Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Produtos Relacionados

Conventions

Informações de Apoio

Configurar

Diagrama de Rede

Configurações do Cisco IOS

Configurações CatOS

Verificar

Troubleshoot

Loop Spanning Tree devido a telefones IP Polycom

Informações Relacionadas

Introduction

Este documento fornece configurações de exemplo nos switches Catalyst para conexão com Polycom IP Conference Station 7935/7936 e Polycom SoundPoint IP 430. Este documento não inclui aspectos relativos à alimentação em linha e configurações de Qualidade de Serviço (QoS).

Prerequisites

Requirements

Certifique-se de atender a estes requisitos antes de tentar esta configuração:

- Configuração do telefone IP

Consulte o Guia de início rápido Cisco IP Conference Station 7935 ou Cisco Unified IP Conference Station 7936 Phone Guide para obter mais informações.

- Configuração de LAN virtual

Consulte Virtual LANs/VLAN Trunking Protocol (VLANs/VTP) - Introdução para obter mais informações.

Componentes Utilizados

As informações neste documento são baseadas no Cisco Catalyst 6500 Series Switch com Supervisor Engine 720 e executando o Cisco IOS® Software Release 12.2(18)SXD6 e o Cisco Catalyst 6500 Series Switch com Supervisor Engine 2 e executando o Cisco CatOS Software Release 8.4(4).

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Produtos Relacionados

Essa configuração também pode ser usada com os Cisco Catalyst Switches que executam o Cisco IOS Software, exceto as séries Cisco 2900XL e 3500XL. As configurações CatOS podem ser usadas com qualquer Cisco Catalyst Switches que execute o Catalyst OS Software.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Informações de Apoio

Este documento explica a configuração dos switches que conectam os PCs e o telefone IP Polycom SoundPoint IP 430 em uma porta de switch. Este documento também explica a configuração dos switches que se conectam a uma porta do switch Polycom IP Conference Station 7935/7936.

A Polycom IP Conference Station 7935/7936 tem uma única conexão LAN Ethernet 10/100BaseTx para a rede através de uma interface de cabo RJ-45 e, diferentemente dos outros telefones IP Unificados da Cisco 7900 Series, ela não tem uma conexão LAN Ethernet 10/100BaseTx para se conectar a um PC.

Devido à ausência da provisão para conexão com um PC com a conexão LAN Ethernet 10/100BaseTx no Telefone para Conferência IP Cisco 7935/7936, o conceito de VLAN de voz ou auxiliar não se aplica diretamente e pode causar problemas. A única conexão de LAN Ethernet 10/100BaseTx que a Cisco IP Conference Station 7935/7936 foi usada para conectar esse dispositivo a uma porta de switch. Como essa conexão transporta tráfego somente para a voz, a porta do switch deve pertencer a uma única VLAN.

O Polycom SoundPoint IP 430 tem portas Ethernet duplas de 10/100 Mbps. Uma porta se conecta ao switch e a outra porta se conecta a um PC. Nesta conexão, a porta transporta tráfego para essas duas VLANs:

- Tráfego de dados (PC)

- Tráfego de voz (telefone IP)

Neste cenário, você precisa de uma porta de tronco para passar o tráfego para mais de uma VLAN.

Observação: a Polycom IP Conference Station 7935/7936 não possui fonte de alimentação externa, portanto, o switch precisa fornecer energia através de suas portas PoE ou um injetor de energia separado precisa ser usado.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota:Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações do Cisco IOS

Este documento utiliza esta configuração:

- Catalyst 6500

Catalyst 6500 no modo nativo do Cisco IOS

Cat6500#show running-config

Building configuration...

Current configuration : 5869 bytes

!

version 12.1

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname cat6500

!

boot system sup-bootflash:s72033-psv-mz.122-18.SXD6.bin

main-cpu

auto-sync standard

ip subnet-zero

!

!

no ip finger

!

!

!

!

vlan 1

name DataVlan

!

vlan 2

name VoiceVlan

!

interface FastEthernet4/1

no ip address

switchport

switchport trunk encapsulation dot1q

switchport trunk native vlan 1

switchport trunk allowed vlan 1,2

switchport mode trunk

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a !--- Layer 2 access port. Otherwise, you create a network loop. !--- Refer to Using Portfast and Other Commands to Fix Workstation Startup !--- Connectivity Delays for more information on how to enable portfast.

!

interface FastEthernet4/2

no ip address

switchport

switchport access vlan 2

switchport mode access

spanning-tree portfast

!--- Use PortFast only when you connect a single end station to a Layer 2 access port. Otherwise, you create a network loop.

!

interface FastEthernet4/3

no ip address

shutdown

!

!--- Output suppressed.

!

ip classless

no ip http server

!

!

!

line con 0

transport input none

line vty 0 4

!

end

Configurações CatOS

Este exemplo explica a configuração de switches no modo Híbrido que conectam o PC e o telefone IP Polycom SoundPoint IP 430 em uma porta de switch. Este documento também explica a configuração dos switches que se conectam a uma porta do switch Polycom IP Conference Station 7935/7936. Essa configuração usa o mesmo diagrama do exemplo anterior.

Catalyst 6500 em modo híbrido

!--- Set the VLAN Trunk Protocol (VTP) mode. !--- In this example, the mode is set to transparent. !--- Dependent upon your network, set the VTP mode accordingly. !--- Refer to Understanding and Configuring VLAN Trunk Protocol (VTP) !--- for more information on VTP.

Catalyst6500> (enable) set vtp mode transparent

VTP domain modified

!--- Add VLAN 2. VLAN 1 already exists by default.

Catalyst6500> (enable) set vlan 2

VLAN 2 configuration successful

!--- Add port 4/2 to VLAN 2.

Catalyst6500> (enable) set vlan 2 4/2

VLAN 2 modified.

VLAN 1 modified.

VLAN  Mod/Ports

---- -----------------------

2     4/2

!--- Enable trunking on port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Vlan(s) 1,2 already allowed on the trunk

Please use the 'clear trunk' command to remove vlans from allowed list.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable)

!--- Enable spanning tree portfast on the ports. Refer to !--- Using Portfast and Other Commands to Fix Workstation Startup Connectivity Delays !--- for more information on how to enable portfast.

Catalyst6500> (enable) set spantree portfast 4/1 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/1 fast start enabled.

Catalyst6500> (enable) set spantree portfast 4/2 enable

Warning: Connecting Layer 2 devices to a fast start port can cause

temporary spanning tree loops. Use with caution.

Spantree port  4/2 fast start enabled.

Catalyst6500> (enable)

!--- If you want to ONLY allow VLAN 1 and VLAN 2 on trunk port 4/1, do this. !--- A trunk port allows all VLANs by default.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1-4094

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

Catalyst6500> (enable) clear trunk 4/1 1-4094

Removing Vlan(s) 1-4094 from allowed list.

Port  4/1 allowed vlans modified to none.

!--- Allow only VLAN 1 and VLAN 2 on trunk port 4/1.

Catalyst6500> (enable) set trunk 4/1 1,2 dot1q on

Adding vlans 1,2 to allowed list.

Port(s)  4/1 allowed vlans modified to 1,2.

Port(s)  4/1 trunk mode set to on.

Port(s)  4/1 trunk type set to dot1q.

Catalyst6500> (enable) show trunk 4/1

* - indicates vtp domain mismatch

# - indicates dot1q-all-tagged enabled on the port

$ - indicates non-default dot1q-ethertype value

Port      Mode         Encapsulation  Status        Native vlan

--------  -----------  -------------  ------------  -----------

4/1      on           dot1q          not-trunking  1

Port      Vlans allowed on trunk

--------  ---------------------------------------------------------------------

4/1      1,2

Port      Vlans allowed and active in management domain

--------  ---------------------------------------------------------------------

4/1      1

Port      Vlans in spanning tree forwarding state and not pruned

--------  ---------------------------------------------------------------------

4/1

!--- Refer to Configuring Ethernet VLAN Trunks for more !--- information on how to configure trunk ports.

!--- Issue the show config

command !--- in order to check the configuration.

Catalyst6500> (enable) show config 4

This command shows non-default configurations only.

Use 'show config <mod> all' to show both default and non-default configurations.

.................................

begin

!

# ***** NON-DEFAULT CONFIGURATION *****

!

!

#time: Thu Jun 21 2007, 23:37:51

!

# default port status is enable

!

!

#module 4 : 16-port 1000BaseX Ethernet

set vlan 2    4/2

clear trunk 4/1  1-9,11-39,41-4094

set trunk 4/1  on dot1q 1,2

set spantree portfast    4/1-2 enable

end

Catalyst6500> (enable)

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

Esta seção disponibiliza informações para a solução de problemas de configuração.

Loop Spanning Tree devido a telefones IP Polycom

Quando você conecta um telefone IP a um switch, ele pode experimentar loops STP, o que faz com que a CPU do switch atinja 100% da utilização. Os loops de STP podem ocorrer mesmo se o portfast estiver ativado na porta do switch onde o telefone IP está conectado.

1. Verifique a configuração da porta do switch. Se a porta onde o Telefone IP está conectado entrar em um status desabilitado por erro e se não houver loop físico, você poderá tentar recuperar a porta do status desabilitado por erro. Consulte Recuperação de Estado de Porta Errdisable nas Plataformas Cisco IOS para obter mais informações.

2. Para evitar que a porta entre em um status desabilitado por erro quando há um risco de que os usuários finais criem um loop físico por engano, você pode habilitar a recuperação desabilitada por erro para que não haja necessidade de redefinir manualmente uma porta que se torne desabilitada. Consulte Melhorias do Spanning-Tree Protocol usando os Recursos de Detecção de Desvio de Loop Guard e BPDU para obter mais informações sobre o STP Loop Guard.

Informações Relacionadas

- Exemplo de Configuração de Configuração de Switches Catalyst IOS para Conectar Telefones IP Cisco

- Entendendo o algoritmo de detecção de energia em linha do Cisco IP Phone 10/100 Ethernet

- Entendendo o provisionamento de energia em linha do IP Phone no Switch Catalyst 6500/6000

- Suporte a Produtos de LAN

- Suporte de tecnologia de switching de LAN

- Suporte Técnico e Documentação - Cisco Systems