Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Configurar

Diagrama de Rede

Configurar VPN IPSec

Configurar BGP

Configuração final em ambos os dispositivos

FTD1

FTD2

Verificar

FTD1

FTD2

Troubleshoot

Introduction

Este documento descreve como configurar a vizinhança do Border Gateway Protocol (BGP) em um túnel VPN site a site IPsec entre dois Cisco FirePower Threat Defense (FTD).

Prerequisites

Requirements

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Configurações de BGP no FTD

- Configurações de túnel VPN site a site IPsec no FTD

Componentes Utilizados

As informações neste documento são baseadas no Cisco FTDv rodando 6.4.0.7 e 6.4.0.9.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Configurar

Esta seção descreve a configuração necessária nos FTDs para ativar a vizinhança de BGP através de um túnel IPSec.

Diagrama de Rede

Configurar VPN IPSec

Etapa 1. Crie uma nova topologia de VPN ponto a ponto.

Navegue até Dispositivos > VPN > Site-to-Site e adicione uma nova VPN de dispositivo FirePower Threat Defense.

Etapa 2. Configure o FTD1 como um dos endpoints.

- A rede de objeto FTD1-Outside-IP contém o endereço IP da interface externa do FTD1.

- Os objetos obj-10.1.1.0 e obj-10.1.2.0 contêm a sub-rede 10.1.1.0/24 e 10.1.2.0/24, respectivamente. O tráfego VPN é gerado a partir dessas sub-redes. Na seção de configuração de BGP aqui, o BGP é configurado para anunciar essas sub-redes aos seus vizinhos.

Etapa 3. Configure o FTD2 como o segundo endpoint.

- A rede de objeto FTD2-Outside-IP contém o endereço IP da interface externa do FTD2.

- Os objetos obj-172.16.1.0 e obj-172.16.2.0 contêm as sub-redes 172.16.1.0/24 e 172.16.2.0/24, respectivamente. O tráfego VPN é gerado a partir dessas sub-redes. Na seção de configuração de BGP aqui, o BGP é configurado para anunciar essas sub-redes aos seus vizinhos.

Etapa 4. Configure os parâmetros IKE.

1. Configure a política IKEv2.

2. Configure o método de autenticação (PSK/Certificate).

Etapa 5. Configure os parâmetros de IPSec necessários.

1. Configurar tipo de mapa de criptografia (estático ou dinâmico)

2. Configurar o modo IKEv2 (túnel ou transporte)

3. Configurar propostas de IPSec

4. Habilitar segredo de encaminhamento perfeito (opcional)

5. Ativar Injeção de Rota Reversa (Opcional)

Etapa 6. Defina as configurações avançadas conforme necessário.

Configurar BGP

Este é o procedimento para configurar FTD1 e FTD2.

Em Gerenciamento de dispositivos, selecione o dispositivo e navegue para Roteamento > BGP.

1. Ative o BGP e configure o Número do Sistema Autônomo (AS), como mostrado nesta imagem.

2. Navegue para BGP > IPv4 e ative o BGP IPv4 no FTD, como mostrado nesta imagem.

3. Na guia Neighbor, adicione o outro FTD como vizinho e ative o vizinho, como mostrado nesta imagem.

4. Na guia Redes, adicione as redes que você deseja anunciar através do BGP.

5. Todas as outras configurações de BGP são opcionais e você pode configurá-las de acordo com seu ambiente.

Configuração final em ambos os dispositivos

FTD1

!--- FTD Version ---!

ftd1# show version

----------------------[ ftd1 ]----------------------

Model                     : Cisco Firepower Threat Defense for VMWare (75) Version 6.4.0.7 (Build 53)

UUID                      : cbd4966c-daf4-11ea-8637-c8977622bc2d

Rules update version      : 2018-10-10-001-vrt

VDB version               : 309

----------------------------------------------------

Cisco Adaptive Security Appliance Software Version 9.12(2)151

!--- Configure the Inside and outside interface ---!

interface GigabitEthernet0/0

nameif outside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 192.0.2.1 255.255.255.0

!

interface GigabitEthernet0/1

nameif inside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 10.1.1.1 255.255.255.0

!--- Configure VPN ---!

!--- Configure IPSec Policy ---!

crypto ipsec ikev2 ipsec-proposal CSM_IP_1

protocol esp encryption des

protocol esp integrity sha-1

!--- Configure Crypto Map ---!

crypto map CSM_outside_map 1 match address CSM_IPSEC_ACL_2

crypto map CSM_outside_map 1 set peer 209.165.201.1

crypto map CSM_outside_map 1 set ikev2 ipsec-proposal CSM_IP_1

crypto map CSM_outside_map 1 set reverse-route

!--- Apply the Crypto Map to the outside interface ---!

crypto map CSM_outside_map interface outside

!--- Configure IKEv2 policy ---!

crypto ikev2 policy 80

encryption des

integrity sha

group 5

prf sha

lifetime seconds 86400

!--- Enable IKEv2 on the outside interface ---!

crypto ikev2 enable outside

!--- Configure BGP Router Process ---!

router bgp 100

bgp log-neighbor-changes

bgp router-id 10.127.248.35

address-family ipv4 unicast

neighbor 209.165.201.1 remote-as 100

neighbor 209.165.201.1 transport path-mtu-discovery disable

neighbor 209.165.201.1 activate

network 10.1.1.0 mask 255.255.255.0

network 10.1.2.0 mask 255.255.255.0

no auto-summary

no synchronization

exit-address-family

!

!--- Configure the necessary routes ---!

route outside 0.0.0.0 0.0.0.0 192.0.2.100 1

route inside 10.1.2.0 255.255.255.0 10.1.1.100 1

FTD2

!--- FTD Version ---!

ftd2# show version

----------------------[ ftd2 ]----------------------

Model                     : Cisco Firepower Threat Defense for VMWare (75) Version 6.4.0.9 (Build 62)

UUID                      : 4ebe8e3a-dd8d-11ea-a599-a348a450d5ff

Rules update version      : 2018-10-10-001-vrt

VDB version               : 309

----------------------------------------------------

Cisco Adaptive Security Appliance Software Version 9.12(2)33

!--- Configure the Inside and outside interface ---!

interface GigabitEthernet0/0

nameif outside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 209.165.201.1 255.255.255.0

!

interface GigabitEthernet0/1

nameif inside

cts manual

propagate sgt preserve-untag

policy static sgt disabled trusted

security-level 0

ip address 172.16.1.1 255.255.255.0

!--- Configure VPN ---!

!--- Configure IPSec Policy ---!

crypto ipsec ikev2 ipsec-proposal CSM_IP_1

protocol esp encryption des

protocol esp integrity sha-1

!--- Configure Crypto Map ---!

crypto map CSM_outside_map 2 match address CSM_IPSEC_ACL_2

crypto map CSM_outside_map 2 set peer 192.0.2.1

crypto map CSM_outside_map 2 set ikev2 ipsec-proposal CSM_IP_1

crypto map CSM_outside_map 2 set reverse-route

!--- Apply the Crypto Map to the outside interface ---!

crypto map CSM_outside_map interface outside

!--- Configure IKEv2 policy ---!

crypto ikev2 policy 80

encryption des

integrity sha

group 5

prf sha

lifetime seconds 86400

!--- Enable IKEv2 on the outside interface ---!

crypto ikev2 enable outside

!--- Configure BGP Router Process ---!

router bgp 100

bgp log-neighbor-changes

bgp router-id 10.127.248.36

address-family ipv4 unicast

neighbor 192.0.2.1 remote-as 100

neighbor 192.0.2.1 transport path-mtu-discovery disable

neighbor 192.0.2.1 activate

network 172.16.1.0 mask 255.255.255.0

network 172.16.2.0 mask 255.255.255.0

no auto-summary

no synchronization

exit-address-family

!--- Configure the necessary routes ---!

route outside 0.0.0.0 0.0.0.0 209.165.201.100 1

route inside 172.16.2.0 255.255.255.0 172.16.1.100 1

Verificar

FTD1

!--- Check the IKEv2 sa with remote peer ---!

ftd1# show crypto ikev2 sa

IKEv2 SAs:

Session-id:34, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local Remote Status Role

315310279 192.0.2.1/500 209.165.201.1/500 READY INITIATOR

Encr: DES, Hash: SHA96, DH Grp:5, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/32514 sec

Child sa: local selector 192.0.2.1/0 - 192.0.2.1/65535

remote selector 209.165.201.1/0 - 209.165.201.1/65535

ESP spi in/out: 0xd8ba0545/0x4b6beb6c

!--- Check the IPSec sa with remote peer and check the number of encrypts and decrypts---!

ftd1# show crypto ipsec sa

interface: outside

Crypto map tag: CSM_outside_map, seq num: 1, local addr: 192.0.2.1

access-list CSM_IPSEC_ACL_2 extended permit ip host 192.0.2.1 host 209.165.201.1

local ident (addr/mask/prot/port): (192.0.2.1/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (209.165.201.1/255.255.255.255/0/0)

current_peer: 209.165.201.1

#pkts encaps: 1110, #pkts encrypt: 1110, #pkts digest: 1110

#pkts decaps: 1111, #pkts decrypt: 1111, #pkts verify: 1111

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 1110, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 192.0.2.1/500, remote crypto endpt.: 209.165.201.1/500

path mtu 1500, ipsec overhead 58(36), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: 4B6BEB6C

current inbound spi : D8BA0545

inbound esp sas:

spi: 0xD8BA0545 (3636069701)

SA State: active

transform: esp-des esp-sha-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, }

slot: 0, conn_id: 1515, crypto-map: CSM_outside_map

sa timing: remaining key lifetime (kB/sec): (4101105/21619)

IV size: 8 bytes

replay detection support: Y

Anti replay bitmap:

0xFFFFFFFF 0xFFFFFFFF

outbound esp sas:

spi: 0x4B6BEB6C (1265363820)

SA State: active

transform: esp-des esp-sha-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, }

slot: 0, conn_id: 1515, crypto-map: CSM_outside_map

sa timing: remaining key lifetime (kB/sec): (4239345/21619)

IV size: 8 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

!--- Check the BGP router summary ---!

ftd1# show bgp summary

BGP router identifier 10.127.248.35, local AS number 100

BGP table version is 43, main routing table version 43

4 network entries using 800 bytes of memory

4 path entries using 320 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 1536 total bytes of memory

BGP activity 20/16 prefixes, 26/22 paths, scan interval 60 secs

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

209.165.201.1 4 100 494 488 43 0 0 09:01:15 2

!--- Check the BGP neighborship ---!

ftd1# show bgp neighbors

BGP neighbor is 209.165.201.1, context single_vf, remote AS 100, internal link

BGP version 4, remote router ID 10.127.248.36

BGP state = Established, up for 09:01:18

Last read 00:00:52, last write 00:00:12, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent Rcvd

Opens: 1 1

Notifications: 0 0

Updates: 3 3

Keepalives: 484 490

Route Refresh: 0 0

Total: 488 494

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 209.165.201.1

BGP table version 43, neighbor version 43/0

Output queue size : 0

Index 19

19 update-group member

Sent Rcvd

Prefix activity: ---- ----

Prefixes Current: 2 2 (Consumes 160 bytes)

Prefixes Total: 2 2

Implicit Withdraw: 0 0

Explicit Withdraw: 0 0

Used as bestpath: n/a 2

Used as multipath: n/a 0

Outbound Inbound

Local Policy Denied Prefixes: -------- -------

Bestpath from this peer: 2 n/a

Invalid Path: 1 n/a

Total: 3 0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 209.165.201.1

Connections established 2; dropped 1

Last reset 09:01:34, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

!--- Check the routes learned from BGP ---!

ftd1# sh route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is 192.0.2.100 to network 0.0.0.0

B 172.16.1.0 255.255.255.0 [200/0] via 209.165.201.1, 00:00:57

B 172.16.2.0 255.255.255.0 [200/0] via 172.16.1.100, 09:01:23

FTD2

!--- Check the IKEv2 sa with remote peer ---!

ftd2# show crypto ikev2 sa

IKEv2 SAs:

Session-id:34, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local Remote Status Role

862624945 209.165.201.1/500 192.0.2.1/500 READY RESPONDER

Encr: DES, Hash: SHA96, DH Grp:5, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/32429 sec

Child sa: local selector 209.165.201.1/0 - 209.165.201.1/65535

remote selector 192.0.2.1/0 - 192.0.2.1/65535

ESP spi in/out: 0x4b6beb6c/0xd8ba0545

!--- Check the IPSec sa with remote peer and check the number of encrypts and decrypts---!

ftd2# show crypto ipsec sa

interface: outside

Crypto map tag: CSM_outside_map, seq num: 2, local addr: 209.165.201.1

access-list CSM_IPSEC_ACL_2 extended permit ip host 209.165.201.1 host 192.0.2.1

local ident (addr/mask/prot/port): (209.165.201.1/255.255.255.255/0/0)

remote ident (addr/mask/prot/port): (192.0.2.1/255.255.255.255/0/0)

current_peer: 192.0.2.1

#pkts encaps: 1107, #pkts encrypt: 1107, #pkts digest: 1107

#pkts decaps: 1106, #pkts decrypt: 1106, #pkts verify: 1106

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 1107, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: 209.165.201.1/500, remote crypto endpt.: 192.0.2.1/500

path mtu 1500, ipsec overhead 58(36), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: D8BA0545

current inbound spi : 4B6BEB6C

inbound esp sas:

spi: 0x4B6BEB6C (1265363820)

SA State: active

transform: esp-des esp-sha-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, }

slot: 0, conn_id: 1516, crypto-map: CSM_outside_map

sa timing: remaining key lifetime (kB/sec): (4008945/21713)

IV size: 8 bytes

replay detection support: Y

Anti replay bitmap:

0xFFFFFFFF 0xFFFFFFFF

outbound esp sas:

spi: 0xD8BA0545 (3636069701)

SA State: active

transform: esp-des esp-sha-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, }

slot: 0, conn_id: 1516, crypto-map: CSM_outside_map

sa timing: remaining key lifetime (kB/sec): (4239345/21713)

IV size: 8 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

!--- Check the BGP router summary ---!

ftd2# show bgp summary

BGP router identifier 10.127.248.36, local AS number 100

BGP table version is 44, main routing table version 44

3 network entries using 600 bytes of memory

3 path entries using 240 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 1256 total bytes of memory

BGP activity 20/17 prefixes, 26/23 paths, scan interval 60 secs

Neighbor V AS MsgRcvd MsgSent TblVer InQ OutQ Up/Down State/PfxRcd

192.0.2.1 4 100 486 492 44 0 0 08:59:40 2

!--- Check the BGP neighborship ---!

ftd2# show bgp neighbors

BGP neighbor is 192.0.2.1, context single_vf, remote AS 100, internal link

BGP version 4, remote router ID 10.127.248.35

BGP state = Established, up for 08:59:42

Last read 00:00:53, last write 00:00:38, hold time is 180, keepalive interval is 60 seconds

Neighbor sessions:

1 active, is not multisession capable (disabled)

Neighbor capabilities:

Route refresh: advertised and received(new)

Four-octets ASN Capability: advertised and received

Address family IPv4 Unicast: advertised and received

Multisession Capability:

Message statistics:

InQ depth is 0

OutQ depth is 0

Sent Rcvd

Opens: 1 1

Notifications: 0 0

Updates: 2 3

Keepalives: 489 482

Route Refresh: 0 0

Total: 492 486

Default minimum time between advertisement runs is 0 seconds

For address family: IPv4 Unicast

Session: 192.0.2.1

BGP table version 44, neighbor version 44/0

Output queue size : 0

Index 19

19 update-group member

Sent Rcvd

Prefix activity: ---- ----

Prefixes Current: 1 2 (Consumes 160 bytes)

Prefixes Total: 1 2

Implicit Withdraw: 0 0

Explicit Withdraw: 0 0

Used as bestpath: n/a 2

Used as multipath: n/a 0

Outbound Inbound

Local Policy Denied Prefixes: -------- -------

Bestpath from this peer: 2 n/a

Invalid Path: 2 n/a

Total: 4 0

Number of NLRIs in the update sent: max 1, min 0

Address tracking is enabled, the RIB does have a route to 192.0.2.1

Connections established 2; dropped 1

Last reset 08:59:57, due to Peer closed the session of session 1

Transport(tcp) path-mtu-discovery is disabled

Graceful-Restart is disabled

!--- Check the routes learned from BGP ---!

ftd2# show route bgp

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is 209.165.201.100 to network 0.0.0.0

B 10.1.1.0 255.255.255.0 [200/0] via 192.0.2.1, 08:59:46

B 10.1.2.0 255.255.255.0 [200/0] via 10.1.1.100, 08:59:46

Troubleshoot

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.