Contents

Introduction

Procedimento pós-processo

Introduction

Este documento descreve como você deve alterar a configuração de inicialização do PXE (Preboot Execution Environment, Ambiente de Execução de Pré-inicialização) antes da reinicialização de qualquer um dos nós do SAP High Performance Analytic Appliance (HANA) ao executar uma atualização do OS (Operating System, Sistema Operacional) com Yet Other Setup Tool (YaST) ou instalar novos drivers do Ethernet Network Interface Controller (ENIC)/Fabric Network Interface Controller (FNIC). A instalação do patch/driver deve ocorrer em cada nó SAP HANA.

Procedimento pós-processo

Use este procedimento ao atualizar o SO com o YaST.

1. Execute a atualização do SUSE com YaST ou a instalação do driver ENIC/FNIC.
Note: Consulte o documento How to upgrade to SLES/SLED 11 SP3  Micro Focus para obter detalhes sobre como atualizar do SP2 para o SP3.

2. Copie o kernel atualizado para o mgmtsrv de um dos nós SAP HANA.

server01 # cd /boot

# Prepare initrd for the PXEBoot and include the nfs packages/drivers

mkinitrd -f nfs -D eth0

# Copy the initrd and vmlinuz to the tftpboot directory of the mgmtsrv

server01 # scp initrd-3.0.101-0.31-default mgmtsrv01:/tftpboot

server01 # scp vmlinuz-3.0.101-0.31-default mgmtsrv01:/tftpboot

3. Faça login no mgmtsrv01 para preparar o disco RAM inicial (initrd) para a inicialização PXE e incluir os pacotes/drivers do Network File System (NFS):

# Check the new run_all.sh script is available (attached to this article as well)

ll /tftboot/tmp/run_all.sh

# Change the initrd

cd /tftpboot

mkdir /tftpboot/tmp2

cp initrd-3.0.101-0.31-default  /tftpboot/tmp2/

cd /tftpboot/tmp2

mv initrd-3.0.101-0.31-default  initrd-3.0.101-0.31-default.gz

gunzip initrd-3.0.101-0.31-default.gz

# Now the initrd is in a CPIO format

cpio -idumf < initrd-3.0.101-0.31-default

rm initrd-3.0.101-0.31-default

# Udev files needs to be empty to avoid issues running different nodes with

that initrd

# During the kernel creation it captures all MAC addresses and align them to

the addresses in the UDEV rules file, so we empty the file before.

# During restart every server will create its own persistent-net rules again.

echo > etc/udev/rules.d/70-persistent-net.rules

# Copy the run_all script generic to all versions of the kernel

cp ../tmp/run_all.sh .

find . | cpio --create --format="newc" > ../initrd-3.0.101-0.31-default

cd ..

gzip -9 initrd-3.0.101-0.31-default

mv initrd-3.0.101-0.31-default.gz initrd-3.0.101-0.31-default

# For simplification …

ln -s ./initrd-3.0.101-0.31-default initrd_3.0.101

ln -s ./vmlinuz-3.0.101-0.31-default kernel_3.0.101

# Now prepare the PXE boot configuration

cd /tftpboot/pxelinux.cfg

vi <hostname|IP address>

# If there is no link available you can check with the command "gethostip

server01"

copy the current SLES11_SP2 (or Default) section and adapt the values for default

and LABEL as well as the kernel and initrd links

# SAP UCS PXE Boot Definition

display ../boot.msg

default SLES11_SP3_101

prompt 1

timeout 10

LABEL SLES11_SP3_101

KERNEL kernel_3.0.101

APPEND initrd=initrd_3.0.101 rw rootdev=192.168.xx.xx:/FS_OS_01/SLES11SP3

intel_idle.max_cstate=0 processor.max_cstate=0 ip=dhcp

OS_VOLUME="FS_OS_01/SLES4SAPSP3" MAC="00:25:B5:12:00:FF" OS_SERVER="192.168.127.11"

4. No primeiro nó SAP HANA, certifique-se de que o SAP HANA seja parado como <SID>ADM.

(sapcontrol -nr <InstanceNumber> -function StopSystem)

5. Reinicialize todos os nós SAP HANA no novo kernel.

Se houver nós SAP HANA adicionais nesta solução, você deve executar a atualização através do YaST no nó e adaptar a configuração de inicialização do PXE para apontar para o kernel/initrd correto depois.