Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Procedimento de atualização

Configuração inicial

Etapas de atualização

Verificar

Introduction

Este documento descreve um procedimento passo a passo de In-Service Software Upgrade (ISSU) em Cisco Catalyst 6500 Series Switches no modo Virtual Switching System (VSS) com o uso do Supervisor 2T com Cisco Catalyst 6800 Instant Access Switches (FEX) dual-homed conectado.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nos Cisco Catalyst 6500 Series Switches no modo VSS que executam o Supervisor Engine 2T com um 6800IA dual-homed conectado em placas de linha WS-X6904-40G.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Procedimento de atualização

Configuração inicial

O procedimento de atualização é executado para o Cisco IOS® Software Release 15.1(2)SY para a Versão 15.1(2)SY1.

Aqui estão as estatísticas antes do processo ISSU:

- O chassi do Catalyst 6500 com ID do Switch 1 está ativo e o Switch com ID 2 está em standby (quente).

- Ambos os chassis estão ativos no Cisco IOS Software Release 15.1(2)SY.

- Um único 6800IA que executa o software Cisco IOS versão 15.0(2)EX2 está conectado ao VSS em placas de linha WS-X6904-40G com uma conexão dual-home. O número do canal da porta FEX é 99 e o ID FEX é 110.

6K1#show mod sw all

Switch Number:     1   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY    Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY    Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY    Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX2   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 1

Local switch operational role: Virtual Switch Active

Peer switch number           : 2

Peer switch operational role : Virtual Switch Standby

Etapas de atualização

1. Verifique se a nova imagem do Cisco IOS (Cisco IOS Software Release 15.1(2)SY1) está presente no disco de inicialização e no disco de inicialização.

6K1#dir bootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:35:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:42:12 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

6K1#dir slavebootdisk: | in s2t54

5  -rw-   120035816  Jan 23 2014 22:26:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

8  -rw-   119792104  Feb 10 2014 19:46:14 +00:00

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

2. (Opcional) Use estes comandos para verificar se o VSS está pronto para executar o procedimento de atualização:

- show issue state detail

- show redundancy

- show module switch all

- 6K1#mostrar detalhes do estado do problema

O sistema está configurado para ser atualizado em modo de escalonamento.

Dois nós de supervisor estão online.

Resumo: o sistema será atualizado no modo em tandem.

Slot = 1/2

RP State = Active

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Init

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = No Upgrade Operation in Progress

Starting Image = N/A

Target Image = N/A

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_INIT

6K1#

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 36 minutes

Switchovers system experienced = 0

Standby failures = 0

Last switchover reason = none

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 1/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 2/2

Current Software state = STANDBY HOT

Uptime in current state = 34 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Wed 04-Sep-13 12:37 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

3. Use o comando de problemas de loadoração para iniciar o processo de atualização.

Nesta etapa, o chassi em standby do VSS é reinicializado, recarregado com a nova imagem e inicializa como o chassi em standby do VSS no modo de redundância SSO, executando a nova imagem. Esta etapa é concluída quando a configuração do chassi é sincronizada, como indicado pela mensagem de sincronização em massa bem-sucedida. Pode levar de alguns segundos a alguns minutos para que a nova imagem seja carregada e para que o chassi de espera do VSS faça a transição para o modo SSO.

6K1#issu loadversion 1/2 bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

2/2 slavebootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

System configuration has been modified. Save? [yes/no]: yes

Building configuration...

[OK]

%issu loadversion initiated successfully, upgrade sequence will begin shortly

6K1#

*Feb 11 05:24:40.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion sequence

will begin in 60 seconds. Enter 'issu abortversion' to cancel.

*Feb 11 05:25:10.091: %ISSU_PROCESS-SW1-6-LOADVERSION_INFO: Resetting Standby shortly

<..output truncated..>

*Feb 11 05:29:46.075: %VS_GENERIC-SW1-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 05:29:46.079: %HA_CONFIG_SYNC-SW1-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:29:46.079: %RF-SW1-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:30:25.091: %ISSU_PROCESS-SW1-3-LOADVERSION: Loadversion has completed.

Please issue the 'issu runversion' command after all modules come online.

!

! Boot variable for standby should point to new Image in "show issu state detail" output.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 1/2

RP State = Active

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Slot = 2/2

RP State = Standby

ISSU State = Load Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Load Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show redundancy states

my state = 13 -ACTIVE

peer state = 8  -STANDBY HOT

Mode = Duplex

Unit = Secondary

Unit ID = 18

Redundancy Mode (Operational) = sso

Redundancy Mode (Configured)  = sso

Redundancy State              = sso

Maintenance Mode = Disabled

Manual Swact = enabled

Communications = Up

client count = 144

client_notification_TMR = 30000 milliseconds

keep_alive TMR = 9000 milliseconds

keep_alive count = 1

keep_alive threshold = 19

RF debug mask = 0x0

4. Quando o chassi de standby do VSS executa com êxito a nova imagem no estado de redundância SSO e todas as placas de linha no chassi de standby do VSS estão ativadas e on-line, insira o comando issue runversion para forçar um switchover. O chassi em standby do VSS atualizado assume como o novo chassi ativo, executando a nova imagem. O chassi anteriormente ativo é recarregado e inicializado como o novo chassi em espera VSS no modo SSO, executando a imagem antiga (caso a atualização do software precise ser cancelada e a imagem antiga restaurada). Esta etapa é concluída quando a configuração do chassi é sincronizada, como indicado pela mensagem de sincronização em massa bem-sucedida.

6K1#runversion de problema

Este comando reiniciará a unidade ativa.

Proceed ? [confirm]

%issu runversion initiated successfully

*Feb 11 05:35:19.035: %RF-SW1-5-RF_RELOAD: Self reload. Reason: Admin ISSU

runversion CLI

<..output truncated..>

Feb 11 05:35:21.411: %SYS-SW1-5-SWITCHOVER: Switchover requested by Exec.

Reload Reason: Admin ISSU runversion CLI.

Resetting .......

!

!Standby chassis now becomes active. Below logs are from new active switch.

!

Initializing as Virtual Switch ACTIVE processor

.

.

*Feb 11 05:37:36.107: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 05:39:56.563: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED: Bulk Sync succeeded

*Feb 11 05:39:56.563: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 05:39:56.555: %PFREDUN-SW1_STBY-6-STANDBY: Ready for SSO mode in Default Domain

! Wait till all the modules and Fex Port-channel 99 links come up

!

*Feb 11 05:41:28.467: %ISSU_PROCESS-SW2-6-RUNVERSION_INFO: Runversion has completed.

Please issue the 'issu acceptversion' command

Feb 11 05:43:13.034: %LINK-3-UPDOWN: Interface TenGigabitEthernet1/0/2, changed

state to up (FEX-110)

Feb 11 05:43:14.033: %LINEPROTO-5-UPDOWN: Line protocol on Interface

TenGigabitEthernet1/0/2, changed state to up (FEX-110)

*Feb 11 05:43:14.491: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te1/3/5,

connected to FEX 110, uplink 52

*Feb 11 05:43:14.491: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group 99

is now dual-active detection capable

6K1#show issu state

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_INIT

6K1#show fex 110 detail

FEX: 110        Description: FEX0110     state: online

FEX version: 15.0(2)EX2

Extender Model: C6800IA-48TD, Extender Serial: FOC1736W1A6

FCP ready: yes

Image Version Check: enforced

Fabric Portchannel Ports: 2

Fabric port for control traffic: Te2/3/5

Fabric interface state:

Po99       - Interface Up.

Te1/3/5    - Interface Up.      state: bound

Te2/3/5    - Interface Up.      state: bound

5. Use o comando issue accept version para interromper o Timer de Rollback. Isso é necessário porque, se o temporizador expirar, o chassi atualizado será recarregado e reverterá para a versão de software anterior.

6K1#issu acceptversion

% Rollback timer stopped. Please issue the 'issu commitversion' command.

6. Use o comando Issurunversion fex all para iniciar o procedimento de download e atualização de imagem no FEX (6800IA). O FEX dispara o download da imagem do novo pacote de software do Supervisor2T (aqui, Cisco IOS Software Release 15.2(2)SY1). Se você usa pilhas FEX, o mestre é responsável por extrair a imagem para seus membros. Um servidor TFTP é executado em 192.1.1.1.

6K1#issu runversion fex all

% Successfully initiated 'runversion fex' for Fex IDs: 110.

Use 'show issu state' for more information.

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;bootdisk:

s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_IN_PROGRESS

Following are the logs on from FEX 6800IA console:

!

!192.1.1.1 is the tftp running on FEX controller i.e. VSS active and vlan 1012 is the

control vlan associated with fex.

!

FEX-110#

Loading c6800ia-universalk9-mz.150-2.EX4.bin from 192.1.1.1

(via Vlan1012):  !!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

[OK - 15493122 bytes]

examining image...

extracting info (112 bytes)

extracting c6800ia-universalk9-mz.150-2.EX4/info (792 bytes)

extracting info (112 bytes)

Stacking Version Number: 1.55

System Type:             0x00000000

Ios Image File Size:   0x00EB5200

Total Image File Size: 0x00EC6A00

Minimum Dram required: 0x08000000

Image Suffix:          universalk9-150-2.EX4

Image Directory:       c6800ia-universalk9-mz.150-2.EX4

Image Name:            c6800ia-universalk9-mz.150-2.EX4.bin

Image Feature:         IP|LAYER_2|SSH|3DES|MIN_DRAM_MEG=128

FRU Module Version:    No FRU Version Specified

Old image for switch 1: flash:/c6800ia-universalk9-mz.150-2.EX2

Old image will be left alone

Extracting images from archive into flash...

! The console will be waiting for about 5-10 minutes after the above line.

<output truncated>

New software image installed in flash:/c6800ia-universalk9-mz.150-2.EX4

Following are the logs from the 6500 Active supervisor:

*Feb 11 06:00:30.387: %SATMGR-SW2-5-ONLINE: FEX 110 online

*Feb 11 06:00:30.391: %SATMGR-SW2-5-FEX_MODULE_ONLINE: FEX 110, module 1 online

*Feb 11 06:00:30.395: %OIR-SW2-6-INSREM: Switch 110 Physical Slot 1 - Module

Type LINE_CARD  inserted

*Feb 11 06:00:30.951: %SATMGR-SW2-5-FABRIC_PORT_UP: SDP up on interface Te2/3/5,

connected to FEX 110, uplink 51

*Feb 11 06:00:30.951: %SATMGR-SW2-5-DUAL_ACTIVE_DETECT_CAPABLE: channel group

99 is now dual-active detection capable

*Feb 11 06:01:00.983: %OIR-SW2-6-SP_INSCARD: Card inserted in Switch_number =

110, physical slot 1, interfaces are now online

FEX-110#show ver | in image

System image file is "flash:/c6800ia-universalk9-mz.150-2.EX4/

c6800ia-universalk9-mz.150-2.EX4.bin"

6K1#show issu state det

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Run Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12;

Operating Mode = sso

ISSU Sub-State = Run Version Completed

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

7. Para continuar, insira o comando issue commversion para atualizar o chassi VSS standby e concluir a sequência ISSU. O chassi em standby do VSS é reinicializado, recarregado com a nova imagem e inicializa como o chassi em standby do VSS no estado de redundância SSO, executando a nova imagem. Esta etapa é concluída quando a configuração do chassi é sincronizada, como indicado pela mensagem de sincronização em massa bem-sucedida, e todas as placas de linha no novo VSS-Standby estão ativadas e on-line.

6K1#issu commitversion

%issu commitversion initiated successfully, upgrade sequence will continue shortly

6K1#

*Feb 11 06:05:30.839: %ISSU_PROCESS-SW2-3-COMMITVERSION: issu commitversion;

Commitversion sequence will begin in 60 seconds. Enter 'issu abortversion'

to cancel.

*Feb 11 06:06:00.839: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO:

Resetting Standby shortly

*Feb 11 06:08:48.571: %PFREDUN-SW2-6-ACTIVE: Standby initializing for SSO mode

*Feb 11 06:09:01.163: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Standby has

come online, wait for terminal state

.

.

*Feb 11 06:10:41.267: %VS_GENERIC-SW2-6-VS_HA_HOT_STANDBY_NOTIFY: Standby switch

is in Hot Standby mode

*Feb 11 06:10:41.271: %HA_CONFIG_SYNC-SW2-6-BULK_CFGSYNC_SUCCEED:

Bulk Sync succeeded

*Feb 11 06:10:41.271: %RF-SW2-5-RF_TERMINAL_STATE: Terminal state reached for (SSO)

*Feb 11 06:10:46.403: %ISSU_PROCESS-SW2-6-COMMITVERSION_INFO: Upgrade has completed,

updating boot configuration

!

!Boot variable now displays both new and old image in ?show issu state detail? output.

!

6K1#show issu state detail

The system is configured to be upgraded in staggered mode.

2 supervisor nodes are found to be online.

Summary: an in-tandem upgrade is in progress.

Slot = 2/2

RP State = Active

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Slot = 1/2

RP State = Standby

ISSU State = Commit Version

Boot Variable = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

Operating Mode = sso

ISSU Sub-State = Commit Version completed, waiting for system to settle

Starting Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin

Target Image = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

Current Version = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin

This system is Fex-capable

Fex-ID   ISSU Status

110    FEX_UPGRADE_COMPLETE

6K1#show redundancy

Redundant System Information :

------------------------------

Available system uptime = 1 hour, 28 minutes

Switchovers system experienced = 1

Standby failures = 1

Last switchover reason = user forced

Hardware Mode = Duplex

Configured Redundancy Mode = sso

Operating Redundancy Mode = sso

Maintenance Mode = Disabled

Communications = Up

Current Processor Information :

-------------------------------

Active Location = slot 2/2

Current Software state = ACTIVE

Uptime in current state = 36 minutes

Image Version = Cisco IOS Software, s2t54 Software

(s2t54-ADVENTERPRISEK9-M), Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Peer Processor Information :

----------------------------

Standby Location = slot 1/2

Current Software state = STANDBY HOT

Uptime in current state = 1 minute

Image Version = Cisco IOS Software, s2t54 Software (s2t54-ADVENTERPRISEK9-M),

Version 15.1(2)SY1, RELEASE SOFTWARE (fc4)

Technical Support: http://www.cisco.com/techsupport

Copyright (c) 1986-2013 by Cisco Systems, Inc.

Compiled Thu 28-Nov-13 12:58 by prod_rel_team

BOOT = bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY1.bin,12;

bootdisk:s2t54-adventerprisek9-mz.SPA.151-2.SY.bin,12

CONFIG_FILE =

BOOTLDR =

Configuration register = 0x2102

Verificar

Para verificar se a atualização foi bem-sucedida, use estes comandos:

- show issue state detail

- show redundancy

- show module switch all

Este é o estado atual após o processo ISSU:

- O chassi 6500 com ID do Switch 2 está ativo e o Switch com ID 1 está em espera (quente). Eles agora estão no Cisco IOS Software versão 15.1(2)SY1.

- O cliente do Instant Access (6800IA) agora executa o Cisco IOS Software Release 15.0(2)EX4.

6K1#show mod swi all

Switch Number:     1   Role:  Virtual Switch Standby

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Hot) VS-SUP2T-10G       SAL1632K9P2

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL1741E4ZA

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  c471.fe7c.de96 to c471.fe7c.de9d   1.3   12.2(50r)SYS 15.1(2)SY1   Ok

3  e02f.6d6a.698c to e02f.6d6a.699f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1637MCQQ  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1637MKX8  1.4    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL1745FSD6  1.0    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:     2   Role:   Virtual Switch Active

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

2    5  Supervisor Engine 2T 10GE w/ CTS (Acti VS-SUP2T-10G       SAL1650UC8L

3   20  DCEF2T 4 port 40GE / 16 port 10GE      WS-X6904-40G       SAL17173QD3

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

2  2c54.2dc4.2f3a to 2c54.2dc4.2f41   1.4   12.2(50r)SYS 15.1(2)SY1   Ok

3  70ca.9b8f.510c to 70ca.9b8f.511f   1.0   12.2(50r)SYL 15.1(2)SY1   Ok

Mod  Sub-Module                  Model              Serial       Hw     Status

---- --------------------------- ------------------ ----------- ------- -------

2  Policy Feature Card 4       VS-F6K-PFC4        SAL1651UG8P  1.2    Ok

2  CPU Daughterboard           VS-F6K-MSFC5       SAL1651UEBY  1.5    Ok

3  Distributed Forwarding Card WS-F6K-DFC4-E      SAL17173QHY  1.2    Ok

Mod  Online Diag Status

---- -------------------

2  Pass

3  Pass

Switch Number:   110   Role:                     FEX

----------------------  -----------------------------

Mod Ports Card Type                              Model              Serial No.

--- ----- -------------------------------------- ------------------ -----------

1   48  C6800IA 48GE                           C6800IA-48TD       FOC1736W1A6

Mod MAC addresses                       Hw    Fw           Sw           Status

--- ---------------------------------- ------ ------------ ------------ -------

1  c025.5cc2.2d00 to c025.5cc2.2d33   0.0   Unknown      15.0(2)EX4   Ok

Mod  Online Diag Status

---- -------------------

1  Pass

6K1#

6K1#show switch virtual

Switch mode                  : Virtual Switch

Virtual switch domain number : 100

Local switch number          : 2

Local switch operational role: Virtual Switch Active

Peer switch number           : 1

Peer switch operational role : Virtual Switch Standby