Índice

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Informações de Apoio

Configurar

Diagrama de Rede

Transferência da tarefa 1. as imagens ASA das páginas da transferência de software Cisco

Transferência de arquivo pela rede da tarefa 2. as imagens ASA ao gerente do chassi de FirePOWER

Elevação da tarefa 3. a primeira unidade ASA

Elevação da tarefa 4. a segunda unidade ASA

Verificar

Troubleshooting

Informações Relacionadas

Introdução

Este documento descreve o procedimento de upgrade de uma Alta disponibilidade (HA) dos pares das ferramentas de segurança adaptáveis (ASA) instaladas em ferramentas de hardware de firePOWER.

Pré-requisitos

Requisitos

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Gerenciamento ASA

- Failover ASA

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- 2 código running 2.0.1-86 x FP4150

- ASA 9.6.2.1 (promovido a 9.6.2.3)

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se sua rede está viva, assegure-se de que você compreenda o impacto potencial do comando any.

Informações de Apoio

O procedimento de upgrade de um módulo ASA instalado nos dispositivos de FirePOWER (FPR4100, FPR9300 etc.) quando o HA é configurado (Active/à espera ou ativo/Active) é descrito no manual de configuração elástico do sistema operacional de FirePOWER (FXO). Está aqui a parte relevante:

O objetivo deste documento é fornecer um pouco mais visão detalhada do processo de upgrade em um ambiente HA.

Note: O documento supõe que a versão ASA do alvo é compatível com a versão FXO que existe, assim que os FXO empacotam a elevação não são precisados nesta encenação. Verifique sempre a matriz de compatibilidade FXO para confirmar se a versão ASA do alvo é compatível com a imagem FXO. Se não, promova então as imagens FXO primeiramente como descrito nos Release Note FXO.

Configurar

Diagrama de Rede

ASA1 enquanto se vê no gerente do chassi de FirePOWER (FCM) UI:

ASA2:

Transferência da tarefa 1. as imagens ASA das páginas da transferência de software Cisco

Navegue às transferências em casa > > segurança do Produtos > Firewall > Firewall da próxima geração (NGFW) e selecione a plataforma do HW (por exemplo 4100, 9000 etc.) segundo as indicações da imagem.

Encarregue a transferência de arquivo pela rede 2. as imagens ASA ao gerente do chassi de FirePOWER

Transfira arquivos pela rede as imagens ASA aos chassis de FirePOWER. Isto pode ser feito do gerente do chassi de FirePOWER (FCM) UI ou do comando line interface(cli) FXO.

Transferência de arquivo pela rede do método 1. as imagens ASA de FCM UI.

Navegue ao sistema > às atualizações. Selecione a imagem da transferência de arquivo pela rede, especifique o nome de arquivo e selecione a transferência de arquivo pela rede:

Transferência de arquivo pela rede do método 2. as imagens ASA de FXO CLI.

Você pode transferir arquivos pela rede a imagem de um FTP, do SCP, do SFTP ou de um servidor TFTP. A fim verificar a Conectividade entre a interface de gerenciamento do chassi e o servidor remoto faça como mostrado:

FPR4100# connect local-mgmt

FPR4100(local-mgmt)# ping 10.48.40.70

PING 10.48.40.70 (10.48.40.70) from 10.62.148.88 eth0: 56(84) bytes of data.

64 bytes from 10.48.40.70: icmp_seq=1 ttl=61 time=34.4 ms

64 bytes from 10.48.40.70: icmp_seq=2 ttl=61 time=34.3 ms

64 bytes from 10.48.40.70: icmp_seq=3 ttl=61 time=34.3 ms

A fim transferir a imagem ASA navegue a este espaço e execute o comando da imagem da transferência:

FPR4100# scope ssa

FPR4100 /ssa # scope app-software

FPR4100 /ssa/app-software # download image ftp://ftp_username@ 10.48.40.70/cisco-asa.9.6.2.3.SPA.csp

Password:

A fim monitorar o progresso de transferência de imagem execute o comando detail da transferência-tarefa da mostra:

FPR4100 /ssa/app-software # show download-task detail

Downloads for Application Software:

File Name: cisco-asa.9.6.2.3.SPA.csp

Protocol: Ftp

Server: 10.48.40.70

Port: 0

Userid: anonymous

Path:

Downloaded Image Size (KB): 94214

Time stamp: 2016-12-08T10:21:56.775

State: Downloading

Transfer Rate (KB/s): 450.784698

Current Task: downloading image cisco-asa.9.6.2.3.SPA.csp from 10.48.40.70(FSM-STAGE:sam:dme:ApplicationDownloaderDownload:Local)

Você pode igualmente usar este comando verificar transferência bem sucedida:

FPR4100 /ssa/app-software # show download-task

Downloads for Application Software:

File Name                      Protocol   Server          Port      Userid       State

------------------------------ ---------- --------------- --------- ------------ -----

cisco-asa.9.6.2.2.SPA.csp      Ftp        10.48.40.70             0 anonymous    Downloaded

Para detalhes adicionais:

FPR4100 /ssa/app-software # show download-task fsm status expand

File Name: cisco-asa.9.6.2.3.SPA.csp

FSM Status:

Affected Object: sys/app-catalogue/dnld-cisco-asa.9.6.2.3.SPA.csp/fsm

Current FSM: Download

Status: Success

Completion Time: 2016-12-08T10:26:52.142

Progress (%): 100

FSM Stage:

Order  Stage Name                               Status       Try

------ ---------------------------------------- ------------ ---

1      DownloadLocal                            Success      1

2      DownloadUnpackLocal                      Success      1

A imagem ASA é mostrada no repositório do chassi:

FPR4100 /ssa/app-software # exit

FPR4100 /ssa # show app

Application:

Name       Version    Description Author     Deploy Type CSP Type    Is Default App

---------- ---------- ----------- ---------- ----------- ----------- --------------

asa        9.6.2.1    N/A         cisco      Native      Application No

asa        9.6.2.3    N/A         cisco      Native      Application No

Elevação da tarefa 3. a primeira unidade ASA

Promova a unidade à espera ASA primeiramente segundo as indicações da imagem:

Especifique a imagem nova e a APROVAÇÃO seleta no começo do orderto a elevação:

Verificação

O progresso da elevação ASA de FCM GUI:

Após 1-2 minuto as mostras FCM UI:

Os reloads do módulo ASA:

O processo de upgrade ASA do chassi CLI de FirePOWER.

O CLI mostra que o dispositivo lógico (ASA) reinicia. O processo de upgrade inteiro da inicialização de módulo CLI nesta saída:

asa/sec/stby(config)#

[screen is terminating]

Disconnected from asa console!

Firepower-module1>

INIT: SwitchingStopping OpenBSD Secure Shell server: sshdstopped /usr/sbin/sshd (pid 5738)

.

Stopping Advanced Configuration and Power Interface daemon: stopped /usr/sbin/acpid (pid 5742)

acpid: exiting

acpid.

Stopping system message bus: dbus.

Stopping ntpd: stopped process in pidfile '/var/run/ntp.pid' (pid 6186)

done

Stopping crond: OK

Deconfiguring network interfaces... done.

Sending all processes the TERM signal...

SIGKILL_ALL will be delayed for 1 + 5 secs

Sending all processes the KILL signal...

Deactivating swap...

Unmounting local filesystems...

Rebooting... [ 1679.605561] Restarting system.

Cisco Systems, Inc.

Configuring and testing memory..

Cisco Systems, Inc.

Configuring and testing memory..

Configuring platform hardware...

Bios Version : FXOSSM1.1.2.1.3.031420161207

Platform ID  : FXOSSM1

Processor(s) Intel(R) Xeon(R) CPU E5-2699 v4 @ 2.20GHz

Total Memory  = 256 GB Effective Memory = 256 GB

Memory Operating Speed 2400 Mh

Please wait, preparing to boot.. .........................................................................................................

UEFI Interactive Shell v2.0. UEFI v2.40 (American Megatrends, 0x0005000B). Revision 1.02

Mapping table

fs0: Alias(s):HD17a65535a1:;blk1:

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(1,MBR,0x000EC692,0x800,0xEE6800)

blk0: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)

blk2: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(2,MBR,0x000EC692,0xEE7000,0x3BA000)

blk3: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(3,MBR,0x000EC692,0x12A1000,0x950000)

blk4: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)

blk5: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(1,MBR,0x00000000,0x1BF1800,0x5D22000)

blk6: Alias(s):

PciRoot(0x0)/Pci(0x1F,0x2)/Sata(0x0,0xFFFF,0x0)/HD(4,MBR,0x000EC692,0x1BF1000,0x2CD20800)/HD(2,MBR,0x00000000,0x7914000,0x26FFD800)

To launch ROMMON.

CpuFrequency = 2200002 KHz

Cisco FXOSSM1 Blade Rommon 1.2.1.3, Mar 14 2016 12:11:29

Platform: SSPXRU

INFO: enic_identify: Enabling Cruz driver...

INFO: enic_identify: Cruz driver enabled.

INFO: init_spi_interface: HSFS_BERASE_4K.

INFO: enic_init: bar[0].vaddr 0xc6e00000.

INFO: enic_init: bar[2].vaddr 0xc6e10000.

INFO: enic_init: eNic port MTU is 1500.

INFO: enic_init: eNic bsize 1500 ring size 512.

INFO: enic_init: Waiting for Cruz link...

INFO: enic_init: Cruz link detected.

INFO: nb_eth_app_init: MAC address for interface 0: 00 15 a5 01 01 00

INFO: nb_eth_app_init: IP address 127.128.1.254

Start communicating with MIO in blade slot 1...

INFO: Allocated 1000 bytes of memory for cmd at 0x78a7d018.

INFO: Allocated 1000 bytes of memory for status at 0x76d34918.

INFO: Allocated 196608 bytes of memory for key file at 0x76d03018.

INFO: Status code 1: 'rommon initialize is completed'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

tftpget 0x78a7d018 1000

INFO: tftp_open: '/rommon/command_1.txt'@127.128.254.1 via 127.128.254.1

Received 154 bytes

WARNING: retrieve_mio_cmd_info: Invalid checksum 0x0.

tftpget 0x76d03018 196608

INFO: tftp_open: 'rommon/key_1.bin'@127.128.254.1 via 127.128.254.1

!

Received 131072 bytes

INFO: Status code 8: 'rommon succeeds to retrieve key file'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INFO: Primary keys in flash are up-to-date.

INFO: Backup keys in flash are up-to-date.

continue check local image

the image file path: installables/chassis/fxos-lfbff-k8.9.6.2.2.SPA

the image file name only: fxos-lfbff-k8.9.6.2.2.SPA

local_image_file: fs0:fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

local_image_file_size 104831328

Found image fs0:fxos-lfbff-k8.9.6.2.2.SPA in local storage, boot local image.

set pboot_image fxos-lfbff-k8.9.6.2.2.SPA

INFO: File 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes.

INFO: 'fs0:fxos-lfbff-k8.9.6.2.2.SPA' has 104831328 bytes

INFO: Booting LFBFF image...

INFO: Status code 7: 'rommon about to verify image signature from local disk'.

INFO: tftp_open: '/rommon/status_1.txt'@127.128.254.1 via 127.128.254.1

!

INFO: nb_tftp_upload: 31 bytes sent.

INIT: version 2.88 booting

Starting udev

Configuring network interfaces... done.

Populating dev cache

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

No Partitions for HDD2.. Creating partition..

mount: special device /dev/sdb1 does not exist

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Create libvirt group

Start libvirtd Service

* Starting virtualization library daemon: libvirtd

no /usr/bin/dnsmasq found; none killed

2016-12-07 12:47:24.090+0000: 4373: info : libvirt version: 1.1.2

2016-12-07 12:47:24.090+0000: 4373: warning : virGetHostname:625 : getadd[ ok ]failed for 'ciscoasa': Name or service not known

Disable the default virtual networks

Network default destroyed

Done with libvirt initialization

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

+++++++++++++++ BOOT CLI FILES COPIED +++++++++++++++++++++++++++

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Turbo Boost is UNSUPPORTED on this platform.

Configuration Xml found is /opt/cisco/csp/applications/configs/cspCfg_cisco-asa.9.6.2.3__asa_001_JAD201200C64A93395.xml

INIT: Entering runlevel: 3

rw console=ttyS0,38400 loglevel=2 auto kstack=128 reboot=force panic=1 ide_generic.probe_mask=0x1 ide1=noprobe pci=nocrs processor.max_cstate=1 iommu=pt platform=sspxru boot_img=disk0:/fxos-lfbff-k8.9.6.2.2.SPA ciscodmasz=786432 cisconrsvsz=2359296 hugepagesz=1g hugepages=24 ssp_mode=0

Starting system message bus: dbus.

Starting OpenBSD Secure Shell server: sshd

generating ssh RSA key...

generating ssh ECDSA key...

generating ssh DSA key...

done.

Starting Advanced Configuration and Power Interface daemon: acpid.

acpid: starting up

acpid: 1 rule loaded

acpid: waiting for events: event logging is off

Starting ntpd: done

Starting crond: OK

Cisco Security Services Platform

Type ? for list of commands

Firepower-module1>

Firepower-module1>show services status

Services currently running:

Feature   | Instance ID    |     State  |          Up Since

-----------------------------------------------------------

asa     | 001_JAD201200C64A93395 |   RUNNING  | :00:00:20

Firepower-module1>

As tomadas do procedimento inteiro em torno dos minutos 5.

Você pode igualmente usar o comando do APP-exemplo da mostra do chassi CLI verificar que o aplicativo ASA tem o Online vindo:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicabl

Os módulos ASA descobrem-se:

asa/sec/actNoFailover>

************WARNING****WARNING****WARNING******************************** Mate version 9.6(2)1 is not identical with ours 9.6(2)3 ************WARNING****WARNING****WARNING********************************

.

Detected an Active mate

Beginning configuration replication from mate.

End configuration replication from mate.

asa/sec/stby>

Verificação

FPR4100# connect module 1 console

Telnet escape character is '~'.

Trying 127.5.1.1...

Connected to 127.5.1.1.

Escape character is '~'.

CISCO Serial Over LAN:

Close Network Connection to Exit

Firepower-module1> connect asa

asa> enable

Password:

asa/sec/stby# show failover

Failover On

Failover unit Secondary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)1

Serial Number: Ours FLM2006EQFW, Mate FLM2006EN9U

Last Failover at: 12:48:23 UTC Dec 7 2016

This host: Secondary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Monitored)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Primary - Active

Active time: 10320 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)1) status (Up Sys)

Interface INSIDE (192.168.0.1): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Monitored)

Interface management (10.0.0.50): Normal (Waiting)

...

Para confirmar a operação apropriada do Failover entre as unidades ASA execute estes comandos:

- show conn count

- mostre a contagem do xlate

- show crypto ipsec sa

Elevação da tarefa 4. a segunda unidade ASA

Comute os pares do Failover e promova o ASA preliminar:

asa/sec/stby# failover active

Switching to Active

asa/sec/act#

Especifique a imagem nova e comece a elevação:

Após os minutos 5, os revestimentos da elevação.

Verificar

Do chassi o CLI verifica que o aplicativo ASA tem o Online vindo:

FPR4100# scope ssa

FPR4100 /ssa # show app-instance

Application Name     Slot ID    Admin State     Operational State  Running Version Startup Version Cluster Oper State

-------------------- ---------- --------------- ------------------ --------------- --------------- ------------------

asa                  1          Enabled         Online             9.6.2.3          9.6.2.3         Not Applicable

Do módulo ASA verifique a operação do Failover:

asa/pri/stby# show failover

Failover On

Failover unit Primary

Failover LAN Interface: fover Ethernet1/8 (up)

Reconnect timeout 0:00:00

Unit Poll frequency 1 seconds, holdtime 15 seconds

Interface Poll frequency 5 seconds, holdtime 25 seconds

Interface Policy 1

Monitored Interfaces 2 of 1041 maximum

MAC Address Move Notification Interval not set

Version: Ours 9.6(2)3, Mate 9.6(2)3

Serial Number: Ours FLM2006EN9U, Mate FLM2006EQFW

Last Failover at: 14:35:37 UTC Dec 7 2016

This host: Primary - Standby Ready

Active time: 0 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.2): Normal (Not-Monitored)

Interface OUTSIDE (192.168.1.2): Normal (Waiting)

Interface management (0.0.0.0): Normal (Waiting)

Other host: Secondary - Active

Active time: 656 (sec)

slot 0: UCSB-B200-M3-U hw/sw rev (0.0/9.6(2)3) status (Up Sys)

Interface INSIDE (192.168.0.1): Failed (Not-Monitored)

Interface OUTSIDE (192.168.1.1): Normal (Waiting)

Interface management (10.0.0.50): Normal (Waiting)

Stateful Failover Logical Update Statistics

Link : fover Ethernet1/8 (up)

Stateful Obj    xmit       xerr       rcv        rerr

General         7          0          8          0

...

Comute para trás o Failover para ter preliminar/Active, secundário/apoio:

asa/pri/stby# failover active

Switching to Active

asa/pri/act#

Troubleshooting

Atualmente, não existem informações disponíveis específicas sobre Troubleshooting para esta configuração.

Informações Relacionadas

- Manual de configuração FXO

- Guia da compatibilidade FXOS-ASA

- Release Note FXO

- Suporte Técnico e Documentação - Cisco Systems