Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Comandos para Troubleshooting

Informações Relacionadas

Introduction

Essa configuração permite que redes privadas atrás de três caixas do Cisco Secure PIX Firewall sejam conectadas por túneis VPN pela Internet ou por qualquer rede pública que use IPsec. Cada uma das três redes tem conectividade com as outras duas redes. Neste cenário, a Network Address Translation (NAT) é necessária para conexões à Internet pública. No entanto, o NAT não é necessário para o tráfego entre as três intranets, que podem ser transmitidas usando um túnel VPN sobre a Internet pública.

Prerequisites

Requirements

Para que o IPsec funcione, você deve ter conectividade de ponto de extremidade de túnel a ponto de extremidade de túnel antes de iniciar esta configuração.

Componentes Utilizados

Essa configuração foi desenvolvida e testada com o PIX Firewall versão 6.1(2).

Observação: o comando show version deve mostrar que a criptografia está habilitada.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Nota: Use a Command Lookup Tool (somente clientes registrados) para obter mais informações sobre os comandos usados nesta seção.

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- PIX 1

- PIX 2

- PIX 3

Configuração do PIX 1

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_1

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- Traffic to PIX 2 private network:

access-list 120 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

!--- Traffic to PIX 3 private network:

access-list 130 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

!--- Do not perform NAT for traffic to !--- other PIX Firewall private networks:

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.2.2.0 255.255.255.0

access-list 100 permit ip 10.1.1.0 255.255.255.0 10.3.3.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.153 255.255.255.0

ip address inside 10.1.1.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 2:

crypto map newmap 20 ipsec-isakmp

crypto map newmap 20 match address 120

crypto map newmap 20 set peer 172.18.124.154

crypto map newmap 20 set transform-set myset

!--- IPsec configuration for tunnel to PIX 3:

crypto map newmap 30 ipsec-isakmp

crypto map newmap 30 match address 130

crypto map newmap 30 set peer 172.18.124.157

crypto map newmap 30 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.154 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.157 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:436c96500052d0276324b9ef33221b2d

: end

[OK]

Configuração do PIX 2

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_2

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- Traffic to PIX 1:

access-list 110 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- Traffic to PIX 3:

access-list 130 permit ip 10.2.2.0 255.255.255.0 10.3.3.0 255.255.255.0

!--- Do not perform NAT for traffic to other PIX Firewalls:

access-list 100 permit ip 10.2.2.0 255.255.255.0 10.1.1.0 255.255.255.0

access-list 100 permit ip 10.2.2.0 255.255.255.0 10.3.3.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.154 255.255.255.0

ip address inside 10.2.2.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 1:

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

!--- IPsec configuration for tunnel to PIX 3:

crypto map newmap 30 ipsec-isakmp

crypto map newmap 30 match address 130

crypto map newmap 30 set peer 172.18.124.157

crypto map newmap 30 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.157 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:aef12453a0ea29b592dd0d395de881f5

: end

Configuração do PIX 3

PIX Version 6.1(2)

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 8Ry2YjIyt7RRXU24 encrypted

passwd 2KFQnbNIdI.2KYOU encrypted

hostname pix_3

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

names

!--- IPsec configuration for tunnel to PIX 1:

access-list 110 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

!--- IPsec configuration for tunnel to PIX 2:

access-list 120 permit ip 10.3.3.0 255.255.255.0 10.2.2.0 255.255.255.0

!--- Do not perform NAT for traffic to other PIX Firewalls:

access-list 100 permit ip 10.3.3.0 255.255.255.0 10.2.2.0 255.255.255.0

access-list 100 permit ip 10.3.3.0 255.255.255.0 10.1.1.0 255.255.255.0

pager lines 24

logging on

no logging timestamp

no logging standby

no logging console

no logging monitor

no logging buffered

no logging trap

no logging history

logging facility 20

logging queue 512

interface ethernet0 auto

interface ethernet1 auto

mtu outside 1500

mtu inside 1500

ip address outside 172.18.124.157 255.255.255.0

ip address inside 10.3.3.1 255.255.255.0

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

arp timeout 14400

!--- Do not perform NAT for traffic to other PIX Firewalls:

nat (inside) 0 access-list 100

route outside 0.0.0.0 0.0.0.0 172.18.124.1 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00 h323

0:05:00 sip 0:30:00 sip_media 0:02:00

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

sysopt connection permit-ipsec

no sysopt route dnat

crypto ipsec transform-set myset esp-des esp-md5-hmac

!--- IPsec configuration for tunnel to PIX 1:

crypto map newmap 10 ipsec-isakmp

crypto map newmap 10 match address 110

crypto map newmap 10 set peer 172.18.124.153

crypto map newmap 10 set transform-set myset

!--- IPsec configuration for tunnel to PIX 2:

crypto map newmap 20 ipsec-isakmp

crypto map newmap 20 match address 120

crypto map newmap 20 set peer 172.18.124.154

crypto map newmap 20 set transform-set myset

crypto map newmap interface outside

isakmp enable outside

isakmp key ******** address 172.18.124.153 netmask 255.255.255.255

no-xauth no-config-mode

isakmp key ******** address 172.18.124.154 netmask 255.255.255.255

no-xauth no-config-mode

isakmp identity address

isakmp policy 10 authentication pre-share

isakmp policy 10 encryption des

isakmp policy 10 hash md5

isakmp policy 10 group 1

isakmp policy 10 lifetime 1000

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:e6ad75852dff21efdb2d24cc95ffbe1c

: end

[OK]

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração. Consulte Troubleshooting do PIX para Passar o Tráfego de Dados em um Túnel IPsec Estabelecido para obter mais informações.

Comandos para Troubleshooting

Nota:Consulte Informações Importantes sobre Comandos de Depuração antes de usar comandos debug.

Comandos debug

Use esses comandos no PIX, com os comandos logging monitor debugging ou logging console debugging em execução.

- debug crypto ipsec — Depura o processamento do IPsec.

- debug crypto isakmp — Depura o processamento do ISAKMP (Internet Security Association and Key Management Protocol).

- debug crypto engine — Exibe mensagens de depuração sobre mecanismos de criptografia, que executam criptografia e descriptografia.

comandos clear

Para limpar as associações de segurança (SAs), use esses comandos no modo de configuração do PIX.

- clear [crypto] ipsec sa — Exclui as SAs IPsec ativas. A palavra-chave crypto é opcional.

- clear [crypto] isakmp sa — Exclui as SAs ativas do Internet Key Exchange (IKE). A palavra-chave crypto é opcional.

Observação: para que o IPsec funcione, você deve ter conectividade do ponto final do túnel ao ponto final do túnel antes de iniciar esta configuração.

Informações Relacionadas

- Troubleshooting de PIX para Passagem de Tráfego de Dados em um Túnel de IPSec Estabelecido

- Cisco PIX 500 Series Security Appliances

- Referências de comando PIX

- Negociações IPsec/Protocolos IKE

- Solicitações de Comentários (RFCs)

- Suporte Técnico e Documentação - Cisco Systems