Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Determine qual versão do servidor HTTP você tem

Software Cisco IOS com servidor HTTP V1

Software Cisco IOS com o servidor HTTP V1.1

Servidor HTTP V1.1 - Antes da ID de bug Cisco CSCeb82510

Servidor HTTP V1.1 - Após a ID de bug Cisco CSCeb82510

Debug

Informações Relacionadas

Introduction

Este documento mostra como controlar o acesso ao servidor HTTP do Cisco IOS® com Autenticação, Autorização e Contabilidade (AAA). O controle de acesso ao servidor HTTP do Cisco IOS com AAA varia com base na versão do Cisco IOS Software.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

Este documento não se restringe a versões de software e hardware específicas.

Conventions

Consulte as Convenções de Dicas Técnicas da Cisco para obter mais informações sobre convenções de documentos.

Determine qual versão do servidor HTTP você tem

Emita o comando exec show subsys name http para ver qual versão do servidor HTTP você tem.

router1#show subsys name http

Class         Version

http                Protocol    1.001.001

Este é um sistema com o servidor HTTP V1.1. O Cisco IOS Software Release 12.2(15)T e todas as versões do Cisco IOS Software 12.3 possuem HTTP V1.1.

router2#show subsys name http

Class         Version

http                Protocol    1.000.001

Este é um sistema com o servidor HTTP V1. As versões do Cisco IOS Software anteriores a 12.2(15)T (inclui o Cisco IOS Software Release 12.2(15)JA e 12.2(15)XR) possuem HTTP V1.

Software Cisco IOS com servidor HTTP V1

Em versões do Cisco IOS Software que contêm o servidor HTTP V1, as sessões HTTP usam linhas de terminal virtual (vtys). Portanto, a autenticação e a autorização HTTP são controladas com os mesmos métodos configurados para os vtys.

ip http server

!

aaa new-model

aaa authentication login VTYSandHTTP radius local

aaa authorization exec VTYSandHTTP radius local

!

ip http authentication aaa

!

line vty 0 19

!--- The number of vtys you have.

login authentication VTYSandHTTP

authorization exec VTYSandHTTP

Software Cisco IOS com o servidor HTTP V1.1

Em versões do Cisco IOS Software com o servidor HTTP V1.1, as sessões HTTP não usam vtys. Usam soquetes.

Servidor HTTP V1.1 - Antes da ID de bug Cisco CSCeb82510

Antes da integração da ID de bug da Cisco CSCeb82510 (somente clientes registrados) no Cisco IOS Software Release 12.3(7.3) e 12.3(7.3)T, o servidor HTTP V1.1 precisa usar o mesmo método de autenticação e autorização configurado para o console.

ip http server

!

aaa new-model

aaa authentication login CONSOLEandHTTP radius local

aaa authorization exec CONSOLEandHTTP radius local

!

ip http authentication aaa

!

line con 0

login authentication CONSOLEandHTTP

authorization exec CONSOLEandHTTP

Servidor HTTP V1.1 - Após a ID de bug Cisco CSCeb82510

Com a integração do bug da Cisco ID CSCeb82510 (somente clientes registrados) no Cisco IOS Software Release 12.3(7.3) e 12.3(7.3)T, o servidor HTTP pode usar métodos independentes de autenticação e autorização próprios, com novas palavras-chave no comando ip http authentication aaa. As novas palavras-chave são:

router(config)#ip http authentication aaa command-authorization listname

router(config)#ip http authentication aaa exec-authorization listname

router(config)#ip http authentication aaa login-authentication listname

Esta é uma saída de exemplo:

ip http server

!

aaa new-model

aaa authentication login HTTPonly radius local

aaa authorization exec HTTPonly radius local

!

ip http authentication aaa

ip http authentication aaa exec-authorization HTTPonly

ip http authentication aaa login-authentication HTTPonly

Debug

Execute estes comandos debug para solucionar problemas com autenticação/autorização HTTP:

debug ip tcp transactions

debug modem

!--- If you use the HTTP 1.0 server.

debug ip http authentication

debug aaa authentication

debug aaa authorization

debug radius

!--- If you use RADIUS.

debug tacacs

!--- If you use TACACS+.

Esta saída mostra alguns exemplos de depuração:

*Apr 23 13:12:16.871: TCB626DD444 created

*Apr 23 13:12:16.871: TCP0: state was LISTEN -> SYNRCVD [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:16.871: TCP0: Connection to 64.101.98.203:19662, received MSS 1460, MSS is 516

*Apr 23 13:12:16.875: TCP: sending SYN, seq 2078657456, ack 2459301798

*Apr 23 13:12:16.875: TCP0: Connection to 64.101.98.203:19662, advertising MSS 536

*Apr 23 13:12:16.899: TCP0: state was SYNRCVD -> ESTAB [80 -> 64.101.98.203(19662)]

!--- The TCP connection from the browser on 64.101.98.203 to the !--- local HTTP server is established.

*Apr 23 13:12:16.899: TCB62229100 accepting 626DD444 from 64.101.98.203.19662

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_PID (8) 626FEC84

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NO_DELAY (1) 626FEC88

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_WRITE (10) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property TCP_NONBLOCKING_READ (14) 626FED14

*Apr 23 13:12:16.899: TCB626DD444 setting property unknown (15) 626FED14

*Apr 23 13:12:16.919: HTTP AAA Login-Authentication List name: HTTPauthen

*Apr 23 13:12:16.919: HTTP AAA Exec-Authorization List name: HTTPauthor

*Apr 23 13:12:16.919: AAA/AUTHEN/LOGIN (00000000): Pick method list 'HTTPauthen'

!--- Uses 'HTTPauthen' as the login authentication method.

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:16.919: RADIUS/ENCODE(00000000): dropping service type,

"radius-server attribute 6 on-for-login-auth" is off

*Apr 23 13:12:16.919: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:16.919: RADIUS(00000000): sending

*Apr 23 13:12:16.919: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103 for

Radius-Server 10.1.2.3

*Apr 23 13:12:16.919: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645 id 1645/2, len 51

*Apr 23 13:12:16.919: RADIUS:  authenticator 5F 6E E6 C1 3E 40 5D E2 - FB AC E8 E8 E4 93 BA 98

*Apr 23 13:12:16.919: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:16.919: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:16.919: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

!--- Sent an Access-Request to the RADIUS server !--- at 10.1.2.3 using the username of "cisco".

*Apr 23 13:12:21.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:26.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:31.923: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/2

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:36.923: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:36.923: AAA/AUTHOR (0x0): Pick method list 'HTTPauthor'

*Apr 23 13:12:36.923: RADIUS/ENCODE(00000000):Orig. component type = INVALID

*Apr 23 13:12:36.923: RADIUS(00000000): Config NAS IP: 0.0.0.0

*Apr 23 13:12:36.923: RADIUS(00000000): sending

*Apr 23 13:12:36.923: RADIUS/ENCODE: Best Local IP-Address 172.16.175.103

for Radius-Server 10.1.2.3

*Apr 23 13:12:36.923: RADIUS(00000000): Send Access-Request to 10.1.2.3:1645

id 1645/3, len 57

*Apr 23 13:12:36.927: RADIUS:  authenticator AA DB 63 E1 D4 BF 23 9E -

49 71 78 42 A5 A3 44 B8

*Apr 23 13:12:36.927: RADIUS:  User-Name           [1]   7   "cisco"

*Apr 23 13:12:36.927: RADIUS:  User-Password       [2]   18  *

*Apr 23 13:12:36.927: RADIUS:  Service-Type        [6]   6   Outbound     [5]

*Apr 23 13:12:36.927: RADIUS:  NAS-IP-Address      [4]   6   172.16.175.103

*Apr 23 13:12:41.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:46.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:51.927: RADIUS: Retransmit to (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS: No response from (10.1.2.3:1645,1646) for id 1645/3

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response no app start; FAIL

*Apr 23 13:12:56.927: RADIUS/DECODE: parse response; FAIL

*Apr 23 13:12:56.927: HTTP: Authentication failed for level 15

!--- Authentication has failed due to no response from the RADIUS server.

*Apr 23 13:12:56.927: TCB626DD444 shutdown writing

*Apr 23 13:12:56.927: TCP0: state was ESTAB -> FINWAIT1 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.927: TCP0: sending FIN

*Apr 23 13:12:56.967: TCP0: state was FINWAIT1 -> FINWAIT2 [80 -> 64.101.98.203(19662)]

*Apr 23 13:12:56.967: TCP0: FIN processed

*Apr 23 13:12:56.971: TCP0: state was FINWAIT2 -> TIMEWAIT [80 -> 64.101.98.203(19662)]

*Apr 23 13:13:10.227: TCP0: state was TIMEWAIT -> CLOSED [80 -> 64.101.98.203(16260)]

*Apr 23 13:13:10.227: TCB 0x626DCFA0 destroyed

!--- The TCP connection to the browser 64.101.93.203 is closed.

Informações Relacionadas

- Sistema de controle de acesso do controlador de acesso de terminal (TACACS+)

- Remote Authentication Dial-In User Service (RADIUS)

- Solicitações de Comentários (RFCs)

- Suporte Técnico e Documentação - Cisco Systems