Capability  Platform  Port ID

SERVER           Gig 0/1           130              R I   ASR1001-X Gig 0/0/0

HOST-1           Fas 0/2           141            R B S I 887G      Fas 0

HOST-2           Fas 0/1           167            R B S I 887       Fas 0

!

interface FastEthernet0/2

switchport access vlan 100

end

!

interface FastEthernet0/1

switchport access vlan 200

end

!

!

interface GigabitEthernet0/1

switchport trunk encapsulation dot1q

switchport trunk allowed vlan 100,200

switchport mode trunk

end

!

SERVIDOR PPPoE

!

username dsl password 0 dsl

!

bba-group pppoe global

virtual-template 1

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

cdp enable

service instance 100 ethernet

encapsulation dot1q 100 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 100

!

service instance 200 ethernet

encapsulation dot1q 200 etype pppoe-all

rewrite ingress tag pop 1 symmetric

bridge-domain 200

!

!

interface Virtual-Template1

ip unnumbered Loopback0

peer default ip address pool POOL

ppp authentication chap

!

interface BDI100

no ip address

pppoe enable group global

!

interface BDI200

no ip address

pppoe enable group global

!

interface Loopback0

ip address 192.168.10.1 255.255.255.255

end

!

ip local pool POOL 192.168.1.1 192.168.1.100

!

Como alternativa, você pode configurar 'vlan-range' como mostrado:

!

interface GigabitEthernet0/0/0

no ip address

negotiation auto

service instance 100 ethernet

encapsulation default

bridge-domain 1

!

end

!

interface BDI1

no ip address

vlan-range dot1q 1 4094

pppoe enable group global

!

end

Diagrama de Rede

Verificar

Use esta seção para confirmar se a sua configuração funciona corretamente.

No HOST-1

HOST-1#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.4     YES IPCP   up                    up

HOST-1#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-1#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-1#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x1F000003

PPP Handle       : 0xB2000003

SSS Handle       : 0x8000004

AAA ID           : 24

Access IE        : 0xA7000003

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xB2000003

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 3

AAA Unique ID    : 24

SSS Manager ID   : 0x8000004

SIP ID           : 0x1F000003

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x7735647E (0x05067735647E)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A011AC (0x0506A7A011AC)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.5 (0x0306C0A80105)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

No HOST-2

HOST-2#show ip interface brief | exclude un

Interface                  IP-Address      OK? Method Status                Protocol

Dialer1                    192.168.1.6     YES IPCP   up                    up

HOST-2#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2            SERVER     192.168.10.1    -               <unknown phone  in

HOST-2#ping 192.168.10.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 192.168.10.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/1/4 ms

HOST-2#show ppp interface virtual-Access 2

PPP Serial Context Info

-------------------

Interface        : Vi2

PPP Serial Handle: 0x7B00000A

PPP Handle       : 0xA000000A

SSS Handle       : 0x4C00000B

AAA ID           : 68

Access IE        : 0x1D00000A

SHDB Handle      : 0x0

State            : Up

Last State       : Binding

Last Event       : LocalTerm

PPP Session Info

----------------

Interface        : Vi2

PPP ID           : 0xA000000A

Phase            : UP

Stage            : Local Termination

Peer Name        : SERVER

Peer Address     : 192.168.10.1

Control Protocols: LCP[Open] IPCP[Open] CDPCP[Stopped]

Session ID       : 10

AAA Unique ID    : 68

SSS Manager ID   : 0x4C00000B

SIP ID           : 0x7B00000A

PPP_IN_USE       : 0x11

Vi2 LCP: [Open]

Our Negotiated Options

Vi2 LCP:    MagicNumber 0x421AC8AB (0x0506421AC8AB)

Peer's Negotiated Options

Vi2 LCP:    MRU 1500 (0x010405DC)

Vi2 LCP:    AuthProto CHAP (0x0305C22305)

Vi2 LCP:    MagicNumber 0xA7A0942C (0x0506A7A0942C)

Vi2 IPCP: [Open]

Our Negotiated Options

Vi2 IPCP:    Address 192.168.1.6 (0x0306C0A80106)

Peer's Negotiated Options

Vi2 IPCP:    Address 192.168.10.1 (0x0306C0A80A01)

NO SWITCH

SWITCH#show vlan brief

VLAN Name                             Status    Ports

---- -------------------------------- --------- -------------------------------

1    default                          active    Fa0/4, Fa0/5, Fa0/6, Fa0/7

Fa0/8, Fa0/9, Fa0/10, Fa0/11

Fa0/12, Fa0/13, Fa0/14, Fa0/15

Fa0/16, Fa0/17, Fa0/18, Fa0/19

Fa0/20, Fa0/21, Fa0/22, Fa0/23

Fa0/24, Gi0/2

11   VLAN0011                         active

12   VLAN0012                         active

13   VLAN0013                         active

100  VLAN0100                         active    Fa0/2

200  VLAN0200                         active    Fa0/1

SWITCH#Show interface trunk

Port        Mode             Encapsulation  Status        Native vlan

Gi0/1       on               802.1q         trunking      1

Port        Vlans allowed on trunk

Gi0/1       100,200

Port        Vlans allowed and active in management domain

Gi0/1       100,200

Port        Vlans in spanning tree forwarding state and not pruned

Gi0/1       100,200

No SERVIDOR PPPoE

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.6     -               -               in

Vi2.2          dsl        192.168.1.5     -               -               in

SERVER#show ip local pool POOL

Pool                     Begin           End             Free  In use

POOL                     192.168.1.1     192.168.1.100     98       2

Available addresses:

192.168.1.7

192.168.1.8

192.168.1.9

.....

.....

Quando você usa 'vlan-range', observe uma alteração em 'Port':

SERVER#show caller ip

Line           User       IP Address      Local Number    Remote Number   <->

Vi2.1          dsl        192.168.1.7     -               -               in

Vi2.2          dsl        192.168.1.8     -               -               in

Troubleshoot

Esta seção disponibiliza informações para a solução de problemas de configuração.

Essas depurações serão úteis para solucionar problemas de PPP/PPPoE.

- debug pppoe events

- debug pppoe errors

- negociação de debug ppp

Informações Relacionadas

- PPPoE sobre BDI no CISCO CSR 1000V

- Erro de aprimoramento - Terminação PPPoE em BDI e intervalo de vlan em ASR1k

- Suporte Técnico e Documentação - Cisco Systems